Copyright: Copyright © 2000-2001 Kyocera Corporation Copyright © 2000-2001 Kyocera Mita Corporation     KX Help 1.0
Citation: Copyright © 2000-2001 Kyocera Corporation Copyright © 2000-2001 Kyocera Mita Corporation      All Rights Reserved


 Ficha Papel

La ficha Papel permite especificar el tamaño, el origen y la orientación de la página impresa y también acceder a otros ajustes de papel.

La ficha Papel incluye lo siguiente:

Tamaño de página	Origen
Tamaños de papel personalizados	Tipo de papel
Tamaño de impresión	Configuración avanzada para papel
Orientación	Imagen 3-D


 Tamaño de página

Permite especificar un tamaño de página o de sobre para el trabajo de impresión entre las opciones que se enumeran. Las selecciones que se presenten dependen de los tamaños de papel que admita el origen del papel seleccionado. Por ejemplo, la lista no incluirá tamaños de sobres si se ha seleccionado Cassette 1 como origen del papel debido a que éste no admite sobres. Los sobres se alimentan en la impresora únicamente mediante la bandeja multifunción.

Tamaños de página admitidos para el Cassette estándar interno

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por el Alimentador de papel (Cassette 2)

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por la bandeja multifunción

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B6, B5 (ISO), Sobre #9, Sobre #10, Sobre Monarch, Sobre #6, Sobre C5, Sobre DL, Personalizado

Véase también

Ficha Papel

Tamaños de papel personalizados

Tamaño de impresión

Orientación

Origen

Tipo de papel

Configuración avanzada para papel


 Tamaños de papel personalizados

Permite crear dimensiones de página personalizadas, asignarles un nombre y guardarlas para utilizarlas en otro momento. Una vez definido el tamaño de papel personalizado, se lo puede seleccionar entre las configuraciones de Tamaño de página en la ficha Papel.

Si bien el controlador no impone restricciones, la impresora admite dimensiones de tamaño de papel para la bandeja multifunción de un mínimo de 70 x 148 mm (2,8 x 5,8 pulgadas) y un máximo de 216 x 297 mm (8,5 x 11,7 pulgadas). Los cassettes admiten dimensiones de tamaños de papel personalizado de un mínimo de 148 x 210 mm (5,8 x 8,3 pulgadas) y un máximo de 216 x 297 mm (8,5 x 11,7 pulgadas).

La unidad de medida (pulgadas o milímetros) se selecciona en el cuadro de diálogo Configuraciones del usuario.

 Definición, cambio de nombre y eliminación de un tamaño de papel personalizado

Véase también

Ficha Papel	Tipo de papel
Tamaño de página	Configuración avanzada para papel
Tamaño de impresión	Ficha Configuración de dispositivos
Orientación	Configuraciones del usuario
Origen


Configuración, cambio de nombre y eliminación de un tamaño de papel personalizado

Para definir un tamaño de papel personalizado, proceda según se indica a continuación:

1.	Haga clic en el botón Personalizado... para abrir el cuadro de diálogo Tamaños de papel personalizados.

2.	Haga clic en el botón Agregar... para abrir el cuadro de diálogo Editar tamaño de papel.

3.	En Nombre, escriba el nombre de un tamaño personalizado de 31 caracteres como máximo.

4.	En Tamaño, seleccione la Altura y el Ancho de su interés.

5.	Haga clic en Aceptar.

6.	Haga clic en Aceptar en el cuadro de diálogo Tamaños de papel personalizados.

El tamaño personalizado estará disponible como una opción de Tamaño de página, cuando se haya seleccionado Autoseleccionar origen o Bandeja multifunción como Origen.

Para cambiar el nombre de un tamaño de papel personalizado, proceda según se indica a continuación:

1.	Haga clic en el botón Personalizado... para abrir el cuadro de diálogo Tamaños de papel personalizados.

2.	Seleccione el nombre que desea cambiar.

3.	Haga clic en Editar... para abrir el cuadro de diálogo Editar tamaño de papel.

4.	En Nombre, escriba el nuevo nombre sobre el anterior.

5.	Haga clic en Aceptar.

6.	Haga clic en Aceptar en el cuadro de diálogo Tamaños de papel personalizados.

El tamaño personalizado con el nuevo nombre estará disponible como una opción de Tamaño de página, cuando se haya seleccionado Autoseleccionar origen o Bandeja multifunción como Origen.

Para eliminar el nombre de un tamaño de papel personalizado, proceda según se indica a continuación:

1.	Haga clic en el botón Personalizado... para abrir el cuadro de diálogo Tamaños de papel personalizados.

2.	En Nombre, seleccione el tamaño que se dispone a eliminar.

3.	Haga clic en el botón Eliminar, luego haga clic en Sí.

4.	Haga clic en Aceptar.


 Tamaño de impresión

Permite aumentar o reducir el tamaño de la salida impresa respecto del tamaño de página seleccionado. El tamaño de impresión y el de página comparten las mismas opciones de tamaño.

•	Para igualar el tamaño de página seleccionado, seleccione Igual que el tamaño de página.

Ejemplo: si se visualiza A4 como Tamaño de página, ese valor no se verá en Tamaño de impresión. Para que ambos valores coincidan, seleccione Igual que el tamaño de página.

•	Para que el tamaño de impresión difiera del Tamaño de página, seleccione el tamaño deseado en el menú desplegable. Para cada opción se muestran porcentajes en escala en relación con el tamaño de página seleccionado.

Ejemplo: si se visualiza Letter como Tamaño de página y se selecciona Executive (84 %) como Tamaño de impresión, las dimensiones de la impresión serán 7,25 x 10,5 pulgadas y no 8,5 x 11 pulgadas.

Tamaños de impresión admitidos

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B6, B5 (ISO), Sobre #9, Sobre #10, Sobre Monarch, Sobre #6, Sobre C5, Sobre DL, Personalizado

Véase también

Ficha Papel	Tipo de papel
Tamaño de página	Configuración avanzada para papel
Tamaños de papel personalizados	Ficha Distribución
Orientación	Escala
Origen


 Orientación

Determina cómo se colocarán los datos en la página impresa.

Con el ajuste Vertical los datos se colocarán en la página de modo que la altura sea mayor que el ancho del papel, mientras que con el ajuste Horizontal los datos se imprimirán en la página de modo que el ancho sea mayor que la altura del papel.

El ajuste Girar 180 permite girar los datos 180 grados en la página impresa.

Véase también

Ficha Papel

Tamaño de página

Tamaños de papel personalizados

Tamaño de impresión

Origen

Tipo de papel

Configuración avanzada para papel


 Origen

Permite seleccionar de dónde provendrá el papel para el trabajo de impresión según la ubicación (cassette o bandeja multifunción). El ajuste Autoseleccionar origen seleccionará el primer origen disponible que coincida con el tamaño del papel del trabajo.

Tamaños de página admitidos para el Cassette estándar interno

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por el Alimentador de papel (Cassette 2)

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por la bandeja multifunción

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B6, B5 (ISO), Sobre #9, Sobre #10, Sobre Monarch, Sobre #6, Sobre C5, Sobre DL, Personalizado

Véase también

Ficha Papel

Tamaño de página

Tamaños de papel personalizados

Tamaño de impresión

Orientación

Tipo de papel

Configuración avanzada para papel


 Tipo de papel

Permite seleccionar de dónde provendrá el papel para el trabajo de impresión según el tipo de papel o tipo de papel personalizado. El ajuste Autoseleccionar papel seleccionará el primer origen disponible que coincida con el tipo de papel y el tamaño de papel del trabajo.

Tipos de papel admitidos por los cassettes

Común, Preimpreso, Bond, Reciclado, Áspero, Membretado, Color, Perforado, Personalizado 1-8

Tipos de papel admitidos por la bandeja multifunción

Común, Transparencia, Preimpreso, Etiquetas, Bond, Reciclado, Pergamino, Membretado, Áspero, Color, Perforado, Sobre, Papel para tarjetas, Personalizado 1-8

Véase también

Ficha Papel

Tamaño de página

Tamaños de papel personalizados

Tamaño de impresión

Orientación

Origen

Configuración avanzada para papel


 Configuración avanzada para papel

Permite incluir una tapa y contratapa en blanco o preimpresa con el trabajo (Modo Tapa), insertar una hoja separadora entre las páginas (Insertar página) o intercalar una hoja entre transparencias como separador (Intercalación en transparencias). La configuración avanzada para papel no está disponible cuando se selecciona PCL 5e como Lenguaje de descripción de páginas o cuando se selecciona Imprimir en ambas caras (dúplex manual) en la ficha Distribución.

Modo Tapa

El Modo Tapa crea una cubierta, frontal o posterior, con el trabajo de impresión. El papel que se usa para la tapa proviene de un origen diferente que el resto del trabajo de impresión. Por ejemplo, la tapa puede ser de un tipo de papel diferente, por ejemplo, papel de un peso diferente o un color distinto. Intercalación en transparencias no se podrá utilizar cuando se haya seleccionado el Modo Tapa.

Utilización del modo Tapa

Insertar página

Insertar página inserta una hoja de separación entre una cantidad determinada de páginas impresas. Por ejemplo, el papel de la hoja insertada puede ser de otro color. Estas páginas separan las secciones importantes del documento. Intercalación en transparencias no se puede utilizar cuando está seleccionada la opción Insertar página.

Utilización de Insertar página

Intercalación en transparencias

La función Intercalación en transparencias inserta una hoja de refuerzo o protección entre las transparencias impresas. La hoja de refuerzo, conocida también como hoja intercalada, mantiene las transparencias limpias e impide que se peguen. Puede imprimir la misma información en la hoja de refuerzo que en la transparencia. Esta función está disponible sólo cuando se selecciona Transparencia como Tipo de papel. El Modo Tapa e Insertar página no se podrán utilizar cuando esté seleccionada la opción Intercalación en transparencias.

Utilización de Intercalación en transparencias

Restaurar

Haga clic en Restaurar para desactivar todas las funciones del cuadro de diálogo Configuración avanzada para papel.

Véase también

Ficha Papel	Tipo de papel
Tamaño de página	Ficha Distribución
Tamaños de papel personalizados	Dúplex manual
Tamaño de impresión	Ficha Configuración de dispositivos
Orientación	Configuraciones del usuario
Origen


Utilización del modo Tapa

Para incluir una tapa y contratapa con el trabajo de impresión, siga los pasos que se indican a continuación:

1.	En la ficha Papel, haga clic en Configuración....

2.	En el cuadro de diálogo Configuración avanzada para papel seleccione Modo Tapa.

3.	Seleccione Tapa para incluir sólo una cubierta frontal, o bien Tapa y contratapa para incluir cubiertas en las partes frontal y posterior del trabajo de impresión.

4.	En Imprimir en, seleccione las opciones de impresión que desee entre las disponibles.

•	Sólo la opción Tapa externa está disponible cuando Imprimir en ambas caras (Dúplex manual) no está marcada en la ficha Distribución y Tapa está seleccionada en el Modo Tapa.

•	Las opciones Tapa externa y Contratapa interna están disponibles cuando Imprimir en ambas caras (Dúplex manual) no está marcada en la ficha Distribución y Tapa y contratapa se ha seleccionado para el Modo Tapa.

•	Las opciones Tapa externa y Tapa interna están disponibles cuando Imprimir en ambas caras (dúplex manual) se ha seleccionado en la ficha Distribución y Tapa se ha seleccionado para el Modo Tapa.

•	Todas las opciones de Imprimir en están disponibles cuando Imprimir en ambas caras (dúplex manual) se ha seleccionado en la ficha Distribución y Tapa y contratapa se ha seleccionado para el Modo Tapa.

5.	Seleccione el tipo de papel en la lista Papel de tapa y cargue el material para las tapas en el origen seleccionado.

6.	Haga clic en Aceptar en el cuadro de diálogo Configuración avanzada para papel.


Utilización de Insertar página

Para incluir una hoja separadora en el documento, siga los pasos que se indican a continuación:

1.	En la ficha Papel, haga clic en Configuración....

2.	En el cuadro de diálogo Configuración avanzada para papel seleccione Insertar página.

3.	En Insertar antes de las páginas, indique los números de las páginas antes de las cuales se deben insertar las hojas. Escriba los números de página separados por comas. Indique un rango de páginas con un guión entre los números inicial y final del rango. Por ejemplo, para ubicar páginas insertadas antes de las páginas 5, 11, 12, 13 y 18, escriba 5, 11-13, 18.

4.	Seleccione el origen para la página insertada en la lista Papel para la página.

5.	Seleccione Imprimir en anverso para imprimir en las páginas insertadas.

Cuando se marca esta opción, en las hojas insertadas se imprimen datos que reflejan su posición respecto del trabajo de impresión completo. Por ejemplo, una hoja insertada entre las páginas 9 y 10 con la opción Imprimir en anverso seleccionada se imprimirá como la página 10.

6.	Haga clic en Aceptar en el cuadro de diálogo Configuración avanzada para papel.


Utilización de Intercalación en transparencias

La intercalación entre transparencias requiere que el Modo Tapa e Insertar página no estén seleccionados.

Para insertar hojas entre transparencias, proceda según se indica a continuación:

1.	En la ficha Papel, seleccione Autoseleccionar origen o Bandeja multifunción en Origen.

2.	Seleccione Transparencia en Tipo de papel.

3.	Haga clic en Configuración....

4.	En el cuadro de diálogo Configuración avanzada para papel seleccione Intercalación en transparencias.

5.	Seleccione el origen para la hoja de protección en la lista Papel de la página de refuerzo.

Una hoja de protección es la hoja que se inserta entre dos transparencias para evitar que se peguen.

6.	Seleccione Imprimir en hoja de protección para imprimir la misma información en la hoja de refuerzo que en la transparencia.

La opción de impresión en la hoja de protección puede usarse como guía para una presentación o para leer mientras ésta se proyecta.

7.	Haga clic en Aceptar en el cuadro de diálogo Configuración avanzada para papel.


 Ficha Distribución

La ficha Distribución permite determinar la escala, si se imprimen varias páginas en una sola hoja y si la impresión será a doble faz.

La ficha Distribución incluye lo siguiente:

Páginas por hoja

Escala

Configuración del margen interno

Dúplex manual

Imagen 3-D


 Páginas por hoja

Permite imprimir varias páginas en una sola hoja, en grupos de 1, 2, 4, 6, 9, 12, 16 ó 25 páginas.

Imprimir bordes permite definir los bordes de cada página en una sola hoja.

La ficha Distribución permite determinar en qué orden aparecerán las páginas en una sola página.

En el caso de aplicaciones como PageMaker, Acrobat y CorelDraw, se debe anular la marca correspondiente a la opción Permitir transferencia de datos de KPDL cuando se utiliza la opción Páginas por hoja. Es posible que se vea afectada la capacidad para imprimir mapas de bits e imágenes.

Véase también

Ficha Distribución

Escala

Configuración del margen interno

Dúplex manual

Configuraciones del usuario


 Escala

Escala cambia tanto la altura como el ancho de la página según el porcentaje seleccionado. El intervalo para la Escala es del 20 al 500 %.

Véase también

Ficha Distribución

Páginas por hoja

Configuración del margen interno

Dúplex manual

Ficha Papel

Tamaño de impresión


 Configuración del margen interno

Permite incrementar el margen interno (espacio en blanco) en el lado izquierdo de la hoja impresa reduciendo de forma proporcional el texto y los gráficos. El margen interno más grande que se obtiene al desplazar el área impresa a la derecha un máximo de 25,4 mm (1 pulgada) puede hacer que las páginas de un librillo o con orificios de perforación sean más fáciles de leer. Cuando se usa con la impresión a doble faz, el margen interno más grande se alinea uniformemente a ambos lados de la página.

La unidad de medida (pulgadas o milímetros) se selecciona en el cuadro de diálogo Configuraciones del usuario.

Haga clic en Configuración del margen interno... para abrir el cuadro de diálogo Configuración del margen interno. Seleccione o escriba un valor entre 0,20 y 1 pulgadas (5,0 y 25,4 mm) y haga clic en Aceptar.

Véase también

Ficha Distribución

Páginas por hoja

Escala

Dúplex manual

Ficha Configuración de dispositivos

Configuraciones del usuario


 Dúplex manual

Permite imprimir en ambas caras de una hoja ordenando el trabajo de impresión de modo tal que una vez impresa la primera mitad, la pila de hojas puede invertirse y volver a colocar en cassette para imprimir la otra cara. Dúplex manual no está disponible cuando la configuración se realiza desde el cuadro de diálogo Configuración avanzada para papel, al cual se accede desde la ficha Papel.

Para usar Dúplex manual:

•	La impresora debe estar instalada en un puerto local.

•	La selección de Origen debe ser Cassette 1 o Cassette 2.

En la ficha Distribución, seleccione Imprimir en ambas caras (Dúplex manual).

Los ajustes de Voltear por el borde largo y Voltear por el borde corto determinan qué borde se debe utilizar para dar vuelta la hoja y ver los datos correctamente en el otro lado de la misma. Si opta por Voltear por el borde largo, deberá dar vuelta la hoja por el borde más largo para ver los datos correctamente, mientras que si opta por Voltear por el borde corto deberá dar vuelta la hoja por el borde corto.

Impresión en ambas caras con Dúplex manual

Tamaños de página admitidos para la impresión dúplex manual

Letter, Legal, A4, A5, B5 (JIS)

Véase también

Ficha Distribución

Páginas por hoja

Escala

Configuración del margen interno

Ficha Papel

Origen

Configuración avanzada para papel


Impresión en ambas caras con dúplex manual

Para imprimir en ambas caras, proceda de la siguiente manera:

1.	En la ficha Papel, seleccione Cassette 1 o Cassette 2 (si estuvieran instalados).

2.	En la ficha Distribución, seleccione Imprimir en ambas caras (Dúplex manual).

3.	Seleccione Voltear por el borde largo o Voltear por el borde corto.

4.	Seleccione Instrucciones de impresión para imprimir una hoja de instrucciones. Siga las instrucciones que indican cómo volver a colocar las hojas en el cassette una vez impresa la primera cara.

O

Anule la marca de Instrucciones de impresión y siga los pasos 5 a 7.

5.	Haga clic en Aceptar en el cuadro de diálogo Propiedades y en el cuadro de diálogo Imprimir.

Se imprimirán las hojas con numeración par.

6.	Cuando se detenga la impresión, retire las hojas impresas de la bandeja de salida.

•	Con la opción Voltear por el borde largo seleccionada, voltee la pila de hojas por el borde largo del papel y vuelva a colocarla en el cassette.

•	Con la opción Voltear por el borde corto seleccionada, voltee la pila de hojas por el borde corto del papel y vuelva a colocarla en el cassette.

7.	Haga clic en Aceptar en el cuadro de diálogo Instrucciones de impresión con dúplex manual.

Se imprimirán las hojas con numeración impar.


 Ficha Imágenes

La ficha Imágenes permite cambiar el aspecto visual del texto y las imágenes en un trabajo de impresión ajustando la calidad de impresión, la escala de grises y la transferencia de fuentes.

La ficha Imágenes incluye lo siguiente:

Calidad de impresión

Ajuste de la escala de grises

Fuentes True Type

Imagen 3-D


 Calidad de impresión

Establece la resolución del trabajo de impresión en puntos por pulgada (ppp). Cuanto más alto es el valor, mayor es la resolución y el grado de detalle de las imágenes impresas.

•	El ajuste Alta calidad creará una salida de alta resolución y alto grado de detalle, tanto del texto como de los gráficos.

•	El ajuste Revisión reducirá la calidad de las imágenes al tiempo que aumentará la velocidad de impresión.

•	El ajuste Borrador reduce la cantidad de tóner que se utiliza en la página impresa para prolongar la vida útil del cartucho de tóner de modo que sea un producto tanto económico como ecológico. Debido a que se reduce la saturación del tóner, la totalidad de la imagen, incluidos los gráficos y el texto, se verá un poco más clara en la salida impresa.

•	Seleccione Personalizado… para acceder a otros ajustes de Calidad de impresión. Haga clic en el botón para abrir el cuadro de diálogo Configuraciones de calidad de impresión. Luego seleccione las opciones adicionales que desee en Resolución, Kyocera Image Refinement y EcoPrint.

Resolución

•	La opción Rápida 1200 ppp simula una salida de 1200 ppp y aumenta la resolución de los objetos de imágenes en comparación con la configuración de 600 ppp y a una mayor velocidad que la de 1200 ppp. No existe diferencia entre la opción Rápida 1200 ppp y la de 600 ppp para el texto y los gráficos vectoriales.

•	El ajuste 600 ppp creará una salida de alta resolución y alto grado de detalle, tanto para el texto como para los gráficos.

•	El ajuste 300 ppp reducirá la calidad de las imágenes al tiempo que aumentará la velocidad de impresión.

Kyocera Image Refinement

Kyocera Image Refinement (KIR), que también recibe el nombre de anti-alias, es un recurso basado en el hardware que suaviza los bordes del texto y los gráficos vectoriales. El ajuste predeterminado es Sí.

EcoPrint

EcoPrint reduce la cantidad de tóner que se utiliza en la página impresa para prolongar la vida útil del cartucho de tóner de modo que sea un producto económico y ecológico. Debido a que se reduce la saturación del tóner, la totalidad de la imagen, incluidos los gráficos y el texto, se verá un poco más clara en la salida impresa. EcoPrint no aumenta la velocidad de impresión.

Véase también

Ficha Imágenes

Ajuste de la escala de grises

Fuentes True Type


 Ajuste de la escala de grises

Permite ajustar el aspecto visual de las imágenes gráficas de su trabajo de impresión controlando el espectro de la escala de grises. Las configuraciones de Escala de grises resultan útiles si sus imágenes gráficas se imprimen demasiado claras, demasiado grises o demasiado oscuras. El texto no se ve afectado por la configuración del ajuste de la escala de grises.

El ajuste de Brillo permite aclarar u oscurecer las imágenes gráficas de sus trabajos impresos. Un ajuste elevado de Brillo aclarará el espectro de la escala de grises mientras que un ajuste bajo lo oscurecerá. El ajuste del brillo es útil cuando las imágenes se imprimen demasiado claras o demasiado oscuras. El texto no se ve afectado por la configuración del brillo.

El ajuste de Contraste permite controlar los niveles de gris entre el blanco y el negro para las imágenes gráficas de su trabajo impreso. Un elevado ajuste de contraste reducirá los niveles de gris, aclarando los grises claros y oscureciendo los grises oscuros. Por el contrario, un bajo ajuste de contraste incrementará los niveles de gris, oscureciendo los grises claros y aclarando los grises oscuros. El ajuste del contraste es útil si las imágenes gráficas se imprimen con mucho gris o con mucho blanco y negro. El texto no se ve afectado por la configuración del contraste.

Véase también

Ficha Imágenes

Calidad de impresión

Fuentes True Type


 Fuentes TrueType

Permite especificar cómo se definen las fuentes TrueType en la impresora. Este método afectará la velocidad de impresión del trabajo y puede resolver algunos problemas de impresión de las fuentes.

Seleccione Transferir fuentes TrueType como contorno para reducir el tamaño de impresión de documentos voluminosos, en especial si contienen varios tipos o tamaños de fuentes. Éste es el ajuste predeterminado.

Seleccione Transferir fuentes TrueType como mapa de bits para un trabajo de impresión con menor cantidad de fuentes y tamaños similares, aun cuando el tamaño del archivo sea mayor. Se aconseja utilizar esta opción con sistemas operativos antiguos (Windows 3.x, 9x) que disponen de menor cantidad de fuentes TrueType.

Seleccione Sustituir con fuentes del dispositivo en estas circunstancias:

•	Si el trabajo de impresión incluye una fuente que la impresora no admite.

•	Si debe cambiar una fuente utilizada en un documento voluminoso. Esta selección reemplaza la fuente anterior por la de su elección.

Haga clic en el botón Sustitución de fuentes... para abrir el cuadro de diálogo del mismo nombre. En el cuadro Fuentes del sistema, seleccione la fuente utilizada en el documento. En el cuadro Fuentes del dispositivo disponibles, seleccione la fuente sustituta. Haga clic en Aceptar.

Véase también

Ficha Imágenes

Calidad de impresión

Ajuste de la escala de grises


 Ficha Salida

La ficha Salida le permite especificar el recuento de copias e intercalar el trabajo impreso.

La ficha Salida incluye lo siguiente:

Enviar a

Copias

Opciones de acabado

Imagen 3-D


 Enviar a

Especifica la ubicación de salida para el trabajo de impresión. Este modelo de impresora sólo admite una opción de salida.

•	Valor predeterminado de impresora envía el trabajo de impresión a la bandeja cara abajo situada en la parte superior de la impresora.

Véase también

Ficha Salida

Copias

Opciones de acabado


 Copias

Indica la cantidad de copias que se imprimirán. La cantidad máxima de copias es 999.

Véase también

Ficha Salida

Enviar a

Opciones de acabado


 Opciones de acabado

Permite definir el orden de las páginas de la salida impresa.

Intercalar funciona con un disco RAM para especificar el orden en que las páginas de un trabajo de múltiples copias se deben imprimir. Con las opciones Intercalar y Disco RAM seleccionadas, el controlador imprimirá el trabajo juego por juego. Cuando se anula la marca de Intercalar, se imprimen copias de cada una de las páginas del juego. Por ejemplo, con la opción Intercalar seleccionada, para obtener tres copias de un documento de cinco páginas se imprimirán tres veces sucesivamente las páginas uno a cinco. La imagen mostrará los grupos intercalados y no intercalados.

Con la opción Intercalar seleccionada, los datos del trabajo se convierten en imágenes de la página en la memoria de la impresora (Disco RAM) una vez transferidas por primera vez. El resto de las copias del trabajo se imprimirán desde los datos almacenados, es decir que se omite el proceso de enviar los datos del trabajo desde la computadora a la impresora para cada copia. Es necesario instalar un Disco RAM en la impresora y seleccionarlo en la ficha Configuraciones de dispositivos. Cuando se usa la opción Intercalar con Disco RAM, los datos de la página se almacenan temporalmente y se eliminan concluida la impresión.

Nota: la función Intercalar no funciona con aplicaciones de Adobe a menos que se instale un disco RAM.

Véase también

Ficha Salida

Enviar a

Copias

Ficha Configuración de dispositivos

Disco RAM


 Ficha Prólogo/Epílogo

Permite incluir comandos PRESCRIBE en un documento como un archivo de texto. Los archivos de texto se seleccionan dentro del controlador y se convierten en archivos de datos de Prólogo/Epílogo. Está disponible en todos los modos de emulación.

Los comandos PRESCRIBE pueden controlar las funciones de la impresora, o bien, incluir macros que afectan a la salida impresa. Por ejemplo, estos comandos pueden insertar un membrete, un formulario, un cambio de emulación de impresora o bien, del origen del papel en ciertas páginas. PRESCRIBE es un lenguaje de comandos residente orientado al usuario que amplía las posibilidades de la copiadora digital/impresora de red.

Para usar esta función Plug in con el Kyocera Mita Extended Driver, seleccione la opción de módulo Prólogo/Epílogo cuando seleccione el controlador en el CD Kyocera Mita Digital Library. Para agregar dicho módulo a un controlador ya seleccionado, vuelva a instalar el Kyocera Mita Extended Driver y seleccione el Módulo Prólogo/Epílogo. Una vez seleccionado, aparecerá la ficha Prólogo/Epílogo en la interfaz de usuario. El módulo aparecerá en el cuadro de diálogo Información de Plug in al que se accede desde la ficha Acerca de.

Nota: las opciones para Comienzo de la página y Fin de la página sólo están disponible si se selecciona PCL 5e como Lenguaje de descripción de páginas en el cuadro de diálogo Configuraciones del usuario.

La ficha Prólogo/Epílogo incluye:

• Archivos de datos Prólogo/Epílogo	Seleccione el archivo de datos Prólogo/Epílogo deseado de la lista. Los comandos se guardan en formato de archivo de texto (.txt).
• Agregar	Haga clic en Agregar... para buscar los archivos de comandos PRESCRIBE que se dispone a agregar a la lista de archivos de datos Prólogo/Epílogo.
• Eliminar	Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Eliminar para eliminarlo de la lista.
• Editar	Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Editar.... El archivo se abrirá en Bloc de notas donde podrá modificar el texto.
• Desactivar función	Borre la marca de la casilla para activar las funciones de la ficha Prólogo/Epílogo. Todos los archivos que aparecen en la lista de archivos de datos Prólogo/Epílogo se aplicarán al trabajo de impresión a menos que estén definidos como Ninguno [Sin asignar]. Seleccione la casilla para desactivar las funciones y los archivos.
Punto de inserción:	Permite seleccionar el punto de inserción para incluir los archivos de datos Prólogo/Epílogo. Elija un punto de inserción para cada archivo de datos.
• Ninguno [Sin asignar]	Si en la lista de archivos de datos Prólogo/Epílogo aparecen varios archivos de datos, puede desactivar ciertos archivos definiéndolos individualmente como Ninguno [Sin asignar]. Se aplican los archivos que no fueron definidos como Ninguno [Sin asignar] a los trabajos de impresión.
• Comienzo del trabajo de impresión	Inserta un archivo de datos Prólogo/Epílogo en la primera página de un trabajo de impresión.
• Fin del trabajo de impresión	Inserta un archivo de datos Prólogo/Epílogo al final de un trabajo de impresión.
• Comienzo de la página	Inserta un archivo de datos Prólogo/Epílogo al comienzo de cada página de un trabajo de impresión. Seleccione una opción de página: • Sólo en páginas impares inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración impar. • Sólo en páginas pares inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración par. • Páginas inserta un archivo de datos Prólogo/Epílogo en determinado número de página y/o rango de páginas. Si no se indica ningún número de página, se insertará un archivo de datos Prólogo/Epílogo en todas las páginas.
• Fin de la página	Inserta un archivo de datos Prólogo/Epílogo al final de cada página de un trabajo de impresión. Seleccione una opción de página: • Sólo en páginas impares inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración impar. • Sólo en páginas pares inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración par. • Páginas inserta un archivo de datos Prólogo/Epílogo en determinado número de página y/o rango de páginas. Si no se indica ningún número de página, se insertará un archivo de datos Prólogo/Epílogo en todas las páginas.

Véase también

Ficha Configuración de dispositivos

Configuraciones del usuario

Ficha Acerca de


 Ficha Acerca de

La ficha Acerca de muestra el nombre del controlador, la versión, el número de compilación y demás información sobre el sistema. Esta información puede ser solicitada por el representante técnico.

• Versión	Muestra información sobre los componentes del controlador instalados.
• Plug In	Muestra información sobre los módulos plug in optativos.

Otras fichas de propiedades

Ficha Papel

Ficha Distribución

Ficha Imágenes

Ficha Salida

Ficha Configuración de dispositivos

Véase también

Acceso a la ficha Configuración de dispositivos


 Ficha Configuración de dispositivos

La ficha Configuración de dispositivos permite seleccionar qué opciones de la impresora están instaladas para que puedan usarse las funciones asociadas con el controlador de impresora. Puede configurar la memoria del controlador de modo que coincida con la memoria de la impresora, de modo que el controlador pueda manejar mejor la transferencia de fuentes.

La ficha Configuración de dispositivos incluye:

Opciones de dispositivos

Configuraciones del usuario

Configuraciones del administrador

Memoria

Disco RAM

Imagen 3-D

Véase también

Alimentador de papel


 Opciones de dispositivos

Permite seleccionar dispositivos instalados. Si ha instalado uno o varios dispositivos optativos para la impresora, seleccione la casilla de verificación ubicada junto al dispositivo. Haga clic en Aceptar para activar los dispositivos en el controlador de impresora.

La impresora FS-1010/1050 admite los siguientes dispositivos optativos:

Alimentador de papel	Origen del papel con capacidad para 250 hojas.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Configuraciones del usuario

Configuraciones del administrador

Memoria

Disco RAM


 Configuraciones del usuario

Permite seleccionar un Lenguaje de descripción de páginas y elegir otras configuraciones de KPDL. Haga clic en el botón Usuario... para abrir el cuadro de diálogo Configuraciones del usuario.

Lenguaje de descripción de páginas

En la lista Lenguaje de descripción de páginas, seleccione entre estas opciones:

PCL XL	Mejor que el PCL 5e en estas áreas. • Menor tamaño de archivo. • Mayor velocidad de impresión. • Regreso más veloz a la aplicación. • No posee compatibilidad retroactiva con versiones anteriores de PCL.
PCL 5E	• Compatibilidad total con versiones anteriores de PCL. • Soporte a las comunicaciones bidireccionales. • Amplia selección de fuentes para usar con aplicaciones Microsoft® Windows®. • Permite más opciones para utilizar comandos PRESCRIBE desde las aplicaciones. • Es posible que los gráficos complejos no se impriman correctamente.
KPDL	• Emulación de Kyocera de la impresión PostScript®. • Buena reproducción de gráficos. • La velocidad de impresión puede ser menor que con PCL. • Utiliza más memoria de impresora que PCL.

Configuraciones de PCL XL y 5e

Con PCL XL o PCL 5e seleccionado como lenguaje de descripción de páginas, haga clic en Configuración… para abrir el cuadro de diálogo Configuración PCL XL o Configuración PCL 5e.

• Imprimir texto en negro	Imprime el texto en color con tóner negro en lugar de escala de grises. El texto en blanco y los colores de las imágenes no se ven alterados.

Opciones para KPDL

Se dispone de cuatro mejoras de impresión si se selecciona KPDL como Lenguaje de descripción de páginas. Haga clic en Configuración... para abrir el cuadro de diálogo Configuración KPDL y seleccione entre las opciones siguientes:

• Impresión a espejo	Imprime los datos hacia atrás como si aparecieran en una imagen especular.
• Imagen inversa	Imprime la página en negativo, invirtiendo las imágenes en blanco y negro.
• Permitir transferencia de datos	Disponible para documentos extremadamente complejos. También sirve para resolver problemas de compatibilidad con aplicaciones PostScript®.
• Imprimir texto en negro	Imprime el texto en color con tóner negro en lugar de escala de grises. El texto en blanco y los colores de las imágenes no se ven alterados.

Modo compatible con GDI

Para los lenguajes de descripción de páginas basados en PCL, el controlador Kyocera Mita Extended Driver admite la impresión en el Modo Compatible con GDI. Este modo le indica al módulo PDL que muestre todo correctamente en la pantalla. Genera datos en un formato de impresión raster que, si bien es un archivo de impresión de gran tamaño, es más parecido a lo que se muestra en pantalla. El componente GDI (Microsoft Graphical Device Interface) genera un documento impreso tal como aparece en pantalla.

Unidades

Especifica si la unidad de medida para Tamaños de papel personalizados y Configuración de margen interno será Pulgadas o Milímetros.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos	Ficha Papel
Opciones de dispositivos	Tamaños de papel personalizados
Configuraciones del administrador	Ficha Distribución
Memoria	Páginas por hoja
Disco RAM	Configuración del margen interno


 Configuraciones del administrador

Permite reasignar los valores de origen del papel y definir una contraseña con fines de seguridad. Haga clic en el botón Administrador... para abrir el cuadro de diálogo Configuraciones del administrador.

Configuraciones de compatibilidad

Permite que un administrador pueda establecer valores para los orígenes de papel de forma tal que el Kyocera Mita Extended Driver sea compatible con los controladores anteriores. Esta alineación de orígenes de papel antiguos y nuevos asegura la compatibilidad de todos los documentos creados con otros controladores con el nuevo Kyocera Mita Extended Driver.

Nueva asignación de valores de origen del papel

Definir contraseña

Permite que el administrador defina una contraseña para todas las funciones de configuración del administrador. No es necesario definir una contraseña para utilizar las funciones de Configuraciones del administrador. Sin embargo, si se ha definido una contraseña, estas funciones no estarán disponibles a menos que se ingrese la contraseña en el cuadro de diálogo Ingresar contraseña.

Haga clic en Definir contraseña.... Escriba la contraseña una vez y repítala para confirmarla, luego haga clic en Aceptar. A continuación, el cuadro de diálogo Configuraciones del administrador mostrará Modificar contraseña.... Haga clic en Modificar contraseña... para abrir el cuadro de diálogo Ingresar contraseña, escriba la contraseña y haga clic en Aceptar.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Configuraciones del usuario

Memoria

Disco RAM


Nueva asignación de valores para el origen del papel

Para volver a asignar valores para el origen del papel, proceda de la siguiente forma:

1.	En el cuadro de diálogo Configuraciones del administrador, haga clic en Configuraciones de compatibilidad....

Se abre el cuadro de diálogo Configuraciones de compatibilidad.

2.	En la lista seleccione el origen que se dispone a reasignar.

3.	Escriba el valor correcto en el campo Valor enumerado.

4.	Haga clic en Aplicar.

El nuevo valor se asignará al origen seleccionado.

5.	Para restablecer los valores predeterminados del origen, haga clic en Restaurar.

6.	Cuando haya terminado, haga clic en Aceptar.


 Memoria

Permite configurar la memoria del controlador para que coincida con la memoria de la impresora, de modo que el controlador pueda manejar mejor la transferencia de fuentes. La configuración de memoria predeterminada de la impresora es de 16 MB. Las configuraciones de memoria disponibles son 16, 24, 32, 48, y 144 MB.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Configuraciones del usuario

Configuraciones del administrador

Disco RAM


 Disco RAM

Permite asignar cierta cantidad de memoria de impresora como disco RAM para el almacenamiento temporal en memoria caché de los trabajos.

Con el Disco RAM instalado y la función Intercalar en Opciones de acabado de la ficha Salida seleccionada, los trabajos intercalados de varias copias se imprimirán a la velocidad nominal de la impresora.

La memoria del disco RAM es temporal. Todos los datos enviados al disco RAM se pierden cuando se restaura o apaga la impresora.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Configuraciones del usuario

Configuraciones del administrador

Memoria


 Alimentador de papel

El Alimentador de papel estándar tiene capacidad para 250 hojas. Se puede instalar también otro alimentador de papel, incrementando el número de bandejas a dos y la capacidad total a 500 hojas. En el controlador de la impresora, estas ubicaciones de cassettes se especifican en Origen en la ficha Papel.

Para usar un alimentador de papel adicional, instálelo debajo del alimentador de papel estándar y luego selecciónelo como una de las Opciones de dispositivos en la ficha Configuración de dispositivos.

Tamaños de página admitidos por el alimentador de papel y los cassettes 1-2

Letter, Legal, A4, A5, B5 (JIS)

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Configuraciones del usuario

Configuraciones del administrador

Memoria

Disco RAM


 Imagen 3-D

Las fichas Papel, Distribución, Imágenes, Salida y Configuración de dispositivos contienen una imagen 3-D que ilustra ciertas funciones de la ficha.

Ficha Papel

Ilustra la selección de Origen resaltada en verde.

Ficha Distribución

Ilustra las opciones seleccionadas de Páginas por hoja, Imprimir bordes, Distribución, Escala y Modo doble faz.

Ficha Imágenes

Ilustra la configuración del Ajuste de Escala de grises.

Ficha Salida

Valor predeterminado de impresora es la única opción de la ficha Salida. La imagen 3-D permanece inalterada.

Ficha Configuración de dispositivos

Ilustra la opción seleccionada de Opciones de dispositivos. Cuando se conecta un dispositivo optativo a la impresora y se selecciona en la lista Opciones de dispositivos, ese dispositivo aparece adosado a la impresora en la imagen.


Acceso a la ficha Configuración de dispositivos

La ficha Configuración de dispositivos permite seleccionar qué opciones de la impresora están instaladas para que se puedan usar las respectivas funciones con el controlador de impresora. Permite que usted haga coincidir la configuración de memoria del controlador de impresora con la memoria instalada en la impresora.

Para acceder a la ficha Configuración de dispositivos, proceda según se indica a continuación:

1.	Abra el menú Inicio, ubicado en la esquina inferior izquierda de la pantalla de Windows.

2.	Seleccione Configuración.

3.	Seleccione Impresoras.

4.	Haga clic con el botón derecho en la impresora de su interés.

5.	Seleccione Propiedades.

6.	Seleccione la ficha Configuración de dispositivos.


Especifica un tamaño de papel o de sobre para el trabajo de impresión entre las opciones que se enumeran en la lista.


Abre el cuadro de diálogo Tamaños de papel personalizados, que le permite seleccionar un tamaño de papel personalizado.


Especifica el tamaño de la salida impresa de acuerdo con el tamaño de página elegido.


Especifica de dónde provendrá el papel para el trabajo sobre la base de la ubicación física, el tipo de papel o el tipo personalizado.


Define que la impresora haga coincidir el tipo y el origen del papel utilizado en el trabajo de impresión.


Especifica en qué dirección se colocarán los datos en la página.


Imprime los datos en una página cuya altura es mayor que el ancho.


Imprime los datos en una página cuyo ancho es mayor que la altura.


Hace rotar los datos 180 grados en la página impresa.


El gráfico se modificará para ilustrar las opciones seleccionadas para la Orientación.


Permite crear dimensiones de página personalizadas, asignarles un nombre y guardarlas para utilizarlas en otro momento. Una vez definido el tamaño de papel personalizado, se lo puede seleccionar entre las configuraciones de Tamaño de página en la ficha Papel.


Muestra la lista de tamaños de papel personalizados.


Para crear un nuevo tamaño personalizado, haga clic en el botón Agregar... para abrir el cuadro de diálogo Editar tamaño de papel.


Para suprimir un tamaño de papel personalizado de la lista, selecciónelo y haga clic en Eliminar.


Para modificar o cambiar el nombre de un tamaño personalizado, haga clic en el botón Editar... para abrir el cuadro de diálogo Editar tamaño de papel.


Para definir o cambiar el nombre de un tamaño personalizado, escriba el nombre en el cuadro (longitud máxima de 31 caracteres).


Especifica la Altura y el Ancho del tamaño de papel personalizado.


Abre el cuadro de diálogo Configuraciones avanzadas para papel, que permite utilizar las opciones Modo Tapa, Insertar página e Intercalación en transparencias.


Indica a la impresora que incluya una tapa (o tapa y contratapa) con el trabajo de impresión.


Indica a la impresora que incluya solamente una tapa frontal con el trabajo de impresión.


Indica a la impresora que incluya una tapa y contratapa con el trabajo de impresión.


Seleccione la opción que desee, entre las opciones disponibles, para imprimir en la tapa y la contratapa.


Selecciona el origen para la tapa del menú Papel de tapa.


Ilustra las selecciones de Modo Tapa.


Indica a la impresora que inserte una hoja de separación entre una cantidad determinada de páginas impresas.


Imprime en el anverso de las páginas insertadas. Cuando se marca esta opción, en las hojas insertadas se imprimen datos que reflejan su posición respecto del trabajo de impresión completo. Por ejemplo, una hoja insertada entre las páginas 9 y 10 con la opción Imprimir en anverso seleccionada se imprimirá como la página 10.


Indique los números de las páginas antes de las cuales se deben insertar las hojas. Indique un rango de páginas con un guión entre los números inicial y final del rango. Por ejemplo, para ubicar páginas insertadas antes de las páginas 5, 11, 12, 13 y 18, escriba 5, 11-13, 18.


Seleccione el origen para la página insertada en la lista Papel para la página.


Ilustra las selecciones de Insertar página.


Indica a la impresora que inserte una hoja de protección entre las transparencias impresas.


Seleccione para imprimir la misma información en la hoja de protección que en la transparencia.


Seleccione el origen para la hoja de protección en la lista Origen de la página de refuerzo.


Ilustra las selecciones de Intercalación en transparencias.


Desactiva todas las funciones del cuadro de diálogo actual.


Imprime más de una página en un hoja.


Agrega un borde a cada página impresa en la misma hoja.


Permite determinar en qué orden aparecerán las distintas páginas impresas en una hoja.


Cambia tanto la altura como el ancho de la página según el porcentaje seleccionado. El intervalo para la Escala es del 20 al 500 %.


Permite incrementar el margen interno (espacio en blanco) en el lado izquierdo de la hoja impresa reduciendo de forma proporcional el texto y los gráficos. El margen interno más grande que se obtiene al desplazar el área impresa a la derecha un máximo de 25,4 mm (1 pulgada) puede hacer que las páginas de un librillo o con orificios de perforación sean más fáciles de leer. Cuando se usa con la impresión a doble faz, el margen interno más grande se alinea uniformemente a ambos lados de la página.


Aumenta el margen interno (espacio en blanco) en el lado izquierdo de la hoja impresa reduciendo de forma proporcional el texto y los gráficos. Seleccione o escriba un valor entre 0,20 y 1 pulgada (5,0 y 25,4 mm) y haga clic en Aceptar.


Permite imprimir en ambas caras de una hoja ordenando el trabajo de impresión de modo tal que una vez impresa la primera mitad, la pila de hojas puede invertirse y volver a colocar en cassette para imprimir la otra cara.


Cuando está seleccionada esta opción, se imprimirán instrucciones para la impresión de doble faz manual que explican cómo colocar las páginas en el cassette para imprimir en el reverso.


Establece la resolución del trabajo de impresión en puntos por pulgada (ppp). Cuanto más alto es el valor, mayor es la resolución y el grado de detalle de las imágenes impresas.


Selecciona las opciones adicionales deseadas en Resolución, Kyocera Image Refinement y EcoPrint.


Establece la resolución del trabajo de impresión. Selecciónelas de la lista.


Ofrece opciones de resolución adicionales para el trabajo de impresión.


Simula una salida de 1200 ppp incrementando la resolución de los objetos de imágenes en comparación con el ajuste de 600 ppp, y a una velocidad mayor que 1200 ppp. No existe diferencia entre la opción Rápida 1200 ppp y la de 600 ppp para el texto y los gráficos vectoriales.


Establece una resolución de 600 puntos por pulgada logrando alta resolución y una salida con alto grado de detalle tanto para el texto como los gráficos.


Establece una resolución de 300 puntos por pulgada reduciendo la calidad de la imagen y aumentando la velocidad.


Uniformiza los bordes del texto y los gráficos de vectores. El ajuste predeterminado es Sí.


Reduce la cantidad de tóner que se utiliza en la página impresa para prolongar la vida útil del cartucho de tóner de modo que sea un producto tanto económico como ecológico. Debido a que se reduce la saturación del tóner, la totalidad de la imagen, incluidos los gráficos y el texto, se verá un poco más clara en la salida impresa. EcoPrint no aumenta la velocidad de impresión.


Ajusta el aspecto de las imágenes gráficas controlando el espectro de escala de grises.


Aclara u oscurece las imágenes gráficas del trabajo de impresión.


Controla los niveles de gris entre el negro y el blanco para las imágenes gráficas del trabajo de impresión.


Especifica cómo se envían las fuentes TrueType a la impresora.


Sustituye una fuente de impresora por una fuente de documento cuando la impresora no brinda soporte a dicha fuente o bien, para cambiar una fuente de un documento extenso.


Selecciona la fuente de la aplicación no admitida por la impresora.


Selecciona la fuente de impresora que sustituye a la fuente de la aplicación.


Especifica la ubicación de salida para el trabajo de impresión.


Indica la cantidad de copias que se imprimirán.


Selecciona las opciones de salida.


Especifica el orden en que se imprimen las páginas de un trabajo de varias copias. Al mismo tiempo, aumenta la velocidad de impresión de este tipo de trabajos cuando se la usa con la opción Disco RAM.

Nota: la función Intercalar no funciona con aplicaciones de Adobe a menos que se instale un disco RAM.


Agrega las opciones de impresora seleccionadas para que las funciones respectivas se puedan usar en el controlador de la impresora.


Especifica la información de usuario y el lenguaje de descripción de páginas.


Reasigna los valores de origen del papel y define una contraseña con fines de seguridad.


Correlaciona la configuración de memoria del controlador con la memoria instalada en la impresora para que el controlador pueda administrar mejor la transferencia de fuentes.


Especifica la memoria de impresora que se ha asignado al disco RAM y permite usar la función de almacenamiento de los trabajos en memoria temporal caché para aumentar de este modo la velocidad de impresión.


Especifica un lenguaje de descripción de páginas entre las opciones disponibles.


Para los lenguajes de descripción de páginas basados en PCL, el controlador Kyocera Mita Extended Driver admite la impresión en el Modo Compatible con GDI. Este modo le indica al módulo PDL que muestre todo correctamente en la pantalla. Genera datos en un formato de impresión raster que, si bien es un archivo de impresión de gran tamaño, es más parecido a lo que se muestra en pantalla. El componente GDI (Microsoft Graphical Device Interface) genera un documento impreso tal como aparece en pantalla.


Especifica si la unidad de medida para Tamaños de papel personalizados y Configuración de margen interno será pulgadas o milímetros.


Especifica los ajustes de PCL para Imprimir texto en negro y los de KPDL para Impresión a espejo, Imagen inversa, Permitir transferencia de datos e Imprimir texto en negro.


Imprime los datos hacia atrás como si aparecieran en una imagen especular.


Imprime la página en negativo, invirtiendo las imágenes en blanco y negro.


Ideal para documentos extremadamente complejos. Puede resolver problemas de compatibilidad con aplicaciones PostScript® .


Imprime el texto en color con tóner negro en lugar de escala de grises. El texto en blanco y los colores de las imágenes no se ven alterados.


Permite que un administrador pueda establecer valores para los orígenes de papel de forma tal que el Kyocera Mita Extended Driver sea compatible con los controladores anteriores. Esta correspondencia entre orígenes de papel nuevos y anteriores permite que todos los documentos creados con controladores antiguos sigan siendo compatibles con el Kyocera Mita Extended Driver.


Muestra una lista de los orígenes de los tipos de papel con sus valores asignados.


Asigna un nuevo valor al origen seleccionado. Una vez asignado, haga clic en Aplicar.


Restaura todos los valores de los orígenes del papel a sus ajustes predeterminados.


Haga clic en Aplicar para asignar un nuevo valor al origen seleccionado.


Permite que el administrador defina y modifique una contraseña con fines de seguridad.


Especifica la contraseña deseada. Escriba una contraseña de 4 caracteres en el cuadro Nueva contraseña. Vuelva a escribirla en el cuadro Confirmar nueva contraseña.


Especifica la contraseña deseada. Escriba la contraseña definida en el cuadro Contraseña.


Muestra información sobre los componentes del controlador instalados.


Muestra información sobre los módulos plug in optativos.


Muestra información que puede resultar necesaria para los representantes de asistencia técnica.


Muestra el logotipo de Kyocera Mita.


Ilustra la opción elegida de Origen. El origen seleccionado aparecerá resaltado en la imagen.


Ilustra la función Páginas por hoja con imágenes para dos o más páginas en una hoja, Imprimir bordes alrededor de las páginas, Distribución, Escala y Modo doble faz.


Ilustra la configuración del Ajuste de escala de grises.


Ilustra la opción seleccionada de Opciones de dispositivos. Cuando se instala un dispositivo optativo en la impresora y se selecciona en la lista Opciones de dispositivos, ese dispositivo aparece adosado a la impresora en la imagen.


Restaura todas las definiciones predeterminadas correspondientes a la ficha actual.


Contiene la lista de todos los archivos de comandos PRESCRIBE disponibles, guardados en formato de archivos de texto (.txt). Seleccione el archivo de datos deseado de la lista.


Haga clic en Agregar... para buscar los archivos de comandos PRESCRIBE que se dispone a agregar a la lista de archivos de datos Prólogo/Epílogo.


Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Eliminar para eliminarlo de la lista.


Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Editar.... El archivo se abrirá en Bloc de notas donde podrá modificar el texto.


Borre la marca de la casilla para activar las funciones de la ficha Prólogo/Epílogo.


Permite seleccionar el punto de inserción para incluir los archivos de datos Prólogo/Epílogo. Elija un punto de inserción para cada archivo de datos.

Para poder definir esta opción es necesario seleccionar primero Comienzo de la página y Fin de la página.

• Sólo en las páginas impares	Inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración impar.
• Sólo en las páginas pares	Inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración par.
• Páginas	Inserta un archivo de datos Prólogo/Epílogo en determinado número de página y/o rango de páginas. Si no se indica ningún número de página, se insertará un archivo de datos Prólogo/Epílogo en todas las páginas.