Copyright: Copyright © 2000-2001 Kyocera Corporation Copyright © 2000-2001 Kyocera Mita Corporation     KX Help 1.0
Citation: Copyright © 2000-2001 Kyocera Corporation Copyright © 2000-2001 Kyocera Mita Corporation      All Rights Reserved


 Register Medien

Mit dem Register Medien können Sie Größe, Quelle und Ausrichtung der gedruckten Seite angeben und auf weitere Materialeinstellungen zugreifen.

Das Register Medien enthält folgende Optionen:

Seitengröße	Quelle
Benutzerdefinierte Papiergrößen	Medienart
Druckformat	Erweiterte Materialeinstellungen
Ausrichtung	3D-Bild


 Seitengröße

Damit können Sie ein Papier- oder Umschlagformat für Ihren Druckauftrag aus der angezeigten Liste auswählen. Die angezeigten Auswahlmöglichkeiten hängen von den für die ausgewählte Papierquelle unterstützten Papiergrößen ab. Es werden z. B. keine Umschlagformate angezeigt, wenn die Papierquelle auf Kassette 1 eingestellt ist, weil Kassetten Umschläge nicht unterstützen. Umschläge können dem Drucker nur über die Mehrzweckzufuhr zugeführt werden.

Unterstützte Seitengrößen für die interne Standardkassette

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Papierzufuhr (Kassette 2)

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Mehrzweckzufuhr

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B6, B5 (ISO), Envelope #10, Envelope #9, Envelope Monarch, Envelope #6, Envelope C5, Envelope DL, Spezial

Siehe auch

Register Medien

Benutzerdefinierte Papiergrößen

Druckformat

Ausrichtung

Quelle

Medienart

Erweiterte Materialeinstellungen


 Benutzerdefinierte Papiergrößen

Damit können Sie benutzerdefinierte Seitenabmessungen erstellen, diese umbenennen und für die spätere Verwendung speichern. Nach der Erstellung kann eine benutzerdefinierte Papiergröße unter den Einstellungen Seitengröße im Register Medien ausgewählt werden.

Obgleich im Treiber nicht beschränkt, unterstützt der Drucker benutzerdefinierte Papiergrößen für die Mehrzweckzufuhr von mindestens 70 x 148 mm (2,8 x 5,8 Zoll) bis zu max. 216 x 297 mm (8,5 x 11,7 Zoll). Die Kassetten unterstützen ein benutzerdefinierte Papierformate von mind. 148 x 210 mm (5,8 x 8,3 Zoll) und max. 216 x 297 mm (8,5 x 11,7 Zoll).

Die Einheit (Zoll oder Millimeter) wird im Dialogfeld Benutzereinstellungen ausgewählt.

Benutzerdefinierte Papiergröße festlegen, umbenennen und löschen

Siehe auch

Register Medien	Medienart
Seitengröße	Erweiterte Materialeinstellungen
Druckformat	Register Geräteeinstellungen
Ausrichtung	Benutzereinstellungen
Quelle


Benutzerdefinierte Papiergröße festlegen, umbenennen und löschen

So stellen Sie eine benutzerdefinierte Papiergröße ein:

1.	Klicken Sie auf die Schaltfläche Spezial…, um das Dialogfeld Benutzerdefinierte Papiergröße zu öffnen.

2.	Klicken Sie auf die Schaltfläche Hinzufügen…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.

3.	Geben Sie unter Namen einen Namen für die benutzerdefinierte Größe ein. Er darf bis zu 31 Zeichen lang sein.

4.	Wählen Sie unter Größe die gewünschte Höhe und Breite.

5.	Klicken Sie auf OK.

6.	Klicken Sie im Dialogfeld Benutzerdefinierte Papiergrößen auf OK.

Die benutzerdefinierte Größe wird als Option Seitengröße verfügbar, wenn als Quelle Autom. Quellenauswahl oder Mehrzweckzufuhr ausgewählt wird.

So benennen Sie eine benutzerdefinierte Papiergröße um:

1.	Klicken Sie auf die Schaltfläche Spezial…, um das Dialogfeld Benutzerdefinierte Papiergröße zu öffnen.

2.	Wählen Sie den Namen, den Sie umbenennen möchten.

3.	Klicken Sie auf die Schaltfläche Bearbeiten…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.

4.	Geben Sie unter Name einen neuen Namen anstelle des alten ein.

5.	Klicken Sie auf OK.

6.	Klicken Sie im Dialogfeld Benutzerdefinierte Papiergrößen auf OK.

Die umbenannte benutzerdefinierte Größe wird als Option Seitengröße verfügbar, wenn als Quelle Autom. Quellenauswahl oder Mehrzweckzufuhr ausgewählt wird.

So löschen Sie eine benutzerdefinierte Papiergröße:

1.	Klicken Sie auf die Schaltfläche Spezial…, um das Dialogfeld Benutzerdefinierte Papiergröße zu öffnen.

2.	Wählen Sie unter Name die Größe, die Sie löschen möchten.

3.	Klicken Sie auf Entfernen und dann auf Ja.

4.	Klicken Sie auf OK.


 Druckformat

Damit können Sie die Größe der Druckausgabe im Verhältnis zur ausgewählten Seitengröße steigern oder verringern. Druckformat und Seitengröße verwenden die gleichen Größenauswahlmöglichkeiten.

•	Um der ausgewählten Seitengröße zu entsprechen, wählen Sie Genau wie die Seitengröße.

Beispiel: Falls unter Seitengröße A4 angezeigt wird, wird A4 nicht unter Druckformat angezeigt. Um der Größe zu entsprechen, wählen Sie Genau wie die Seitengröße.

•	Um eine andere Größe als die Seitengröße zu drucken, wählen Sie die gewünschte Größe im Dropdown-Menü aus. Für jede Option zeigt das Menü den skalierenden Prozentsatz im Verhältnis zur ausgewählten Seitengröße an.

Beispiel: Falls in Seitengröße Letter angezeigt wird und Sie Executive (84 %) in Druckformat auswählen, misst der Ausdruck 7,25 x 10,5 Zoll, nicht 8,5 x 11 Zoll.

Unterstützte Druckformate

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B6, B5 (ISO), Envelope #9, Envelope #10, Envelope Monarch, Envelope #6, Envelope C5, Envelope DL, Spezial

Siehe auch

Register Medien	Medienart
Seitengröße	Erweiterte Materialeinstellungen
Benutzerdefinierte Papiergrößen	Register Layout
Ausrichtung	Skalierung
Quelle


 Ausrichtung

Gibt an, wie Daten auf der gedruckten Seite positioniert sind.

Die Einstellung Hochformat druckt die Daten auf einer Seite, bei der die Papierhöhe größer als die –breite ist, die Einstellung Querformat druckt die Daten auf einer Seite, deren Papierbreite größer als die Papierhöhe ist.

Mit 180°-Drehung können Sie die Daten auf der gedruckten Seite um 180 Grad drehen.

Siehe auch

Register Medien

Seitengröße

Benutzerdefinierte Papiergrößen

Druckformat

Quelle

Medienart

Erweiterte Materialeinstellungen


 Quelle

Damit können Sie auswählen, woher das Papier für Ihren Druckauftrag kommt (Kassette, Mehrzweckzufuhr). Die Einstellung Autom. Quellenauswahl wählt die erste verfügbare Quelle, die der Papiergröße des Auftrags entspricht.

Unterstützte Seitengrößen für die interne Standardkassette

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Papierzufuhr (Kassette 2)

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Mehrzweckzufuhr

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B6, B5 (ISO), Envelope #10, Envelope #9, Envelope Monarch, Envelope #6, Envelope C5, Envelope DL, Spezial

Siehe auch

Register Medien

Seitengröße

Benutzerdefinierte Papiergrößen

Druckformat

Ausrichtung

Medienart

Erweiterte Materialeinstellungen


 Medienart

Damit können Sie anhand der Medienart oder einer benutzerdefinierten Medienart auswählen, woher das Papier für Ihren Druckauftrag kommt. Die Einstellung Automatische Medienauswahl wählt die erste verfügbare Quelle, die der Medienart und Papiergröße des Auftrags entspricht.

Unterstützte Medienarten für Kassetten

Normalpapier, Vordrucke, Feinpapier, Recycling, Grob, Letter Head, Farbig, Gelocht, Spezial 1-8

Unterstützte Medienarten für die Mehrzweckzufuhr

Normalpapier, Overheadfolien, Vordrucke, Etiketten, Feinpapier, Recycling, Transparent, Grob, Letter Head, Farbig, Gelocht, Umschlag, Karton, Spezial 1-8

Siehe auch

Register Medien

Seitengröße

Benutzerdefinierte Papiergrößen

Druckformat

Ausrichtung

Quelle

Erweiterte Materialeinstellungen


 Erweiterte Materialeinstellungen

Damit können Sie den Auftrag mit einem leeren oder bedruckten Deckblatt versehen (Deckblatt-Modus), ein Trennblatt zwischen Seiten einfügen (Seiteneinfügung) oder ein Folien-Zwischenblatt einfügen (Folien-Zwischenblatt). Die erweiterten Materialeinstellungen stehen nicht zur Verfügung, wenn PCL 5e als Seitenbeschreibungssprache oder wenn Beidseitiger Druck (Manueller Duplex-Druck) im Register Layout ausgewählt wird.

Deckblatt-Modus

Deckblatt-Modus erstellt ein vorderseitiges oder vorder- und rückseitiges Deckblatt mit dem Druckauftrag. Das Material für das Deckblatt stammt aus einer anderen Quelle als das des Druckauftrags. Das Deckblatt kann also eine andere Medienart haben, z. B. schwerer sein oder eine andere Farbe haben. Folien-Zwischenblatt steht nicht zur Verfügung, wenn der Deckblatt-Modus ausgewählt wurde.

Deckblatt-Modus verwenden

Seiteneinfügung

Seiteneinfügung fügt zwischen einer ausgewählten Anzahl gedruckter Seiten ein Trennblatt. Die Medien für die Einfügung können z. B. eine andere Farbe haben. Die Einfügung trennt die Hauptabschnitte eines Dokuments. Folien-Zwischenblatt steht nicht zur Verfügung, wenn der Seiteneinfügung ausgewählt wurde.

Seiteneinfügung verwenden

Folien-Zwischenblatt

Folien-Zwischenblatt fügt ein Unterblatt zwischen gedruckten Folien ein. Ein Unterblatt wird auch als Zwischenblatt bezeichnet und hilft, Folien sauber zu halten. Außerdem verhindert es, dass Folien aneinander haften. Auf das Unterblatt können die gleichen Daten gedruckt werden wie auf die Folie. Diese Funktion steht nur zur Verfügung, wenn Folie als Medienart ausgewählt wurde. Deckblatt-Modus und Seiteneinfügung stehen nicht zur Verfügung, wenn Folien-Zwischenblatt ausgewählt wurde.

Folien-Zwischenblatt verwenden

Zurücksetzen

Klicken Sie auf Zurücksetzen, um alle Funktionen der erweiterten Materialeinstellungen zu deaktivieren.

Siehe auch

Register Medien	Medienart
Seitengröße	Register Layout
Benutzerdefinierte Papiergrößen	Manueller Duplex-Druck
Druckformat	Register Geräteeinstellungen
Ausrichtung	Benutzereinstellungen
Quelle


Deckblatt-Modus verwenden

So versehen Sie einen Druckauftrag mit einem vorder- und rückseitigen Deckblatt:

1.	Klicken Sie im Register Medien auf Einstellungen….

2.	Wählen Sie im Dialogfeld Erweiterte Materialeinstellungen die Option Deckblatt-Modus.

3.	Wählen Sie Vorderseite, um nur ein vorderseitiges Deckblatt zu verwenden, oder Vorder- und Rückseite, um sowohl am Anfang wie am Ende des Druckauftrags ein Deckblatt zu verwenden.

4.	Wählen Sie unter Drucken auf eine der verfügbaren Druckoptionen:

•	Wird Beidseitiger Druck (Manueller Duplex-Druck) im Register Layout deaktiviert und Vorderseite für den Deckblatt-Modus gewählt, steht nur Vorderseite außen zur Verfügung.

•	Wird Beidseitiger Druck (Manueller Duplex-Druck) im Register Layout deaktiviert und Vorder- und Rückseite für den Deckblatt-Modus gewählt, steht nur Vorderseite außen und Rückseite innen zur Verfügung.

•	Wird Beidseitiger Druck (Manueller Duplex-Druck) im Register Layout gewählt und Vorderseite für den Deckblatt-Modus gewählt, steht Vorderseite außen und Vorderseite innen zur Verfügung.

•	Wird Beidseitiger Druck (Manueller Duplex-Druck) im Register Layout gewählt und Vorder- und Rückseite für den Deckblatt-Modus gewählt, stehen alle Optionen für Drucken auf Verfügung.

5.	Wählen Sie eine Option von der Liste Medien für Deckblatt aus und legen Sie Deckblattmaterial in die gewählte Quelle ein.

6.	Klicken Sie im Dialogfeld Erweiterte Medieneinstellungen auf OK.


Seiteneinfügung verwenden

So fügen Sie ein Trennblatt in das Dokument ein:

1.	Klicken Sie im Register Medien auf Einstellungen….

2.	Wählen Sie im Dialogfeld Erweiterte Materialeinstellungen die Option Seiteneinfügung.

3.	Geben Sie in Einfügen vor Seiten die Seitenzahlen der Seiten ein, vor denen die Einfügungen stattfinden sollen. Trennen Sie die Seitenzahlen mit Kommata. Geben Sie einen Seitenbereich mit einem Bindestrich zwischen den Anfangs- und Endseitenzahlen im Bereich ein. Um z. B. Einfügungen vor den Seiten 5, 11, 12, 13 und 18 einzufügen, geben Sie 5, 11-13, 18 ein.

4.	Wählen Sie die Quelle für die Einfügung aus der Liste Medien für Seite aus.

5.	Wählen Sie Auf Vorderseite drucken, um die Einfügungen ebenfalls zu bedrucken.

Wird diese Option markiert, wird jedes eingefügte Blatt mit Daten bedruckt, die seine Position im gesamten Druckauftrag wiedergeben. Eine Einfügung zwischen den Seiten 9 und 10 wird z. B. mit Auf Vorderseite drucken als Seite 10 gedruckt.

6.	Klicken Sie im Dialogfeld Erweiterte Medieneinstellungen auf OK.


Folien-Zwischenblatt verwenden

Folien-Zwischenblatt erfordert, dass der Deckblatt-Modus und Seiteneinfügung deaktiviert sind.

So fügen Sie Blätter zwischen Folien ein:

1.	Wählen Sie im Register Medien die Option Autom. Quellenauswahl oder Mehrzweckzufuhr unter Quelle.

2.	Wählen Sie unter Medienart die Option Folie.

3.	Klicken Sie auf Einstellungen....

4.	Wählen Sie im Dialogfeld Erweiterte Materialeinstellungen die Option Folien-Zwischenblatt.

5.	Wählen Sie die Quelle für das Unterblatt aus der Liste Medien für Unterblatt aus.

Ein Unterblatt ist die Papiereinfügung, die verhindert, dass zwei Folien aneinander haften.

6.	Wählen Sie Auf Unterblatt drucken, den Druck der gleichen Daten wie auf der Folie.

Der Druck auf das Unterblatt kann dazu verwendet werden, Sie durch eine Präsentation zu führen oder gelesen werden, während die Folie projiziert wird.

7.	Klicken Sie im Dialogfeld Erweiterte Medieneinstellungen auf OK.


 Register Layout

Mit dem Register Layout können Sie eine Auswahl zum Druck mehrerer Seiten auf einem Blatt oder zur Einstellung der Skalierung sowie zum Bedrucken beider Seiten des Blattes treffen.

Das Register Layout enthält folgende Optionen:

Seiten pro Blatt

Skalierung

Bundstegeinstellungen

Manueller Duplex-Druck

3D-Bild


 Seiten pro Blatt

Damit können Sie mehrere Seiten auf einem Blatt in Gruppen von 1, 2, 4, 6, 9, 12, 16 oder 25 Seiten drucken.

Mit Umrandung drucken können Sie jede Seite auf einem Blatt mit einer Umrandung versehen.

Mit Layout können Sie die Reihenfolge, in der die Seiten auf einem Blatt angeordnet werden, einstellen.

Für Anwendungen wie PageMaker, Acrobat und CorelDraw, sollten die KPDL-Einstellungen für Erlaube Datendurchlass gelöscht werden, wenn mehrere Seiten pro Blatt verwendet werden. Die Ausgabeergebnisse werden durch die reduzierte Kapazität zum Drucken von Bitmaps und Bildern möglicherweise beeinträchtigt.

Siehe auch

Register Layout

Skalierung

Bundstegeinstellungen

Manueller Duplex-Druck

Benutzereinstellungen


 Skalierung

Skalierung ändert Höhe und Breite der Seite um den ausgewählten Prozentsatz. Der Skalierungsbereich liegt zwischen 20 und 500 %.

Siehe auch

Register Layout

Seiten pro Blatt

Bundstegeinstellungen

Manueller Duplex-Druck

Register Medien

Druckformat


 Bundstegeinstellungen

Damit können Sie den Bundsteg (freier Platz) links auf dem gedruckten Blatt einstellen, indem Sie Text und Grafiken proportional reduzieren. Mit dem größeren Bundsteg, der durch Verschieben des Druckbereichs nach rechts um bis zu 25,4 mm erzielt wird, ist eine Broschüre oder gelochte Seite einfacher zu lesen. Bei Verwendung im Duplexdruck wird der vergrößerte Bundsteg gleichmäßig auf beiden Seiten des Blattes ausgerichtet.

Die Einheit (Zoll oder Millimeter) wird im Dialogfeld Benutzereinstellungen ausgewählt.

Klicken Sie auf Bundstegeinstellungen..., um das Dialogfeld Bundstegeinstellungen zu öffnen. Wählen Sie einen Wert zwischen 0,20 und 1,00 Zoll (5,0 und 25,4 mm) aus oder geben Sie ihn ein und klicken Sie dann auf OK.

Siehe auch

Register Layout

Seiten pro Blatt

Skalierung

Manueller Duplex-Druck

Register Geräteeinstellungen

Benutzereinstellungen


 Manueller Duplex-Druck

Aktiviert den Druck auf beiden Seiten eines Blattes, indem der Druckauftrag so ausgeführt wird, dass nach dem Drucken der ersten Hälfte des Auftrags der Auftrag gewendet und von der Kassette erneut zugeführt werden kann, um die zweite Seite zu drucken. Manueller Duplex-Druck steht nicht zur Verfügung, wenn im Dialogfeld Erweiterte Materialeinstellungen, auf das über das Register Medien zugegriffen wird, Einstellungen vorgenommen wurden.

So verwenden Sie den Manuellen Duplex-Druck:

•	Der Drucker muss auf einem lokalen Port installiert sein.

•	Für Quelle muss Kassette 1 oder Kassette 2 ausgewählt sein.

Wählen Sie im Register Layout die Option Beidseitiger Druck (Manueller Duplex-Druck).

Die Einstellungen An Längsseite wenden und An Schmalseite wenden beziehen sich darauf, an welcher Seitenkante die Seite gedreht werden soll, um die Daten auf der anderen Seite richtig anzuzeigen. Bei der Einstellung An Längsseite werden wird die lange Kante der Seite gedreht, um die Daten korrekt anzuzeigen, während bei An Schmalseite wenden die kurze Kante gedreht wird.

Beidseitiger Druck mit manuellem Duplex-Druck

Unterstützte Seitengrößen für den manuellen Duplex-Druck

Letter, Legal, A4, A5, B5 (JIS)

Siehe auch

Register Layout

Seiten pro Blatt

Skalierung

Bundstegeinstellungen

Register Medien

Quelle

Erweiterte Materialeinstellungen


Beidseitiger Druck mit manuellem Duplex-Druck

So bedrucken Sie beide Seiten:

1.	Wählen Sie im Register Medien Kassette 1 oder Kassette 2 (falls installiert).

2.	Wählen Sie im Register Layout die Option Beidseitiger Druck (Manueller Duplex-Druck).

3.	Wählen Sie An Längsseite wenden oder An Schmalseite wenden.

4.	Wählen Sie Anleitungen drucken, um ein Anleitungsblatt auszudrucken. Folgen Sie den gedruckten Anweisungen zum Platzieren der Seiten in der Kassette, nachdem die erste Seite bedruckt wurde.

ODER

Löschen Sie Anleitungen drucken und folgen Sie den Schritten 5-7.

5.	Klicken Sie im Dialogfeld Eigenschaften und Drucken auf OK.

Die Seiten mit geraden Seitennummern werden gedruckt.

6.	Wenn der Druckvorgang stoppt, nehmen Sie alle gedruckten Blätter aus dem Ausgabefach.

•	Wurde An Längsseite wenden gewählt, drehen Sie den Stapel an der Längsseite um und geben Sie die Seiten in die Kassette.

•	Wurde An Schmalseite wenden gewählt, drehen Sie den Stapel an der Schmalseite um und geben Sie die Seiten in die Kassette.

7.	Klicken Sie im Dialogfeld Anleitung für manuellen Duplexbetrieb auf OK.

Die Seiten mit ungeraden Seitennummern werden gedruckt.


 Register Bildbearbeitung

Mit dem Register Bildbearbeitung können Sie das Aussehen von Text und Bildern in einem Druckauftrag durch Einstellen der Druckqualität, Graustufeneinstellungen und Herunterladen von Schriften ändern.

Das Register Bildbearbeitung enthält folgende Optionen:

Druckqualität

Graustufeneinstellung

TrueType-Optionen

3D-Bild


 Druckqualität

Legt die Auflösung des Druckauftrags in Punkten pro Zoll (Dots per Inch oder dpi) fest. Höhere Einstellungen führen zu einer höheren Auflösung und detaillierteren Druckbildern.

•	Die Einstellung Hohe Qualität erstellt einen hoch auflösenden, detaillierten Ausdruck für Text und Grafiken.

•	Die Einstellung Andruck mindert die Bildqualität, erhöht jedoch die Druckgeschwindigkeit.

•	Die Einstellung Entwurf reduziert die Tonermenge, die auf der gedruckten Seite aufgetragen wird und verlängert die Lebensdauer der Tonerkartusche, was sowohl ökonomisch als auch ökologisch von Vorteil ist. Weil die Tonersättigung reduziert wird, erscheinen das ganze Bild, Text Grafiken heller auf dem gedruckten Auftrag.

•	Wählen Sie Spezial…, um weitere Einstellungen der Druckqualität anzuzeigen. Klicken Sie auf die Schaltfläche, um das Dialogfeld Druckqualität-Einstellungen zu öffnen. Wählen Sie dann aus weiteren Einstellungen unter Auflösung, Kyocera Image Refinement und EcoPrint aus.

Auflösung

•	Die Einstellung 1200 dpi Schnell simuliert die Ausgabe bei 1200 dpi, was die Auflösung von Bildern im Vergleich zu einer Einstellung von 600 dpi erhöht, und bietet eine schnellere Geschwindigkeit als 1200 dpi. Zwischen Schnell 1200 dpi und 600 dpi besteht für Text und Vektorgrafiken kein Unterschied.

•	Die Einstellung 600 dpi erstellt einen hoch auflösenden, detaillierten Ausdruck für Text und Grafiken.

•	Die Einstellung 300 dpi mindert die Bildqualität, erhöht jedoch die Druckgeschwindigkeit.

Kyocera Image Refinement

Kyocera Image Refinement wird auch als Anti-Alias bezeichnet und ist eine Hardware-basierte Funktion, die die Kanten von Text- und Vektorgrafiken glättet. Die Standardeinstellung ist Ein.

EcoPrint

EcoPrint reduziert die Tonermenge, die auf der gedruckten Seite aufgetragen wird und verlängert die Lebensdauer der Tonerkartusche, was sowohl ökonomisch als auch ökologisch von Vorteil ist. Weil die Tonersättigung reduziert wird, erscheinen das ganze Bild, Text Grafiken heller auf dem gedruckten Auftrag. EcoPrint erhöht die Druckgeschwindigkeit nicht.

Siehe auch

Register Bildbearbeitung

Graustufeneinstellung

TrueType-Optionen


 Graustufeneinstellung

Damit können Sie das Aussehen des Grafikbildes Ihres Druckauftrags durch Steuern des Graustufenspektrums anpassen. Die Graustufeneinstellungen sind nützlich, wenn Ihre Grafikbilder zu hell, zu grau oder zu dunkel gedruckt werden. Text wird von den Graustufeneinstellungen nicht betroffen.

Mit der Einstellung Helligkeit können Sie die Grafikbilder Ihres Druckauftrags heller oder dunkler machen. Eine hohe Helligkeitseinstellung macht das Graustufenspektrum heller, eine niedrige macht es dunkler. Die Einstellung der Helligkeit ist nützlich, wenn Grafikbilder zu dunkel oder zu hell gedruckt werden. Text wird von der Helligkeitseinstellung nicht betroffen.

Mit der Einstellung Kontrast können Sie die Graustufen zwischen schwarz und weiß für die Grafikbilder Ihres Druckauftrags einstellen. Eine hohe Kontrasteinstellung verringert die Graustufen, wodurch helle Grautöne heller und dunkle Grautöne dunkler gemacht werden. Eine niedrige Kontrasteinstellung erhöht die Graustufen, wodurch helle Grautöne dunkler und dunkle Grautöne heller gemacht werden. Die Einstellung des Kontrasts ist nützlich, wenn Grafikbilder zu grau oder zu schwarzweiß gedruckt werden. Text wird von der Kontrasteinstellung nicht betroffen.

Siehe auch

Register Bildbearbeitung

Druckqualität

TrueType-Optionen


 TrueType-Optionen

Damit können Sie angeben, wie TrueType-Schriftarten an den Drucker gesendet werden. Die Methode wirkt sich auf die Geschwindigkeit aus, mit der Ihr Druckauftrag erstellt wird und kann Fontdruckprobleme lösen.

Wählen Sie TrueType als Umriss-Schrift laden, um die Dateigröße zum Drucken eines großen Dokuments zu verringern, v. a. wenn es mehrere Fonts oder Fontgrößen enthält. Dies ist die Vorgabeeinstellung.

Wählen Sie für einen Druckauftrag mit weniger Fonts und ähnlichen Fontgrößen TrueType als Bitmap-Schrift laden. Die Dateigröße wird dann allerdings gesteigert. Diese Auswahl ist für ältere Betriebssysteme nützlich (Windows 3.x, 9x), die weniger TrueType-Schriftarten bieten.

Wählen Sie in den folgenden Fällen Durch Geräteschriftarten ersetzen:

•	Falls der Druckauftrag eine Schriftart enthält, die der Drucker nicht unterstützt.

•	Um eine Schriftart zu ändern, die in einem großen Dokument oft vorkommt: Diese Auswahl ersetzt die alte Schriftart durch die gewünschte.

Klicken Sie auf die Schaltfläche Schriftart ersetzen…, um das Dialogfeld Schriftart ersetzen zu öffnen. Wählen Sie im Feld Systemfonts die Schriftart in Ihrem Dokument. Wählen Sie im Feld Verfügbare Gerätefonts die zu ersetzende Schriftart. Klicken Sie auf OK.

Siehe auch

Register Bildbearbeitung

Druckqualität

Graustufeneinstellung


 Register Ausgabe

Mit dem Register Ausgabe können Sie die Exemplaranzahl angeben und den gedruckten Auftrag sortieren.

Das Register Ausgabe enthält folgende Optionen:

Ausgabe an

Auflage

Endbearbeitungsoptionen

3D-Bild


 Ausgabe an

Gibt an, wohin der Druckauftrag ausgegeben wird. Dieses Druckermodell unterstützt eine Ausgabeoption:

•	Druckergrundeinstellung schickt den Druckauftrag zum V-u-Fach an der Oberseite des Druckers.

Siehe auch

Register Ausgabe

Auflage

Endbearbeitungsoptionen


 Auflage

Gibt die Anzahl der zu druckenden Exemplare an. Die maximale Auflage für Druckaufträge ist 999.

Siehe auch

Register Ausgabe

Ausgabe an

Endbearbeitungsoptionen


 Endbearbeitungsoptionen

Damit können Sie die Seitenreihenfolge der Druckausgabe einstellen.

Sortieren funktioniert mit einer RAM-Festplatte und gibt die Reihenfolge an, in der Seiten eines aus mehreren Blättern bestehenden Auftrags gedruckt werden. Werden Sortieren und eine RAM-Festplatte gewählt, druckt der Treiber den Auftrag Satz um Satz aus. Wird Sortieren deaktiviert, werden Kopien jeder Seite nach dem Satz gedruckt. Beispiel: Bei ausgewählter Sortierfunktion werden drei Exemplare eines fünfseitigen Dokuments als Seiten eins bis fünf dreimal in Folge ausgegeben. Das Treiber-Grafikbild zeigt die Gruppierung Sortieren und nicht Sortieren an.

Bei ausgewählter Sortierfunktion werden die Auftragsdaten als Render-Bildseiten im Speicher des Druckers (RAM-Festplatte) nach dem erstmaligen Laden gespeichert. Die restlichen Auftragsexemplare werden aus diesen gespeicherten Daten gedruckt, was den Vorgang des Sendens von Auftragsdaten vom Computer zum Drucker mit jedem Exemplar umgeht. Eine RAM-Festplatte muss im Drucker installiert und im Treiber im Register Geräteeinstellungen ausgewählt werden. Wird Sortieren mit einer RAM-Festplatte verwendet, werden Seitendaten kurzzeitig gespeichert und nach dem Drucken gelöscht.

Hinweis: Die Sortierfunktion funktioniert mit Adobe-Anwendungen nur, wenn eine RAM-Festplatte installiert ist.

Siehe auch

Register Ausgabe

Ausgabe an

Auflage

Register Geräteeinstellungen

RAM-Festplatte


 Register Prolog/Epilog

Damit können Sie PRESCRIBE-Befehle als Textdatei in ein Dokument einbetten. Die Textdateien werden im Treiber ausgewählt und werden zu Prolog/Epilog-Datendateien. Die Befehle sind in allen Emulationsmodi verfügbar.

PRESCRIBE-Befehle können die Druckerfunktionen steuern oder Makros enthalten, die sich auf die Druckausgabe auswirken. Eingebettete Befehle können z. B. einen Briefkopf oder ein Briefformular einfügen oder Druckeremulation oder die Papierquelle für ausgewählte Seiten ändern. PRESCRIBE ist eine residente, benutzerorientierte Befehlssprache, die den Funktionsumfang des digitalen Kopierers/Netzwerkdruckers erweitert.

Um diese Plug-In-Funktion im Kyocera Mita Extended Driver zu verwenden, wählen Sie die Option Prolog/Epilog-Modul, wählen Sie den Treiber von der Kyocera Mita Digital Library-CD auswählen. Um das Prolog/Epilog-Modul zu einem bereits ausgewählten Treiber hinzuzufügen, installieren Sie den Kyocera Mita Extended Driver und wählen Sie Prolog/Epilog-Modul. Daraufhin wird das Register Prolog/Epilog auf der Benutzeroberfläche angezeigt. Das Modul wird im Dialogfeld Plug-In-Informationen angezeigt, auf das Sie über das Register Info zugreifen.

Hinweis: Die Optionen für Seitenanfang und Seitenende stehen nur zur Verfügung, wenn PCL 5e als Seitenbeschreibungssprache im Dialogfeld Benutzereinstellungen ausgewählt wurde.

Das Register Prolog/Epilog enthält folgende Optionen:

• Prolog-/Epilog-Datendateien	Über die Liste wählen Sie die gewünschte Prolog/Epilog-Datendatei. Befehle werden in Textdateien (.txt) gespeichert.
• Hinzufügen	Klicken Sie auf Hinzufügen… um nach PRESCRIBE-Befehlsdateien zu suchen, die sie zur Liste Prolog-/Epilog-Datendateien hinzufügen.
• Entfernen	Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Entfernen, um sie von der Liste zu löschen.
• Bearbeiten	Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Bearbeiten.... Die Datei wird im Editor geöffnet, in dem Sie den Text bearbeiten können.
• Funktion deaktivieren	Deaktivieren Sie das Kästchen, um die Funktionen im Register Prolog/Epilog zu aktivieren. Alle unter Prolog-/Epilog-Datendateien aufgeführten Dateien werden auf Ihren Druckauftrag angewendet, wenn sie nicht auf Keine [Nicht zugewiesen] eingestellt werden. Wählen Sie das Kästchen aus, um die Funktionen und Dateien zu deaktivieren.
Einfügepunkt:	Damit können Sie den Einfügepunkt für eingebettete Prolog-/Epilog-Datendateien wählen. Wählen Sie für jede Datendatei einen Einfügepunkt.
• Keine [Nicht zugewiesen]	Falls mehrere Datendateien auf der Liste Prolog-/Epilog-Datendateien aufgeführt werden, können Sie einzelne Dateien auf Keine [Nicht zugewiesen] einstellen, um sie zu deaktivieren. Alle Dateien ohne die Einstellung Keine [Nicht zugewiesen] werden auf Druckaufträge angewendet.
• Anfang des Druckauftrags	Bettet eine Prolog-/Epilog-Datendatei auf der ersten Seite eines Druckauftrags ein.
• Ende des Druckauftrags	Bettet eine Prolog-/Epilog-Datendatei auf der letzten Seite eines Druckauftrags ein.
• Seitenanfang	Bettet eine Prolog-/Epilog-Datendatei am Beginn jeder Seite eines Druckauftrags ein. Wählen Sie eine Seitenoption: • Nur auf ungeraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit ungeraden Seitennummern an. • Nur auf geraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit geraden Seitennummern an. • Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf Seitennummern bzw. Seitenbereiche an. Werden keine Seitenzahlen eingegeben, wird die eingebettete Prolog-/Epilog-Datendatei auf alle Seiten angewendet.
• Seitenende	Bettet eine Prolog-/Epilog-Datendatei am Ende jeder Seite eines Druckauftrags ein. Wählen Sie eine Seitenoption: • Nur auf ungeraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit ungeraden Seitennummern an. • Nur auf geraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit geraden Seitennummern an. • Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf Seitennummern bzw. Seitenbereiche an. Werden keine Seitenzahlen eingegeben, wird die eingebettete Prolog-/Epilog-Datendatei auf alle Seiten angewendet.

Siehe auch

Register Geräteeinstellungen

Benutzereinstellungen

Register Info


 Register Info

Das Register Info zeigt Treibernamen, Version und Build-Nummer sowie damit zusammenhängende Systeminformationen an. Die technische Unterstützung fragt möglicherweise nach diesen Informationen.

• Version	Zeigt Informationen über installierte Treiberkomponenten an.
• Plug-In	Zeigt Informationen über optionale Plug-In-Module an.

Weitere Eigenschaften-Register

Register Medien

Register Layout

Register Bildbearbeitung

Register Ausgabe

Register Geräteeinstellungen

Siehe auch

Auf die Registerkarte Geräteeinstellungen zugreifen


 Register Geräteeinstellungen

Mit dem Register Geräteeinstellungen können Sie Druckeroptionen wählen, damit ihnen zugewiesene Funktionen mit dem Druckertreiber verwendet werden können. Sie können außerdem die Speichereinstellung im Treiber an den in Ihrem Drucker installierten Speicher anpassen, damit der Treiber das Laden von Schriftarten besser verwalten kann.

Das Register Geräteeinstellungen enthält folgende Optionen:

Geräteoptionen

Benutzereinstellungen

Verwaltereinstellungen

Speicher

RAM-Festplatte

3D-Bild

Siehe auch

Papierzufuhr


 Geräteoptionen

Damit können Sie angeschlossene Geräte auswählen. Falls Sie eine oder mehrere Druckeroptionen angeschlossen haben, wählen Sie das Kontrollkästchen neben dem jeweiligen Gerät. Klicken Sie auf OK, um die Geräte im Druckertreiber zu aktivieren.

Der FS-1010/1050 Drucker unterstützt folgende optionale Geräte:

Papierzufuhr	Eine Papierquelle, die bis zu 250 Blätter aufnimmt.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Benutzereinstellungen

Verwaltereinstellungen

Speicher

RAM-Festplatte


 Benutzereinstellungen

Damit können Sie eine Seitenbeschreibungssprache auswählen und weitere KPDL-Einstellungen vornehmen. Klicken Sie auf die Schaltfläche Benutzer…, um das Dialogfeld Benutzereinstellungen zu öffnen.

Seitenbeschreibungssprache

Wählen Sie aus der Liste Seitenbeschreibungssprache eine der folgenden Optionen aus:

PCL XL	In den folgenden Bereichen gegenüber PCL 5e erweitert: • Reduzierte Dateigröße • Höhere Druckgeschwindigkeit • Schnellere Rückkehr zur Anwendung • Keine Rückwärtskompatibilität mit früheren PCL-Versionen
PCL 5E	• Mit früheren PCL-Versionen voll kompatibel • Bidirektionale Kommunikationsunterstützung • Große Auswahl an Schriftarten für die Verwendung mit Microsoft® Windows® Anwendungen • Ermöglicht mehr Optionen zur Verwendung von PRESCRIBE-Befehlen innerhalb von Anwendungen • Komplexe Grafiken werden nicht so gut gedruckt
KPDL	• Kyoceras Emulation des PostScript®-Drucks  • Hervorragende Grafikwiedergabe  • Druckgeschwindigkeiten können niedriger als bei PCL sein • Erfordert mehr Druckerspeicher als PCL

PCL XL und 5e Einstellungen

Wählen Sie PCL XL oder PCL 5e als Seitenbeschreibungssprache und klicken Sie auf Einstellungen…, um das Dialogfeld PCL XL Einstellung oder PCL 5e Einstellung anzuzeigen.

• Text als Schwarzdruck	Druckt den Farbtext mit schwarzem Toner statt in Graustufen. Weißer Text und Bildfarben sind davon nicht betroffen.

Optionen für KPDL

Es stehen vier Druckverbesserungen zur Verfügung, wenn KPDL als Seitenbeschreibungssprache ausgewählt wird. Klicken Sie auf die Schaltfläche Einstellungen…, um das Dialogfeld KPDL-Einstellungen zu öffnen. Sie können aus folgenden Optionen wählen:

• Spiegeldruck	Druckt die Daten rückwärts, also spiegelbildlich.
• Bild umkehren	Druckt die Seite als Negativ, wobei weiße und schwarze Bilder umgekehrt gedruckt werden.
• Erlaube Datendurchlass	Für sehr komplexe Dokumente verfügbar. Kann auch Kompatibilitätsprobleme mit PostScript®-Anwendungen beheben.
• Text als Schwarzdruck	Druckt den Farbtext mit schwarzem Toner statt in Graustufen. Weißer Text und Bildfarben sind davon nicht betroffen.

GDI kompatibler Modus

Für PCL-basierte Seitenbeschreibungssprachen unterstützt der Kyocera Mita Extended Driver das Drucken im GDI-kompatiblen Modus. Dieser Modus weist das PDL-Modul an, genau die Bildschirmansicht zu erstellen. Er erstellt Daten in einem Rasterdruckformat, wodurch eine größere druckbare Datei entsteht, die jedoch mehr der Bildschirmanzeige entspricht. Die Microsoft Graphical Device Interface (GDI)-Komponente in Windows gibt das Dokument so wieder, wie es auf dem Bildschirm erscheint.

Einheiten

Gibt Zoll oder Millimeter als Einheit der benutzerdefinierten Papiergrößen und Bundstegeinstellungen an.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen	Register Medien
Geräteoptionen	Benutzerdefinierte Papiergrößen
Verwaltereinstellungen	Register Layout
Speicher	Seiten pro Blatt
RAM-Festplatte	Bundstegeinstellungen


 Verwaltereinstellungen

Damit können Sie Medienquellwerte neu zuweisen und ein Passwort für Sicherheitszwecke einrichten. Klicken Sie auf die Schaltfläche Verwalter…, um das Dialogfeld Verwaltereinstellungen zu öffnen.

Kompatibilitäts-Einstellungen

Damit kann ein Verwalter Werte für Medienquellen festlegen, damit der Kyocera Mita Extended Driver mit vorherigen Treibern kompatibel ist. Diese Ausrichtung alter und neuer Medienquellen ermöglicht, dass alle unter vorherigen Treibern erstellten Dokumente unter dem neuen Kyocera Mita Extended Driver kompatibel sind.

Werte für Medienquellen neu zuweisen

Passwort einrichten

Damit kann der Verwalter ein Passwort für alle Verwaltereinstellungs-Funktionen einrichten. Ein Passwort ist nicht erforderlich, um die Verwaltereinstellungs-Funktionen zu verwenden. Wenn jedoch ein Passwort eingerichtet wurde, werden alle Verwaltereinstellungs-Funktionen deaktiviert, bis das Passwort in das Dialogfeld Passwort eingeben eingegeben wurde.

Klicken Sie auf Passwort einrichten.... Geben Sie Ihr Passwort ein und bestätigen Sie es durch erneute Eingabe. Klicken Sie dann auf OK. Daraufhin zeigt das Dialogfeld Verwaltereinstellungen die Option Passwort bearbeiten… an. Klicken Sie auf Passwort bearbeiten…, um das Dialogfeld Passwort eingeben zu öffnen, und geben Sie das Passwort ein. Klicken Sie dann auf OK.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Benutzereinstellungen

Speicher

RAM-Festplatte


Medienquellenwerte neu zuweisen

So weisen Sie Medienquellenwerte neu zu:

1.	Klicken Sie im Dialogfeld Verwaltereinstellungen auf Kompatibilitäts-Einstellungen....

Das Dialogfeld Kompatibilitäts-Einstellungen wird angezeigt.

2.	Wählen Sie aus der Liste die neu zuzuweisende Quelle aus.

3.	Ersetzen Sie den Wert in Aufzählungswert mit dem korrekten Wert.

4.	Klicken Sie auf Anwenden.

Der neue Wert wird der ausgewählten Quelle zugewiesen.

5.	Klicken Sie auf Zurücksetzen, um alle Quellenwerte auf ihre Voreinstellungen zurückzusetzen.

6.	Wenn Sie fertig sind, klicken Sie auf OK.


 Speicher

Damit können Sie die Speichereinstellung im Treiber an den in Ihrem Drucker installierten Speicher anpassen, damit der Treiber das Laden von Schriftarten besser verwalten kann. Die Standard-Speichereinstellung im Drucker beträgt 16 MB. Verfügbare Speicherkonfigurationen: 16, 24, 32, 48 und 144 MB.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Benutzereinstellungen

Verwaltereinstellungen

RAM-Festplatte


 RAM-Festplatte

Damit können Sie einen bestimmten Anteil des Druckerspeichers als RAM-Festplatte für das Zwischenspeichern von Aufträgen zuweisen.

Wenn die RAM-Festplatte installiert und die Funktion Sortieren unter Endbearbeitungsoptionen im Register Ausgabe ausgewählt ist, ist die Druckgeschwindigkeit bei einem aus mehreren Exemplaren bestehenden sortierten Auftrag die Nenngeschwindigkeit des Druckers.

Der RAM-Festplattenspeicher ist temporär. Alle auf die RAM-Festplatte gesendeten Daten gehen verloren, wenn der Drucker zurückgesetzt oder ausgeschaltet wird.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Benutzereinstellungen

Verwaltereinstellungen

Speicher


 Papierzufuhr

Die Standard-Papierzufuhr nimmt 250 Blätter auf. Es kann auch eine weitere Papierzufuhr installiert werden, wodurch die Quellen auf zwei und die Kapazität auf 500 Blatt erhöht wird. Im Druckertreiber werden diese Kassettenpositionen unter Quelle im Register Medien angegeben.

Um eine weitere Papierzufuhr zu verwenden, muss sie zuerst unter der Standard-Papierzufuhr befestigt und im Register Geräteeinstellungen als Geräteoption ausgewählt werden.

Unterstützte Seitengrößen für die Papierzufuhr, Kassetten 1-2

Letter, Legal, A4, A5, B5 (JIS)

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Benutzereinstellungen

Verwaltereinstellungen

Speicher

RAM-Festplatte


 3D-Bild

Die Register Medien, Layout, Bildbearbeitung, Ausgabe und Geräteeinstellungen enthalten ein 3D-Bild, das bestimmte Funktionen im Register illustrieren kann.

Register Medien

Illustriert die Auswahl Quelle mit grüner Markierung.

Register Layout

Illustriert die Auswahlmöglichkeiten Seiten pro Blatt, Umrandung drucken, Layout, Skalierung und Duplex.

Register Bildbearbeitung

Illustriert die Graustufeneinstellung.

Register Ausgabe

Druckergrundeinstellung ist die einzige verfügbare Ausgabeoption. Das 3D-Bild ändert sich nicht.

Register Geräteeinstellungen

Illustriert die Auswahl Geräteoptionen. Wenn Sie ein optionales Gerät an den Drucker anschließen und es auf der Liste Geräteoptionen auswählen, erscheint dieses Gerät mit dem Drucker auf dem Bild.


Auf das Register Geräteeinstellungen zugreifen

Mit dem Register Geräteeinstellungen können Sie installierte Druckeroptionen wählen, damit ihnen zugewiesene Funktionen mit dem Druckertreiber verwendet werden können. Sie können auch die Speichereinstellung im Druckertreiber an den in Ihrem Drucker installierten Speicher anpassen.

So greifen Sie auf das Register Geräteeinstellungen zu:

1.	Öffnen Sie das Menü Start, das sich unten links auf dem Windows-Bildschirm befindet.

2.	Wählen Sie Einstellungen.

3.	Wählen Sie Drucker.

4.	Klicken Sie mit der rechten Maustaste auf den gewünschten Drucker.

5.	Wählen Sie Eigenschaften.

6.	Wählen Sie das Register Geräteeinstellungen.


Legt ein Papier- oder Umschlagformat für den Druckauftrag aus der angezeigten Liste fest.


Öffnet das Dialogfeld Benutzerdefinierte Papiergröße, mit dem Sie benutzerdefinierte Papierformate wählen können.


Legt die Größe der Druckausgabe im Verhältnis zur ausgewählten Seitengröße fest.


Legt anhand von physischer Position, Medienart oder Spezialart fest, woher das Papier für den Auftrag kommt.


Stellt den Drucker so ein, dass im Druckauftrag verwendete Medienart und Papierquelle aufeinander abgestimmt werden.


Gibt an, in welcher Richtung die Daten auf der Seite angeordnet werden.


Druckt die Daten auf einer Seite, auf der die Papierhöhe größer als die Papierbreite ist.


Druckt die Daten auf einer Seite, auf der die Papierbreite größer als die Papierhöhe ist.


Dreht die Daten auf der gedruckten Seite um 180 Grad.


Die Grafik ändert sich, um die ausgewählte Ausrichtung darzustellen.


Damit können Sie benutzerdefinierte Seitenabmessungen erstellen, diese umbenennen und für die spätere Verwendung speichern. Nach der Erstellung kann eine benutzerdefinierte Papiergröße unter den Einstellungen Seitengröße im Register Medien ausgewählt werden.


Zeigt die Liste der benutzerdefinierten Papiergrößen an.


Um eine neue benutzerdefinierte Papiergröße zu erstellen, klicken Sie auf die Schaltfläche Hinzufügen…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.


Um eine benutzerdefinierte Papiergröße aus der Liste zu löschen, wählen Sie das Objekt und klicken Sie auf Entfernen.


Um eine benutzerdefinierte Papiergröße zu bearbeiten oder umzubenennen, klicken Sie auf die Schaltfläche Bearbeiten…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.


Um eine benutzerdefinierte Papiergröße einstellen oder umzubenennen, geben Sie den Namen in das Feld ein. Er darf bis zu 31 Zeichen lang sein.


Gibt Höhe und Breite der benutzerdefinierten Papiergröße an.


Öffnet das Dialogfeld Erweiterte Materialeinstellungen, in dem der Deckblatt-Modus, die Seiteneinfügung und die Folien-Zwischenblattfunktion aktiviert werden können.


Weist den Drucker an, einen Druckauftrag mit einem vorder- oder vorder- und rückseitigen Deckblatt zu versehen.


Weist den Drucker an, einen Druckauftrag nur mit einem vorderseitigen Deckblatt zu versehen.


Weist den Drucker an, einen Druckauftrag mit einem vorder- und rückseitigen Deckblatt zu versehen.


Wählen Sie aus den verfügbaren Optionen aus, um Daten auf der Vorder- und Rückseite zu drucken.


Wählen Sie die Quelle für das Deckblatt aus dem Menü Medien für Deckblatt aus.


Illustriert die Auswahl Deckblatt-Modus.


Weist den Drucker an, zwischen einer ausgewählten Anzahl gedruckter Seiten ein Trennblatt einzufügen.


Schließt das Drucken auf die Vorderseite der Einfügungen ein. Wird diese Option markiert, wird jedes eingefügte Blatt mit Daten bedruckt, die seine Position im gesamten Druckauftrag wiedergeben. Eine Einfügung zwischen den Seiten 9 und 10 wird z. B. mit Auf Vorderseite drucken als Seite 10 gedruckt.


Geben Sie die Seitenzahlen der Seiten ein, vor denen die Einfügungen stattfinden sollen. Geben Sie einen Seitenbereich mit einem Bindestrich zwischen den Anfangs- und Endseitenzahlen im Bereich ein. Um z. B. Einfügungen vor den Seiten 5, 11, 12, 13 und 18 einzufügen, geben Sie 5, 11-13, 18 ein.


Wählen Sie die Quelle für die Einfügung aus der Liste Medien für Seite aus.


Illustriert die Auswahl Seiteneinfügung.


Weist den Drucker an, Unterblätter zwischen gedruckten Folien einzufügen.


Wählt den Druck der gleichen Daten wie auf der Folie.


Wählen Sie die Quelle für das Unterblatt aus dem Menü Medien für Unterblatt aus.


Illustriert die Auswahl Folien-Zwischenblatt.


Deaktiviert alle Funktionen im aktuellen Dialogfeld.


Druckt mehr als eine Seite auf einem Blatt.


Fügt auf jeder Seite, die auf einem Blatt gedruckt wird, eine Umrandung hinzu.


Damit können Sie die Reihenfolge, in der die Seiten auf einem Blatt erscheinen, einstellen.


Ändert Höhe und Breite der Seite um den ausgewählten Prozentsatz. Der Skalierungsbereich liegt zwischen 20 und 500 %.


Damit können Sie den Bundsteg (freier Platz) links auf dem gedruckten Blatt einstellen, indem Sie Text und Grafiken proportional reduzieren. Mit dem größeren Bundsteg, der durch Verschieben des Druckbereichs nach rechts um bis zu 25,4 mm erzielt wird, ist eine Broschüre oder gelochte Seite einfacher zu lesen. Bei Verwendung im Duplexdruck wird der vergrößerte Bundsteg gleichmäßig auf beiden Seiten des Blattes ausgerichtet.


Vergrößert den Bundsteg (freien Platz) links auf dem gedruckten Blatt, indem Text und Grafiken proportional reduziert werden. Wählen Sie einen Wert zwischen 0,20 und 1,00 Zoll (5,0 und 25,4 mm) aus oder geben Sie ihn ein und klicken Sie dann auf OK.


Aktiviert den Druck auf beiden Seiten eines Blattes, indem der Druckauftrag so ausgeführt wird, dass nach dem Drucken der ersten Hälfte des Auftrags der Auftrag gewendet und von der Kassette erneut zugeführt werden kann, um die zweite Seite zu drucken.


Wird diese Option ausgedruckt, werden Anleitungen zum manuellen Duplex-Druck für den Auftrag gedruckt, die erläutern, wie Seiten erneut zugeführt werden, um ihre Rückseite zu bedrucken.


Legt die Auflösung des Druckauftrags in Punkten pro Zoll (Dots per Inch oder dpi) fest. Höhere Einstellungen führen zu einer höheren Auflösung und detaillierteren Druckbildern.


Wählt aus weiteren Einstellungen unter Auflösung, Kyocera Image Refinement und EcoPrint aus.


Legt die Auflösung des Druckauftrags fest. Wählen Sie eine Option aus der Liste aus.


Bietet weitere Auflösungsoptionen für den Druckauftrag.


Simuliert 1200 dpi Ausgabe, was die Auflösung von Bildern im Vergleich zu einer Einstellung von 600 dpi erhöht und schneller als mit 1200 dpi druckt. Zwischen Schnell 1200 dpi und 600 dpi besteht für Text und Vektorgrafiken kein Unterschied.


Sorgt für eine Auflösung von 600 dpi für hohe Auflösung, detaillierte Ausgabe von Text und Grafiken.


Sorgt für eine Auflösung von 300 dpi, mindert die Bildqualität, erhöht jedoch die Druckgeschwindigkeit.


Glättet die Kanten von Text und Vektorgrafiken. Die Standardeinstellung ist Ein.


Reduziert die Tonermenge, die auf der gedruckten Seite aufgetragen wird und verlängert die Lebensdauer der Tonerkartusche, was sowohl ökonomisch als auch ökologisch von Vorteil ist. Weil die Tonersättigung reduziert wird, erscheinen das ganze Bild, Text Grafiken heller auf dem gedruckten Auftrag. EcoPrint erhöht die Druckgeschwindigkeit nicht.


Passt das Aussehen von Grafikbildern durch Steuerung des Graustufenspektrums an.


Macht Grafikbilder im Druckauftrag heller oder dunkler.


Steuert die Graustufen zwischen schwarz und weiß für die Grafikbilder Ihres Druckauftrags.


Gibt an, wie TrueType-Schriftarten an den Drucker gesendet werden.


Ersetzt eine Dokumentschriftart mit einer Druckerschriftart, wenn die Dokumentschriftart vom Drucker nicht unterstützt wird oder um eine Schriftart zu ändern, die in einem großen Anwendungsdokument oft vorkommt.


Wählt die Anwendungsschriftart aus, die nicht vom Drucker unterstützt wird.


Wählt die Druckerschriftart aus, die die Anwendungsschriftart ersetzen soll.


Gibt an, wohin der Druckauftrag ausgegeben wird.


Gibt die Anzahl der zu druckenden Exemplare an.


Wählt Ausgabeoptionen.


Gibt die Reihenfolge an, in der Seiten eines aus mehreren Blättern bestehenden Auftrags gedruckt werden. Erhöht die Druckgeschwindigkeit eines aus mehreren Blättern bestehenden Auftrags, wenn zusammen mit der RAM-Festplatte verwendet.

Hinweis: Die Sortierfunktion funktioniert mit Adobe-Anwendungen nur, wenn eine RAM-Festplatte installiert ist.


Schließt ausgewählte Druckeroptionen an, damit ihnen zugewiesene Funktionen mit dem Druckertreiber verwendet werden können.


Gibt Benutzerinformationen und eine Seitenbeschreibungssprache an.


Weist Medienquellwerte neu zu und richtet ein Passwort für Sicherheitszwecke ein.


Passt die Speichereinstellung im Treiber an den in Ihrem Drucker installierten Speicher an, damit der Treiber das Laden von Schriftarten besser verwalten kann.


Gibt an, dass Druckerspeicher als RAM-Festplatte zugewiesen wurde und ermöglicht die Verwendung der Auftrags-Zwischenspeicherfunktion, um die Druckgeschwindigkeit zu erhöhen.


Legt eine Seitenbeschreibungssprache aus verfügbaren Optionen fest.


Für PCL-basierte Seitenbeschreibungssprachen unterstützt der Kyocera Mita Extended Driver das Drucken im GDI-kompatiblen Modus. Dieser Modus weist das PDL-Modul an, genau die Bildschirmansicht zu erstellen. Er erstellt Daten in einem Rasterdruckformat, wodurch eine größere druckbare Datei entsteht, die jedoch mehr der Bildschirmanzeige entspricht. Die Microsoft Graphical Device Interface (GDI)-Komponente in Windows gibt das Dokument so wieder, wie es auf dem Bildschirm erscheint.


Gibt Zoll oder Millimeter als Einheit der benutzerdefinierten Papiergrößen und Bundstegeinstellungen an.


Gibt PCL-Einstellungen für Text als Schwarzdruck und KPDL-Einstellungen für Spiegeldruck, Spiegeldruck, Bild umkehren, Erlaube Datendurchlass and Text als Schwarzdruck an.


Druckt die Daten rückwärts, also spiegelbildlich.


Druckt die Seite als Negativ, wobei weiße und schwarze Bilder umgekehrt gedruckt werden.


Für sehr komplexe Dokumente am besten geeignet. Kann Kompatibilitätsprobleme mit PostScript®-Anwendungen beheben.


Druckt den Farbtext mit schwarzem Toner statt in Graustufen. Weißer Text und Bildfarben sind davon nicht betroffen.


Damit kann ein Verwalter Werte für Medienquellen festlegen, damit der Kyocera Mita Extended Driver mit vorherigen Treibern kompatibel ist. Diese Ausrichtung alter und neuer Medienquellen ermöglicht, dass alle unter vorherigen Treibern erstellten Dokumente unter dem Kyocera Mita Extended Driver kompatibel sind.


Zeigt eine Liste der Medienquellen und zugewiesenen Werten an.


Weist der gewählten Medienquelle einen neuen Wert zu. Klicken Sie nach der Zuweisung auf Anwenden.


Stellt die Vorgabeeinstellungen aller Medienquellenwerte wieder her.


Klicken Sie auf Anwenden, um der gewählten Medienquelle einen neuen Wert zuzuweisen.


Damit kann der Verwalter ein Passwort für Sicherheitszwecke einrichten und bearbeiten.


Legt das gewünschte Passwort fest. Geben Sie ein vierstelliges Passwort in das Feld Neues Passwort ein. Geben Sie es in Neues Passwort bestätigen zur Bestätigung noch einmal ein.


Legt das gewünschte Passwort fest. Geben Sie das festgelegte Passwort in das Feld Passwort ein.


Zeigt Informationen über installierte Treiberkomponenten an.


Zeigt Informationen über optionale Plug-In-Module an.


Zeigt Informationen an, die für die technische Unterstützung möglicherweise notwendig sind.


Zeigt das Kyocera Mita-Logo an.


Illustriert die Auswahl Quelle. Die gewählte Quelle wird im Bild markiert.


Illustriert die Funktion Seiten pro Blatt mit Bildern für zwei oder mehr Blätter auf einer Seite, Umrandung drucken um die Seiten, Layout, Skalierung und Manueller Duplex-Druck.


Illustriert die Funktion Graustufeneinstellung.


Illustriert die Auswahl Geräteoptionen. Wenn Sie ein optionales Gerät anschließen und auf der Liste Geräteoptionen auswählen, erscheint dieses Gerät mit dem Drucker auf dem Bild.


Stellt alle Vorgabeeinstellungen für das aktuelle Register wieder her.


Enthält die Liste verfügbarer Prolog-/Epilog-Datendateien, die als Textdateien (.txt) gespeichert werden. Wählt die gewünschte Datendatei aus der Liste aus.


Klicken Sie auf Hinzufügen… um nach PRESCRIBE-Befehlsdateien zu suchen, die sie zur Liste Prolog-/Epilog-Datendateien hinzufügen.


Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Entfernen, um sie von der Liste zu löschen.


Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Bearbeiten.... Die Datei wird im Editor geöffnet, in dem Sie den Text bearbeiten können.


Deaktivieren Sie das Kästchen, um die Funktionen im Register Prolog/Epilog zu aktivieren.


Damit können Sie den Einfügepunkt für eingebettete Prolog-/Epilog-Datendateien wählen. Wählen Sie für jede Datendatei einen Einfügepunkt.

Wählen Sie Seitenanfang oder Seitenende aus. Wählen Sie dann eine Seitenoption:

• Nur auf ungeraden Seiten	Wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit ungeraden Seitennummern an.
• Nur auf geraden Seiten	Wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit geraden Seitennummern an.
• Seiten	Wendet eine eingebettete Prolog-/Epilog-Datendatei auf Seitennummern bzw. Seitenbereiche an. Werden keine Seitenzahlen eingegeben, wird die eingebettete Prolog-/Epilog-Datendatei auf alle Seiten angewendet.