;# Keyword
;   "# SelectMode"
;   "# UsingRCP"
;   "# MenuItem"
;   "# PageSetup"
;   "# Type"
;   "# Others"
;   "# PrinterSetup"
;   "# More"
;   "# Duplex"
;   "# ScriptError"
;$1=HBLUE
;$2=HRED

# SelectMode
$1Select Mode
Select the emulation mode you want to use, then click OK to
view the available printer and mode settings.

# UsingRCP
$1Using the Remote Control Panel
By using the Remote Control Panel,
you can see and set most printer settings
on your computer display.

If you prefer to use the keyboard instead of
a mouse, use the keys shown below.
Tab              move to the next setting
Shift + Tab      move to the previous setting
Alt              make selections for options with
                 an underlined character
Enter            change to your selected setting
Arrow            move up or down among the items
                 in options

# MenuItem
$1File Menu
Use this menu to get information on file or printer
settings, to change settings in a file or the printer,
or to exit from the Remote Control Panel.

$1Load Config File...
This item selects a configuration file from among
files saved with the extension .ECF. When you
choose this item, a dialog box appears. After you
select a file and click OK, the file's settings are
displayed as the current settings in the Remote
Control Panel.

$1Save
This item saves the current settings under the
currently opened file name. If no file has been
loaded, it switches to Save As and prompts you for
a file name.

$1Save As...
This item saves the current settings under the file
name you specify. When you choose this item,
a dialog box appears, prompting you for a file name.
After you enter a name and click OK, the current
settings are stored in the new file.

$1Send to Printer
This item sends the current settings displayed in
the Remote Control Panel to the printer; the printer
settings then change to these new settings.
You can also click Send to send the settings to the
printer.

$1Update from Printer
This item retrieves the current printer settings and
displays them as the current settings in the Remote
Control Panel.

$1Print Status Sheet
This item prints out the status sheet.

$1Print AUX Status Sheet
Available when Type-B option interface is
installed.

$1Print LJ4 Font Sample
This item prints out the font sample sheet in
LaserJet4 Mode.

$1Print PS3 Font Sample
This item prints out the font sample sheet.
This item appears only when Adobe(R) 
PostScript(R) 3(TM) Kit is installed in 
the printer.

$1Print PS3 Status Sheet
Prints s status sheet that illustrates the features
available for Adobe(R) PostScript(R) 3(TM) Kit.

$1Print ESCP2 Font Sample
This item prints out the font sample sheet in
ESCP2 Mode.

$1Print FX Font Sample
This item prints out the font sample sheet in
FX Mode.

$1Print I239X Font Sample
This item prints out the font sample sheet in
I239X Mode.

$1Initialize Printer
This item sets the current printer settings to
their original factory settings.

$1Exit
This item ends the setting process and exits from
the Remote Control Panel. You can also click the
EXIT button to exit.

$1Language
This item selects the language for the  panel display
and Status Sheet.

# PageSetup
In Page Setup, you can set page configuration items
such as the number of copies and lines per page.
The printer driver can also make these settings;
the driver's settings override the Remote Control
Panel settings.

$1Page Size
This item selects the paper size from the list
shown below.
    A4, Letter, Legal, Executive, Monarch,
    Commercial 10, DL, C5, International B5, A5,
    Half Letter, Government Letter, Government Legal,
    F4, C6, B5, Custom

$1Copies
This item selects the number of copies to be printed,
up to 999. If you select a number greater than one,
the display shows the number of copies completed
and the current setting.

$1Form(Only LJ4 Mode)
This item selects the number of lines for the
selected paper size and orientation, ranging from
5 to 128. A change in this setting also causes a
change in line spacing (Vertical Motion Index),
and the new VMI value is stored in the printer.
Later changes to the Page Size or the Orientation
also cause changes in the Form value, based on the
stored VMI value.
This option is valid only in LaserJet 4 Mode.

$1CR Function(Only LJ4 Mode)
When CR is set for the CR Function, the printer
does not perform a line feed(LF) command with
each carriage return(CR).
Setting CR+LF for the CR Function causes the 
printer to add a line feed to each carriage
return it receives.
Select CR+LF for this function if you find lines
of text are overlapping in your document.

$1LF Function(Only LJ4 Mode)
When LF is set for the LF Function, the printer
does not perform a carriage return(CR) command
with each line feed(LF) or form feed(FF).
Setting CR+LF for the LF Function cause the 
printer to add a carriage return to each line
feed or form feed it receives.
Select CR+LF for this function if you find the
printer does not print characters beyond the
right margin.

$1Orientation
This item selects  the direction in which characters
or images are printed on a page. Portrait or
landscape is available.

$1Paper Source
Selects the source of the paper.
Value
	Auto Selection	:Automatically select the paper
	              	 source holding paper of 
	              	 specified size.
	MP Tray       	:Always supply paper from Multi
	              	 Purpose tray.
	Lower Cassette	:Always supply paper from Lower 
	              	 Cassette.

$1Manual Feed
Specifies whether or not manual feeding from the Multi
Purpose Tray is possible.
Value
	Off             :Manual Feed Off
	1st Page        :Manual Feed for First page
	Each Page       :Manual Feed for all pages

$1Wide A4 
This item sets the length of short edge in the printable area
when "PageSize" is set to A4.
Setting value are "On" or "Off".
When set to "On", the length of short edge is 203.2mm.
When set to "Off", the length of short edge is 201.5mm.
This item is valid only when LJ4 Mode are selected.

$1Source Symbol Set (Only LJ4 Mode)
This option sets the replacement source Symbol Set
value transmitted from the application.

$1Destination Symbol Set (Only LJ4 Mode)
This option sets the replacement destination Symbol
Set value in the printer.

$1Skip Blank Page
Selects whether the blanked page is printed.
Value
	On 	:Not print out the blanked page when
	   	 FF(Form Feed)executes with no print
	   	 data.
	Off	:Print out the blanked page every time
	   	 FF(Form Feed) is on.

$1MP Mode
When paper source setting is "Auto" or it is not 
specified, decides the priority order of paper
sources.

Value
	Normal	:MP  > LC1(MP Tray is prioritized)
	Last  	:LC1 > MP(Lower Cassette is prioritized)

$1Auto Eject Page
Sets whether or not paper is output when the time-out
is reached, according to the Timeout setting in the 
Printer Setup menu.
Default setting is off so paper is not printed even
if the time-out is reached.

$1MP Type
Allows you to specify the type of paper used when printing from
the MP tray. The available options are Plain (default),
Letterhead, Recycled, Color, Transparency, and Labels.

$1LC Type
Allows you to specify the type of paper used when printing from
the optional 500-Sheet Lower Paper Cassette Unit A4. The
available options are Plain(default), Letterhead,Recycled, and
Color.

$1Duplex
Sets whether perform the duplex printing or not.
The setting are "On" and "Off" .Set to "On" to choose duplex.

$1Binding
Specifies the binding direction when performing duplex printing.
Setting are "Long Edge" and "Short Edge".
When "Long Edge" is selected longitudinal direction becomes
the binding margin.
When "Short Edge" is selected vertical direction becomes the 
binding margin.

$1Start Page
Specifies whether to print first front or back side of page first
when duplex print is selected.
When "Front" is selected duplex printing starts with the front side
of the page.
When "Back" is selected duplex printing starts with the back side
of the page.

$1Top Offset B
Adjusts the vertical printing position on the back of the paper
when printing on both sides. Use this if the printout on the back
is not where you expected.

$1Left Offset B
Adjusts the horizontal printing position on the back of the paper
when printing on both sides. Use this if the printout on the back
is not where you expected.

# Type
Using Type, you can set font related items.
The printer driver can also make these settings;
the driver's settings override the Remote Control
Panel settings.
This option is valid only in LaserJet 4 Mode.

$1Typeface
This item selects any typeface available in the
printer, including built-in, download Font DIMM
typefaces.

$1Point Size or Pitch
This item selects the character point size or the
pitch of fixed-pitch characters.

$1Symbol Set
This item selects a symbol set from those available
for the typeface you selected.

# Others
Using others, you can set up your printer to operate
in GL2,PS3,ESCP2,FX or I239X Mode emulation.

$1GL-Mode(Only GL2 Mode)
Select operational mode.
Value
	LJ4GL2	:LJ4-GL2 Mode
	GLlike	:GL-like Mode

$1Scale(Only GL2 Mode)
Select scale of reduced printing.
Value
	OFF	:No reduction
	A0,A1,A2,A3
	   	:Reduces from paper size specified by
	   	 scale to the Page Size set in the
	   	 Page Setup menu.

$1Origin(Only GL2 Mode)
Sets the position of the plotter-unit origin
Value
	Corner	:Lower left corner
	Center	:Center

$1Pen(Only GL2 Mode)
Selects the default pen.
Pen0 is white.
Pen1 - Pen6 are black.

Note that if you set the Pen=2 - 6 before changing into
GL-Mode = GLlike mode, the default will switch to Pen=1
at the time of the change.

$1End(Only GL2 Mode)
Selects line-end processing.
Value
	Butt      	:Butt End
	Square    	:Square End
	Triangular	:Triangular End
	Round     	:Round End

$1Join(Only GL2 Mode)
Selects join processing.
For details, refer to the LaserJet 4 Mode Software
specifications.
Value
	Mitered       	:Mitered Join
	Miteredbeveled	:Mitered and Beveled Join
	Triangular    	:Triangular Join
	Round         	:Round Join
	Beveled       	:Beveled Join
	None          	:No Join

$1Pen0.Pen1,Pen2,Pen3,Pen4,Pen5,Pen6(Only GL2 Mode)
Sets default width for each pen, in 0.05 mm
increments.

$1ERR SHEET(Only PS3 Mode)
Specifies whether the printer prints an Post Script
error message when an error occurs.
If ERR SHEET is Off, the error message is displayed
on the printer's control panel but is not printed.
If ERR SHEET is On, an error sheet is printed when
the error occurs.
This feature can be convenient for programmers
using a non-bi-directional parallel interface.

$1Condensed(Only ESCP2, FX Mode)
Select normal/condensed character size.
When set to Off, selects normal character size.
When set to On, selects condensed character size.

$1T Margin(Only ESCP2, FX, I239X Mode)
Sets/displays the distance between the top of the
page and the baseline position of first line of
printing.

$1Text(Only ESCP2, FX, I239X Mode)
Sets or display the lines-per-page value.
The calculation always assumes that line height is
1/6 inch, regardless of the current line-height
setting.

$1Auto CR(Only ESCP2, FX, I239X Mode)
Allows you to use the automatic carriage return
option to perform a carriage-return line-feed
(CR-LF) operation whenever the print position
exceeds the right margin.
If Auto CR is off, the printer does not print
characters beyond the right margin, and it does
not perform a line wrap until it receives a CR.
Most application programs take care of this 
function.

$1Auto LF(Only ESCP2, FX, I239X Mode)
Switches CR(carriage return) command function.
When set to Off, printer considers that only
CR(carriage return) command was sent.
When set to On, printer considers that only CR
(carriage return) +  LF(Line Feed) command were
sent.

$1Bit Image(Only ESCP2, FX, I239X Mode)
Selects bit image.
When Dark is selected, emulates the resolution of
bit image correctly. High density.
When Light is selected, emulates the resolution of
bit image correctly. Low density.
When BarCode is selected, used in image printing of
barcode. 

$1Zero Char(Only ESCP2, FX, I239X Mode)
Selects a zero character. "/"(slash) of character
"0" does not exist.
Selects a slashed zero character. "/"(slash) of
character "0" does exist.

$1Alt.Graphics (Only I239X Mode)
Alt.Graphics is an abbreviation of Alternate Graphics
Mode which enables the command function
equivalent to EPSON LQ/570, LQ/1070. Alt.Graphics
can be set on the panel, but cannot be set by a
command.
When set to Off, not support EPSON Mode.
When set to on, supports EPSON Mode.

$1Character Set (Only I239X Mode)
Defines the upper control code.
When sets to 1,specifies the character codes 80h to 9Fh
as control code 00h to 1Fh.
When sets to 2,specifies the character codes 80h to 9Fh
as normal characters.

$1Font(Only ESCP2, FX, I239X Mode)
Sets the user-default Typeface.

$1Pitch(Only ESCP2, FX, I239X Mode)
Selects alphanumeric character size.

# PrinterSetup
In this category, you can set items that affect
printer performance. The printer driver can set most
of these settings; the driver's settings override
the Remote Control Panel settings.

$1Page Protect
The printer allocates enough memory to produce
the entire page image for the paper size selected
in this item. The options are On and Auto.
However, the Auto setting is sufficient for 
most print jobs.

$1Resolution
This item switches the resolution between 300 and 
1200dpi.
However, 1200 dpi resolution is only available in
PS3 mode. 

$1RITech
RITech (Resolution Improvement Technology)
produces smoother and crisper lines, text, and
graphics. If you change this setting, you can check
the print quality by printing a Status Sheet.

$1Density
Use this option to adjust the print density if your
print is too light or too dark.

$1Auto Continue
This item permits the printer to automatically
continue printing after an error occurs. When this
option is off, you must press the Continue button
to resume printing. In most cases, you should leave
this option set to Off.

$1Toner Save Mode
Use this option to reduce the amount of toner that
your printer uses on each page by up to 50 percent.
The Toner Save Mode can be used as a draft mode
to extend the life of your toner cartridge.

$1Image Optimum
Use this option to print complex graphics with
limited printer memory. If your page requires more
memory to print than you have available in your
printer, the printer will use Image Optimum to make
very small modifications to the image to form it
within available printer memory.

$1Tray Assign(Only LJ4 Mode)
Changes the assignment for the paper source select
command(ESC&L#H).
When 4 is selected the commands are as compatible
with the HP LaserJet 4.
When 4K is selected the commands are set as compatible
with the HP LaserJet 4000,5000, and 8000.
When 5S is selected the commands are set as compatible
with the HP LaserJet 5S.

$1MP Tray Size
Specify the paper size of Multi Purpose Tray.
Value Same as Page size value of Page Setup menu except
from CTM.

$1Paper Type
Specifies the paper type for the better printing result.
Select a setting of follows for the paper to be used.
Value
	Normal 	: Normal paper
	Thick W	: Thick paper
	Thick N	: Thick and narrow paper like an envelope.
	Trnsprnc: OHP sheets

$1Dot Correction
When resolution is set to 1200dpi, the printing pattern
of 1 dot lines is corrected to improve appearance.

$1Toner Out
Specify printer operation when "Toner Out" error occurs.
Value
	Continue:
		 Printer does not produce "Toner Out" error
		 and continues printing when measurement of
		 Toner counter reaches to the level where 
		 "Toner Out" error occurs.
		 This setting does not influence to 
		 "Toner Low" warning.
		 This parameter is Factory default.
		 It is recommended to set to Continue when 
		 the printer is located at distant place
		 (network printer etc.) and user cannot see 
		 his printouts soon.
	Stop:
		 "Toner Out" error occurs when the measurement
		 of Toner counter reaches to the level where 
		 "Toner Out" error occurs.
		 Refer to Page printer basic specifications 
		 for the following operations.

# More
In this category, you can set the following items;

$1Top Offset
Allows you to adjust the vertical printing position
on the page. The setting is in millimeter.
You can raise or lower the printing position
by 0.5mm step(the settings are from -99 to 99).

$1Left Offset
Allows you to adjust the horizontal printing position
on the page. The setting is in millimeter.
You can move to left or right the printing position 
by 0.5mm step(the settings are from -99 to 99).

$1Sleep Mode
Enables or disables Sleep Mode. 
Value
	Enable 	:Sleep Mode is valid.
	Disable	:Sleep Mode is invalid.

$1Timeout
If the printer receives no data for some period
which specified in Timeout, the printer feeds paper
automatically and if I/F or Language is changed,
printer mode will be moved to the default mode.
Timeout will be set 0 or within 5-300 sec (1sec step).
When sets to 0, it means no timeout.

$1Paper Size Ignore
Enables or disables "Paper Set..." error and
"Check Paper Size".
When sets to On, above status are ignored.
When sets to Off, above status are detected.

$1Country (Only ESCP2, FX Mode)
Selects international characters.

$1CG Table (Only ESCP2, FX Mode)
Selects character set table.

$1Code Page (Only I239X Mode)
Selects code pages.

# PortSelection
$1Prallel I/F,USB I/F,AUX I/F
Only interfaces that are set to "On" by the panel setting can be
used by the automatic selection.
All interfaces are set to "On" at the factory default setting.
When used a fixed interface, set "On" only for the interface
which to be used.

Changes to the interface setting will be effective after the
Reset All is performed or the power is turned on again.
If "Off" is set to all interfaces, they are reset to "On"
after the Reset All is performed or the power is turned on
again.(It is not allowed to set "off" to all interfaces)

The RCP will always attempt to communicate with the printer
using the host interface that was set up at the time the
RCP program was installed.
if the user changes the interface settings at the panel, the
RCP may lose the ability to communicate with the printer.

$1Parallel
This menu sets various kinds of parallel interface
setting.

Value
	Speed      	:Compatibility mode of the parallel
	           	 interface; specifies the pulse of
	           	 the Acknlg-signal when receiving
	           	 in Nibble mode.
	Bi-D       	:Enables or disables bi-directional
	           	 communication mode.
	Buffer Size	:Sets the size of the receiving
	           	 buffer.

$1USB
This menu sets various kinds of serial interface
setting.

Value
	Buffer Size	:Sets the size of the receiving
	           	 buffer.

$1AUX
Specifies the receiving buffer of the option interface.
This setting is displayed only when the Type-B I/F is
installed.

Value
	Buffer Size	:Sets the size of the receiving
	           	 buffer.

# Emulation
Sets the user default emulation language for each port.
Auto is IES(Intelligent Emulation Switch) mode.

$1Parallel
Specifies the user default emulation language of printing
data to be transferred to parallel interface.
value
	LaserJet 4	:Selects LJ4 Mode
	GL2       	:Selects EPSON GL/2 Mode
	PS3      	:Selects PostScript Mode
	ESCP2     	:Selects Stylus800/1000 Mode
	FX        	:Selects FX-880/LX-100 Mode
	I239X     	:Selects I2390/2391 Plus Mode
	Auto      	:Selects a language automatically


$1USB
Specifies the user default emulation language of printing
data to be transferred to USB interface.

$1AUX
Specifies the user default emulation language of printing
data to be transferred to Type-B option interface.
