Copyright: Copyright © 2000-2001 Kyocera Corporation Copyright © 2000-2001 Kyocera Mita Corporation     KX Help 1.1
Citation: Copyright © 2000-2001 Kyocera Corporation Copyright © 2000-2001 Kyocera Mita Corporation     All Rights Reserved


 Ficha Papel

La ficha Papel permite especificar el tamaño del papel, el tamaño de impresión, el origen y el tipo de papel, la orientación de la página impresa y también acceder a otros ajustes de papel.

La ficha Papel incluye lo siguiente:

Tamaño de página	Origen
Tamaño de papel personalizado	Tipo de papel
Tamaño de impresión	Configuración avanzada para papel
Orientación	Imagen 3-D


 Tamaño de página

Permite especificar un tamaño de página o de sobre para el trabajo de impresión entre las opciones que se enumeran. Los tamaños de papel dependen del Origen del papel seleccionado. Por ejemplo, si se define el Origen del papel como Cassette 2 no aparecerán sobres ya que los cassettes no admiten sobres. Los sobres se alimentan en la impresora únicamente mediante la bandeja multifunción o el alimentador de sobres.

Para definir un tamaño de papel personalizado, haga clic en el botón Personalizado... para abrir el cuadro de diálogo Tamaños de papel personalizados. El tamaño de papel mínimo admitido por la bandeja multifunción es de 80 x 148 mm (3,1 x 5,8 pulgadas), y el máximo es de 216 x 356 mm (8,5 x 14 pulgadas).

En su interior, el cassette cuenta con un selector giratorio y ajustable del tipo de papel que debe fijarse en la posición que corresponda al tamaño de página cargado en él. Los sensores de la impresora detectarán este ajuste. La bandeja multifunción no posee ningún sensor y sólo necesita que se la defina en la sección Tamaño de página del controlador.

Tamaños de página admitidos por el cassette

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por el alimentador de papel y los cassettes 2-4

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por la bandeja multifunción

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B5 (ISO), B6 (JIS), Sobre #6, Sobre #9, Sobre #10, Sobre Monarch, Sobre C5, Sobre DL, Personalizado

Tamaños de página admitidos por el alimentador de sobres

Sobre, #6, Sobre #9, Sobre #10, Sobre Monarch, Sobre C5, Sobre DL

Tamaños de página admitidos por la unidad Dúplex

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por el apilador clasificador

Letter, Legal, A4, A5, B5 (JIS)

 Definición de tamaños de papel para la bandeja multifunción.

Véase también

Ficha Papel

Tamaño de papel personalizado

Tamaño de impresión

Orientación

Origen

Tipo de papel

Configuración avanzada para papel


 Tamaños de papel personalizados

Permite crear dimensiones de página personalizadas, asignarles un nombre y guardarlas para utilizarlas en otro momento. Una vez definido el tamaño de papel personalizado, se lo puede seleccionar entre las configuraciones de Tamaño de página en la ficha Papel. La configuración de Origen de papel como cassettes 2-4 (alimentador de papel) no admite tamaños de papel personalizados.

Si bien el controlador no admite restricciones, la impresora admite dimensiones de tamaño de papel para el origen de papel cassette 1 de un mínimo de 148 x 210 mm (5,8 x 8,27 pulgadas) y un máximo de 216 x 256 mm (8,5 x 10,08 pulgadas) cuando los cassettes se utilizan como origen del papel. Es posible alimentar manualmente una gama de tamaños de papel más amplia mediante la bandeja multifunción. La bandeja multifunción admite un tamaño mínimo de 80 x 148 mm (3,1 x 5,8 pulgadas) si el papel se alimenta por el borde más largo. El tamaño máximo de papel que admite la bandeja multifunción es de 216 x 356 mm (8,5 x 14 pulgadas). El alimentador de sobres no admite tamaños de sobre personalizados. El tamaño mínimo que admite la unidad Dúplex es de 148 x 216 mm (5,8 x 8,5 pulgadas) y el máximo es de 216 x 297 mm (8,5 x 11,7 pulgadas)

La unidad de medida (pulgadas o milímetros) se selecciona en el cuadro de diálogo Configuraciones del usuario.

 Definición, cambio de nombre y eliminación de un tamaño personalizado

Véase también

Ficha Papel	Tipo de papel
Tamaño de página	Configuración avanzada para papel
Tamaño de impresión	Ficha Configuración de dispositivos
Orientación	Configuraciones del usuario
Origen	Alimentador de papel


Configuración, cambio de nombre y eliminación de un tamaño de papel personalizado

Para definir un tamaño de papel personalizado, proceda según se indica a continuación:

1.	Haga clic en el botón Personalizado... para abrir el cuadro de diálogo Tamaños de papel personalizados.

2.	Haga clic en el botón Agregar... para abrir el cuadro de diálogo Editar tamaño de papel.

3.	En Nombre, escriba el nombre de un tamaño personalizado con 31 caracteres como máximo.

4.	En Tamaño, seleccione la Altura y el Ancho de su interés.

5.	Haga clic en Aceptar.

6.	Haga clic en Aceptar en el cuadro de diálogo Tamaños de papel personalizados.

El tamaño personalizado estará disponible como una opción de Tamaño de página, cuando se haya seleccionado Autoseleccionar origen o Bandeja multifunción como Origen.

Para cambiar el nombre de un tamaño de papel personalizado, proceda según se indica a continuación:

1.	Haga clic en el botón Personalizado... para abrir el cuadro de diálogo Tamaños de papel personalizados.

2.	Seleccione el nombre que desea cambiar.

3.	Haga clic en el botón Editar... para abrir el cuadro de diálogo Editar tamaño de papel.

4.	En Nombre, escriba el nuevo nombre sobre el anterior.

5.	Haga clic en Aceptar.

6.	Haga clic en Aceptar en el cuadro de diálogo Tamaños de papel personalizados.

El tamaño personalizado con el nuevo nombre estará disponible como una opción de Tamaño de página, cuando se haya seleccionado Autoseleccionar origen o Bandeja multifunción como Origen.

Para eliminar el nombre de un tamaño de papel personalizado, proceda según se indica a continuación:

1.	Haga clic en el botón Personalizado... para abrir el cuadro de diálogo Tamaños de papel personalizados.

2.	En Nombre, seleccione el tamaño que se dispone a eliminar.

3.	Haga clic en el botón Eliminar, luego haga clic en Sí.

4.	Haga clic en Aceptar.


 Tamaño de impresión

Permite aumentar o reducir el tamaño de la salida impresa respecto del tamaño de página seleccionado. El tamaño de impresión y el de página comparten las mismas opciones de tamaño.

•	Para igualar el tamaño de página seleccionado, seleccione Igual que el tamaño de página.

Ejemplo: si se visualiza A4 como Tamaño de página, ese valor no se verá en Tamaño de impresión. Para que ambos valores coincidan, seleccione Igual que el tamaño de página.

•	Para que el tamaño de impresión difiera del Tamaño de página, seleccione el tamaño deseado en el menú desplegable. Para cada opción se muestran porcentajes en escala en relación con el tamaño de página seleccionado.

Ejemplo: si se visualiza Letter como Tamaño de página y se selecciona Executive (84 %) como Tamaño de impresión, las dimensiones de la impresión serán 7,25 x 10,5 pulgadas y no 8,5 x 11 pulgadas.

Tamaños de impresión admitidos:

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B5 (ISO), B6 (JIS), Sobre #6, Sobre #9, Sobre #10, Sobre Monarch, Sobre C5, Sobre DL

Véase también

Ficha Papel	Tipo de papel
Tamaño de página	Configuración avanzada para papel
Tamaño de papel personalizado	Ficha Distribución
Orientación	Escala
Origen


 Orientación

Determina cómo se colocarán los datos en la página impresa.

Con el ajuste Vertical los datos se colocarán en la página de modo que la altura sea mayor que el ancho del papel, mientras que con el ajuste Horizontal los datos se imprimirán en la página de modo que el ancho sea mayor que la altura del papel.

El ajuste Girar 180 permite girar los datos 180 grados en la página impresa.

Véase también

Ficha Papel

Tamaño de página

Tamaño de papel personalizado

Tamaño de impresión

Origen

Tipo de papel

Configuración avanzada para papel


 Origen

Permite seleccionar de dónde provendrá el papel para el trabajo de impresión (cassette 1-4, bandeja de gran capacidad, bandeja multifunción). El ajuste Autoseleccionar origen seleccionará el primer origen disponible que coincida con el tamaño de página y el tipo de papel del trabajo.

Cada una de las bandejas del alimentador de papel tiene capacidad para 500 hojas y el alimentador multifunción puede dar cabida a 200 páginas.

Modo Primera (Alimentación manual/automática)

La impresora alimenta automáticamente el papel cargado en la bandeja multifunción aun cuando se haya seleccionado otro origen para el papel. Cuando se haya agotado el papel cargado en la bandeja multifunción, se tomará el papel del origen inicialmente definido (configuración predeterminada).

Definición de la bandeja multifunción como primera

Modo Cassette

El modo "Cassette" determina que la bandeja multifunción actúe como un cassette. Un trabajo de impresión se puede imprimir desde la bandeja multifunción si el papel allí cargado y la configuración del panel frontal fueron definidos de modo que coincidan con el tamaño de página y el tipo de papel.

Definición de la bandeja multifunción como cassette

Las ubicaciones del tipo de papel y el tipo de papel personalizado se deben definir primero en el panel frontal de la impresora. Al imprimir en doble faz desde la bandeja multifunción, defina en "Primero" el modo de la bandeja multifunción en el panel frontal de la impresora. Asegúrese de que los ajustes de tamaño de página, tipo de papel y la dirección de alimentación de la bandeja multifunción coincidan con los del cassette en uso. Si los ajustes del tamaño de página, tipo de papel o dirección de alimentación no concuerdan, es posible que se atasque el papel. Se recomienda utilizar los cassettes para las impresiones de doble faz.

Definición del tipo de papel para los cassettes y la bandeja multifunción

Tamaños de página admitidos por el cassette estándar interno, el alimentador de papel y cassettes 2-4

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tamaños de página admitidos por la bandeja multifunción

Letter, Legal, Executive, A4, A5, A6, B5 (JIS), B5 (ISO), B6 (JIS), Sobre #6, Sobre #9, Sobre #10, Sobre Monarch, Sobre C5, Sobre DL

Tamaños de página admitidos por el alimentador de sobres

Sobre #6, Sobre #9, Sobre #10, Sobre Monarch, Sobre C5, Sobre DL

Véase también

Ficha Papel	Tipo de papel
Tamaño de página	Configuración avanzada para papel
Tamaño personalizado	Ficha Configuración de dispositivos
Tamaño de impresión	Opciones de dispositivos
Orientación	Alimentador de papel


 Tipo de papel

Permite seleccionar de dónde provendrá el papel para el trabajo de impresión según el tipo de papel o tipo de papel personalizado. El ajuste Autoseleccionar papel seleccionará el primer origen disponible que coincida con el papel y el tamaño de página del trabajo. Si el tamaño de página o el tipo de papel seleccionado no está disponible, en el panel frontal de la impresora aparecerá un mensaje que le indicará que debe cargar el papel en cuestión en la bandeja multifunción.

Para poder utilizar un tipo de papel o un tipo de papel personalizado específico, primero se debe definir la ubicación del tipo de papel en el panel frontal de la impresora. Al imprimir en doble faz desde la bandeja multifunción, defina en "Primero" el modo de la bandeja multifunción en el panel frontal de la impresora de modo que el papel se obtenga de esta bandeja.

Definición del tipo de papel para los cassettes y la bandeja multifunción

Definición de la bandeja multifunción como primera

Tipos de papel admitidos por los cassettes

Común, Transparencia, Etiquetas, Papel Bond, Papel pergamino

Tipos de papel admitidos por la bandeja multifunción

Común, Transparencia, Preimpreso, Etiquetas, Bond, Reciclado, Pergamino, Membretado, Áspero, Color, Perforado, Sobre, Papel para tarjetas, Tipo personalizado 1-8

Véase también

Ficha Papel

Tamaño de página

Tamaño de papel personalizado

Tamaño de impresión

Orientación

Origen

Configuración avanzada para papel


 Configuración avanzada para papel

Permite incluir una tapa y contratapa en blanco o preimpresa con el trabajo (Modo Tapa), insertar una hoja separadora entre las páginas (Insertar página) o intercalar una hoja entre transparencias como separador (Intercalación en transparencias). La opción Configuración avanzada para papel no está disponible cuando se selecciona PCL 5e como Lenguaje de descripción de páginas.

Modo Tapa

El Modo Tapa crea una cubierta, frontal o posterior, con el trabajo de impresión. El papel que se usa para la tapa proviene de un origen diferente que el resto del trabajo de impresión. Por ejemplo, la tapa puede ser de un tipo de papel diferente, por ejemplo, papel de un peso diferente o un color distinto. Intercalación en transparencias no se podrá utilizar cuando se haya seleccionado el Modo Tapa.

Utilización del modo Tapa

Utilización del modo Tapa con el modo Librillo

Insertar página

Insertar página inserta una hoja de separación entre una cantidad determinada de páginas impresas. Por ejemplo, se podría usar un separador de color distinto entre las diversas secciones de un documento. Intercalación en transparencias no se puede utilizar cuando está seleccionada la opción Insertar página.

Utilización de Insertar página

Intercalación en transparencias

La función Intercalación en transparencias inserta una hoja de refuerzo o protección entre las transparencias impresas. La hoja de refuerzo, conocida también como hoja intercalada, mantiene las transparencias limpias e impide que se peguen. Puede imprimir la misma información en la hoja de refuerzo que en la transparencia. Esta función está disponible sólo cuando se selecciona Transparencia como Tipo de papel. El Modo Tapa e Insertar página no se podrán utilizar cuando esté seleccionada la opción Intercalación en transparencias.

Utilización de Intercalación en transparencias

Restaurar

Haga clic en Restaurar para desactivar todas las funciones del cuadro de diálogo Configuración avanzada para papel.

Véase también

Ficha Papel

Tamaño de página

Tamaño personalizado

Tamaño de impresión

Orientación

Tipo de papel

Origen


Utilización del modo Tapa

Las opciones avanzadas para papel dependen de los ajustes siguientes:

•	No se debe seleccionar Transparencia como Tipo de papel.

•	El Modo Librillo no debe estar marcado en la ficha Distribución.

Para incluir una tapa y contratapa con el trabajo de impresión, siga los pasos que se indican a continuación:

1.	En la ficha Papel, haga clic en Configuración....

2.	En el cuadro de diálogo Configuración avanzada para papel seleccione, Modo Tapa.

3.	Seleccione Tapa para incluir sólo una cubierta frontal, o bien Tapa y contratapa para incluir cubiertas en las partes frontal y posterior del trabajo de impresión.

4.	En Imprimir en, seleccione las opciones de impresión que desee entre las disponibles.

•	Sólo la opción Tapa externa está disponible cuando Imprimir en ambas caras (dúplex) no está marcada en la ficha Distribución y Tapa está seleccionada en el Modo Tapa.

•	Sólo las opciones Tapa externa y Contratapa interna están disponibles cuando Imprimir en ambas caras (dúplex) no está marcada en la ficha Distribución y Tapa y contratapa está marcada para el Modo Tapa.

•	Las opciones Tapa externa y Tapa interna están disponibles cuando Imprimir en ambas caras (dúplex) se ha seleccionado en la ficha Distribución y Tapa está seleccionada en el Modo Tapa.

•	Todas las opciones de Imprimir en están disponibles cuando Imprimir en ambas caras (dúplex) se ha seleccionado en la ficha Distribución y Tapa y contratapa están seleccionadas en el Modo Tapa.

5.	Seleccione el tipo de papel en la lista Papel de tapa y cargue el material para las tapas en el origen seleccionado.

6.	Haga clic en Aceptar en el cuadro de diálogo Configuración avanzada para papel.


Utilización del modo Tapa con el modo Librillo

Las opciones avanzadas para papel dependen de los ajustes siguientes:

•	No se debe seleccionar Transparencia como Tipo de papel.

•	El Modo Librillo debe estar seleccionado en la ficha Distribución.

Para incluir una tapa y contratapa con un librillo, siga los pasos que se indican a continuación:

1.	En la ficha Papel, haga clic en Configuración....

2.	En el cuadro de diálogo Configuración avanzada para papel seleccione Modo Tapa.

3.	En Imprimir en, seleccione las opciones de su interés para imprimir la primera y la última página en las caras interna o externa de la tapa.

4.	Seleccione el tipo de papel en la lista Papel de tapa y cargue el material para las tapas en el origen seleccionado.

5.	Haga clic en Aceptar en el cuadro de diálogo Configuración avanzada para papel.


Utilización de Insertar página

Las opciones avanzadas para papel dependen de los ajustes siguientes:

•	No se debe seleccionar Transparencia como Tipo de papel.

•	El Modo Librillo no debe estar seleccionado en la ficha Distribución.

Para incluir una hoja separadora en el documento, siga los pasos que se indican a continuación:

1.	En la ficha Papel, haga clic en Configuración....

2.	En el cuadro de diálogo Configuración avanzada para papel seleccione Insertar página.

3.	En Insertar antes de las páginas, indique los números de página donde se deben insertar.

Para un rango de páginas, utilice un guión entre los números inicial y final del rango de páginas. Por ejemplo, para ubicar páginas insertadas antes de las páginas 5, 11, 12, 13 y 18, escriba 5, 11-13, 18.

4.	Seleccione el origen para la página insertada en la lista Papel para la página.

5.	Seleccione Imprimir en anverso, Imprimir en reverso, o ambos, para imprimir en las hojas insertadas. La opción Imprimir en reverso se encuentra disponible cuando se ha seleccionado Imprimir en ambas caras (dúplex) en la ficha Distribución.

Cuando se marca esta opción, en las hojas insertadas se imprimen datos que reflejan su posición respecto del trabajo de impresión completo. Por ejemplo, una página insertada entre las páginas 9 y 10 con la opción Imprimir en anverso seleccionada se imprimirá como la página 10. Si se elige también la opción Imprimir en reverso, ésta se imprimirá como las páginas 10 y 11.

6.	Haga clic en Aceptar en el cuadro de diálogo Configuración avanzada para papel.


Utilización de Intercalación en transparencias

La Intercalación en transparencias requiere que el Modo Tapa e Insertar página no estén seleccionados.

Para insertar hojas entre transparencias, proceda según se indica a continuación:

1.	En la ficha Papel, seleccione Autoseleccionar origen o Bandeja multifunción en Origen.

2.	Seleccione Transparencia en Tipo de papel.

3.	Haga clic en Configuración....

4.	En el cuadro de diálogo Configuración avanzada para papel seleccione Intercalación en transparencias.

5.	Seleccione el origen para la hoja de protección en la lista Papel de la página de refuerzo.

Una hoja de protección es la hoja que se inserta entre dos transparencias para evitar que se peguen.

6.	Seleccione Imprimir en hoja de protección para imprimir la misma información en la hoja de refuerzo que en la transparencia.

La opción de impresión en la hoja de protección puede usarse como guía para una presentación o para leer mientras ésta se proyecta.

7.	Haga clic en Aceptar en el cuadro de diálogo Configuración avanzada para papel.


 Ficha Distribución

La ficha Distribución permite determinar la escala, si se imprimen varias páginas en una sola hoja y si la impresión será a doble faz.

La ficha Distribución incluye lo siguiente:

Páginas por hoja

Escala

Configuración del margen interno

Modo doble faz

Modo Librillo

Imagen 3-D


 Páginas por hoja

Permite imprimir varias páginas en una sola hoja, en grupos de 1, 2, 4, 6, 9, 12, 16 ó 25 páginas.

Imprimir bordes permite definir los bordes de cada página en una sola hoja.

La ficha Distribución permite determinar en qué orden aparecerán las páginas en una sola página.

En el caso de aplicaciones como PageMaker, Acrobat y CorelDraw, se debe anular la marca correspondiente a la opción Permitir transferencia de datos de KPDL cuando se utiliza la opción páginas por hoja. Es posible que se vea afectada la capacidad para imprimir mapas de bits e imágenes.

Véase también

Ficha Distribución

Escala

Configuración del margen interno

Modo doble faz

Modo Librillo

Ficha Configuración de dispositivos

Configuraciones del usuario


 Escala

Escala cambia tanto la altura como el ancho de la página según el porcentaje seleccionado. El intervalo para la Escala es del 20 al 500 %.

Véase también

Ficha Distribución

Páginas por hoja

Configuración del margen interno

Modo doble faz

Modo Librillo

Ficha Papel

Tamaño de impresión


 Configuración del margen interno

Permite incrementar el margen interno (espacio en blanco) en el lado izquierdo de la hoja impresa reduciendo de forma proporcional el texto y los gráficos. El margen interior más grande que se obtiene al desplazar el área impresa a la derecha un máximo de 25,4 mm (1 pulgada) puede hacer que las páginas de un librillo o con orificios de perforación sean más fáciles de leer. Cuando se usa con la impresión a doble faz, el margen interior más grande se alinea uniformemente a ambos lados de la página.

La unidad de medida (pulgadas o milímetros) se selecciona en el cuadro de diálogo Configuraciones del usuario.

Haga clic en Configuración del margen interno... para abrir el cuadro de diálogo del mismo nombre. Seleccione o escriba un valor entre 0,20 y 1 pulgadas (5,0 y 25,4 mm) y haga clic en Aceptar.

Véase también

Ficha Distribución

Páginas por hoja

Escala

Modo doble faz

Modo Librillo

Ficha Configuración de dispositivos

Configuraciones del usuario


 Modo doble faz

Permite imprimir en ambas caras de la hoja. La unidad dúplex viene como equipamiento estándar en este modelo de impresora. Cuando usa el Modo Librillo, el Modo doble faz no está disponible.

En la ficha Distribución, seleccione Imprimir en ambas caras (dúplex) para obtener una impresión de doble faz.

Los ajustes de Voltear por el borde largo y Voltear por el borde corto determinan qué borde se debe utilizar para dar vuelta la hoja y ver los datos correctamente en el otro lado de la hoja. Si opta por Voltear por el borde largo, deberá dar vuelta la hoja por el borde más largo para ver los datos correctamente, mientras que si opta por Voltear por el borde corto deberá dar vuelta la hoja por el borde corto.

Para imprimir a doble faz utilizando la bandeja multifunción, defínala como "primera" en el panel frontal de la impresora y defina el tamaño de página y el tipo de papel de modo que concuerden con la selección actual. Si los tamaños de página difieren, es posible que se atasque el papel. Los ajustes de tamaño de página, tipo de papel y la dirección de alimentación de la bandeja multifunción deben coincidir con los del cassette en uso. Si no concuerdan, es posible que se atasque el papel.

Para imprimir a doble faz utilizando la bandeja multifunción, defínala como "primera" en el panel frontal de la impresora y defina el tamaño de papel y el tipo de papel de modo que concuerden con la selección actual. Si los tamaños de papel difieren, es posible que se atasque el papel. Cuando se define el modo de la bandeja multifunción como "cassette", no es posible utilizar esta bandeja para imprimir documentos a doble faz.

La impresión a doble faz exige al menos 16 MB de memoria de impresora y hasta 32MB para realizar una impresión de 1200 ppp. Las impresiones con menor resolución exigen menos memoria.

La unidad dúplex no admite ciertos tipos de papel; si se los utiliza, podrían provocarse atascos e incluso daños a la unidad.

Tamaños de página admitidos por la unidad dúplex:

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tipos de papel admitidos por la unidad dúplex:

Papel común, Preimpreso, Bond, Reciclado, Áspero, Papel membretado, Color, Perforado, Personalizado

Definición de la bandeja multifunción como primera

Definición de la bandeja multifunción como cassette

Definición del tipo de papel para los cassettes y la bandeja multifunción

Definición de tamaños de papel para la bandeja multifunción

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Distribución	Tamaño de página
Páginas por hoja	Ficha Imágenes
Escala	Calidad de impresión
Configuración del margen interno	Ficha Configuración de dispositivos
Modo Librillo	Memoria
Ficha Papel	Unidad dúplex


 Modo Librillo

Permite imprimir documentos de varias páginas de modo tal que las copias terminadas puedan apilarse y plegarse en formato de librillo. Cuando se trabaja con el Modo Librillo, otras opciones como por ejemplo Modo doble faz y Paginas por hoja no se encuentran disponibles.

Seleccione Modo Librillo, y luego elija alguna de estas opciones de encuadernación:

• Encuadernación en borde izquierdo	Se apila y pliega de modo tal que el librillo pueda leerse de izquierda a derecha.
• Encuadernación en borde derecho	Se apila y pliega de modo tal que el librillo pueda leerse de derecha a izquierda.

El librillo se imprimirá en formato de librillo, listo para ser plegado. El librillo plegado medirá la mitad del papel seleccionado. Por ejemplo, si selecciona A3 como Tamaño de página, se puede plegar la salida de impresión en un librillo de tamaño A4.

Utilización del modo Tapa con el modo Librillo

Tamaños de librillo admitidos

Letter, Ledger, A3, A4, B4

Véase también

Ficha Distribución

Páginas por hoja

Escala

Configuración del margen interno

Modo doble faz


 Ficha Imágenes

La ficha Imágenes permite cambiar el aspecto visual del texto y las imágenes en un trabajo de impresión ajustando la calidad de impresión, la configuración de la escala de grises y la transferencia de fuentes.

La ficha Imágenes incluye lo siguiente:

Calidad de impresión

Ajuste de la escala de grises

Fuentes True Type

Imagen 3-D


 Calidad de impresión

Establece la resolución del trabajo de impresión en puntos por pulgada (ppp). Cuanto más alto es el valor, mayor es la resolución y el grado de detalle de las imágenes impresas.

•	El ajuste Alta calidad creará una salida de alta resolución y alto grado de detalle, tanto del texto como de los gráficos.

•	El ajuste Revisión reducirá la calidad de las imágenes al tiempo que aumentará la velocidad de impresión.

•	El ajuste Borrador reduce la cantidad de tóner que se utiliza en la página impresa para prolongar la vida útil del cartucho de tóner de modo que sea un producto tanto económico como ecológico. Debido a que se reduce la saturación del tóner, la totalidad de la imagen, incluidos los gráficos y el texto, se verá un poco más clara en la salida impresa.

•	Seleccione Personalizado… para acceder a otros ajustes de Calidad de impresión. Haga clic en el botón para abrir el cuadro de diálogo Configuraciones de calidad de impresión. Luego seleccione las opciones adicionales que desee en Resolución, Kyocera Image Refinement y EcoPrint.

Resolución

•	El ajuste de 1200 ppp de alta calidad crea una salida de impresión de 1200 ppp genuinos con alta resolución, pero de menor velocidad de impresión que si se selecciona Rápida 1200. Se trata del ajuste óptimo para presentaciones de alta resolución de imagen. El aumento en la resolución tendrá efecto sólo en los objetos de imágenes. No existe diferencia entre la opción de 1200 ppp y la de 600 ppp para el texto y los gráficos vectoriales.

•	La opción Rápida 1200 ppp simula una salida de 1200 ppp y aumenta la resolución de los objetos de imágenes en comparación con la configuración de 600 ppp y a una mayor velocidad que la de 1200 ppp. No existe diferencia entre la opción Rápida 1200 ppp y la de 600 ppp para el texto y los gráficos vectoriales.

•	El ajuste 600 ppp creará una salida de alta resolución y alto grado de detalle, tanto para el texto como para los gráficos.

•	El ajuste 300 ppp reducirá la calidad de las imágenes al tiempo que aumentará la velocidad de impresión.

Kyocera Image Refinement

Kyocera Image Refinement (KIR), que también recibe el nombre de anti-alias, es un recurso basado en el hardware que suaviza los bordes del texto y los gráficos vectoriales.

EcoPrint

EcoPrint reduce la cantidad de tóner que se utiliza en la página impresa para prolongar la vida útil del cartucho de tóner de modo que sea un producto económico y ecológico. Debido a que se reduce la saturación del tóner, la totalidad de la imagen, incluidos los gráficos y el texto, se verá un poco más clara en la salida impresa. EcoPrint no aumenta la velocidad de impresión.

Véase también

Ficha Imágenes

Ajuste de la escala de grises

Fuentes True Type


 Ajuste de la escala de grises

Permite ajustar el aspecto visual de las imágenes gráficas de su trabajo de impresión controlando el espectro de la escala de grises. Las configuraciones de Escala de grises resultan útiles si sus imágenes gráficas se imprimen demasiado claras, demasiado grises o demasiado oscuras. El texto no se ve afectado por la configuración del ajuste de la escala de grises.

El ajuste de Brillo permite aclarar u oscurecer las imágenes gráficas de sus trabajos impresos. Un ajuste elevado de brillo aclarará el espectro de la escala de grises mientras que un ajuste bajo lo oscurecerá. El ajuste del brillo es útil cuando las imágenes se imprimen demasiado claras o demasiado oscuras. El texto no se ve afectado por la configuración del brillo.

El ajuste de Contraste permite controlar los niveles de gris entre el blanco y el negro para las imágenes gráficas de su trabajo impreso. Un elevado ajuste de contraste reducirá los niveles de gris, aclarando los grises claros y oscureciendo los grises oscuros. Por el contrario, un bajo ajuste de contraste incrementará los niveles de gris, oscureciendo los grises claros y aclarando los grises oscuros. El ajuste del contraste es útil si las imágenes gráficas se imprimen con mucho gris o con mucho blanco y negro. El texto no se ve afectado por la configuración del contraste.

Véase también

Ficha Imágenes

Calidad de impresión

Fuentes True Type


 Fuentes TrueType

Permite especificar cómo se definen las fuentes TrueType en la impresora. Este método afectará la velocidad de impresión del trabajo y puede resolver algunos problemas de impresión de las fuentes.

Seleccione Transferir fuentes TrueType como contorno para reducir el tamaño de impresión de documentos voluminosos, en especial si contienen varios tipos o tamaños de fuentes. Éste es el ajuste predeterminado.

Seleccione Transferir fuentes TrueType como mapa de bits para un trabajo de impresión con menor cantidad de fuentes y tamaños similares, aun cuando el tamaño del archivo sea mayor. Se aconseja utilizar esta opción con sistemas operativos antiguos (Windows 3.x, 9x) que disponen de menor cantidad de fuentes TrueType.

Seleccione Sustituir con fuentes del dispositivo en estas circunstancias:

•	Si el trabajo de impresión incluye una fuente que la impresora no admite.

•	Si debe cambiar una fuente utilizada en un documento voluminoso. Esta selección reemplaza la fuente anterior por la de su elección.

Haga clic en el botón Sustitución de fuentes... para abrir el cuadro de diálogo del mismo nombre. En el cuadro Fuentes del sistema, seleccione la fuente utilizada en el documento. En el cuadro Fuentes del dispositivo disponibles, seleccione la fuente sustituta. Haga clic en Aceptar.

Véase también

Ficha Imágenes

Calidad de impresión

Ajuste de la escala de grises


 Ficha Salida

La ficha Salida permite especificar la ubicación de salida, el recuento de copias, las opciones de acabado y de almacenamiento del trabajo impreso.

La ficha Salida incluye lo siguiente:

Enviar a

Copias

Opciones de acabado

Configuración del trabajo

Imagen 3-D


 Enviar a

Especifica la ubicación de salida para el trabajo de impresión. Las opciones de salida disponibles dependen de las Opciones de dispositivos seleccionadas en la ficha Configuración de dispositivos y de los dispositivos optativos conectados a la impresora.

Si se trata de una impresora autónoma, sin dispositivos opcionales conectados, las opciones Cara arriba o Cara abajo son las únicas bandejas de salida disponibles.

•	El ajuste Bandeja posterior (Cara arriba) envía los trabajos de impresión cara arriba a la salida posterior de la impresora. Se debe colocar la bandeja opcional cara arriba en la parte posterior de la impresora para apilar correctamente los trabajos de impresión enviados. La bandeja opcional cara arriba tiene una capacidad máxima de 250 hojas.

•	El ajuste Bandeja superior (Cara abajo) enviará los trabajos a la bandeja superior con la imagen impresa hacia arriba. La bandeja de salida cara abajo que se encuentra en la parte superior de la impresora tiene una capacidad máxima de 250 hojas.

Con el Apilador clasificador opcional conectado e instalado como una Opción de dispositivo en la ficha Configuración de dispositivos, los destinos posibles de Enviar a incluyen los siguientes:

•	Bandeja de gran capacidad (Cara abajo) apila los trabajos en la bandeja inferior del apilador clasificador opcional.

•	Buzón (Cara abajo) envía el trabajo de impresión a cualquiera de los cinco buzones cuando el apilador clasificador opcional se encuentra instalado. Seleccione Buzón (Cara abajo) y elija en la lista el buzón de destino.

•	Valor predeterminado de impresora envía el trabajo de impresión a la bandeja cara abajo situada en la parte superior de la impresora.

•	Bandeja superior (Cara abajo) envía el trabajo de impresión cara abajo a la bandeja de salida situada en la parte superior de la impresora.

Con la unidad dúplex opcional conectada e instalada como una Opción de dispositivo en la ficha Configuración de dispositivos y ningún otro dispositivo opcional conectado, la Bandeja cara arriba debiera montarse en la parte posterior de la unidad dúplex para que los trabajos enviados se apilen correctamente. La bandeja opcional cara arriba tiene una capacidad máxima de 250 hojas.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida	Ficha Configuración de dispositivos
Copias	Opciones de dispositivos
Opciones de acabado	Apilador clasificador
Configuración del trabajo	Unidad dúplex


 Copias

Indica la cantidad de copias que se imprimirán. La cantidad máxima de copias es 999.

Véase también

Ficha Salida

Enviar a

Opciones de acabado

Configuración del trabajo


 Opciones de acabado

Permite alternar o intercalar las páginas y seleccionar otras opciones, según los dispositivos opciones conectados a la impresora.

Intercalar funciona con un disco RAM o un disco duro para especificar el orden en que las páginas de un trabajo de múltiples copias se deben imprimir. Con las opciones Intercalar y Disco RAM o Disco duro seleccionadas, el controlador imprimirá el trabajo juego por juego. Cuando se anula la marca de Intercalar, se imprimen copias de cada una de las páginas del juego. Por ejemplo, con la opción Intercalar seleccionada, para obtener tres copias de un documento de cinco páginas se imprimirán tres veces sucesivamente las páginas uno a cinco. La imagen mostrará los grupos intercalados y no intercalados.

Con la opción Intercalar seleccionada, los datos del trabajo se convierten en imágenes de la página en la memoria de la impresora (Disco RAM o Disco duro) una vez transferidas por primera vez. El resto de las copias del trabajo se imprimirán desde los datos almacenados, es decir que se omite el proceso de enviar los datos del trabajo desde la computadora a la impresora para cada copia. Es necesario instalar un Disco RAM o un Disco duro en la impresora y seleccionarlos en la ficha Configuraciones de dispositivos. Cuando se usa la opción Intercalar con Disco RAM o Disco duro, los datos de la página se almacenan temporalmente y se eliminan concluida la impresión. Cuando se usan con un disco duro, los datos de la página se pueden almacenar permanentemente seleccionando la opción Permanente en el cuadro de diálogo Configuración del trabajo.

La impresora debe tener al menos 12MB de memoria para usar Disco RAM. El cuadro Disco RAM no podrá usarse hasta que se haya designado la opción 12 MB en la ventana Memoria de la ficha Configuraciones de dispositivos.

Nota: la función Intercalar no funciona con aplicaciones de Adobe a menos que se instale un Disco RAM o un Disco duro.

La impresora debe tener al menos 12MB de memoria para usar la función de intercalación de impresión rápida. El cuadro Disco RAM permanece difuminado hasta que se elige la opción 12MB en la ventana Memoria de la ficha Configuración de dispositivos. Si se ha instalado un disco duro optativo, debe quitarse.

Buzón envía el trabajo de impresión a cualquiera de los cinco buzones cuando el apilador clasificador opcional se encuentra instalado. Seleccione Buzón y elija en la lista el buzón de destino.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida	Ficha Configuración de dispositivos
Enviar a	Opciones de dispositivos
Copias	Disco RAM
Configuración del trabajo	Apilador clasificador
	Memoria


 Configuración del trabajo

Permite administrar los trabajos de impresión en el disco duro optativo de la impresora mediante una variedad de herramientas, y además, asignarle un nombre al trabajo. Haga clic en el botón Configuración del trabajo... para abrir el cuadro de diálogo del mismo nombre.

Almacenamiento de trabajos (e-MPS)

Permite almacenar los trabajos de impresión en la memoria de la impresora de modo que se los pueda imprimir en otra oportunidad desde el panel frontal de la impresora. Para usar la función de almacenamiento de trabajos, se debe instalar un disco duro optativo en la impresora y seleccionarlo en Opciones de dispositivos de la ficha Configuración de dispositivos. Se dispone de siete funciones de almacenamiento de trabajos. Consulte los siguientes temas donde hallará más información:

•	Temporal permite almacenar un trabajo en el disco duro optativo hasta que éste se llene.

•	Permanente almacena un trabajo de forma permanente en el disco duro optativo.

•	Buzón virtual envía el trabajo de impresión a las bandejas de salida virtuales de su elección.

•	Copia rápida envía el trabajo a la impresora, lo imprime una vez y lo almacena temporalmente para utilizarlo en otro momento.

•	Revisar y retener imprime una copia del trabajo como prueba antes de una producción de gran volumen.

•	Impresión privada permite restringir el acceso a ciertos trabajos de impresión.

•	Almacenar trabajos almacena los trabajos de forma permanente en el disco duro optativo protegidos con un código de acceso.

Nombre del trabajo

Permite asignar un nombre personalizado al trabajo de impresión. Mientras se imprime el trabajo, este nombre aparecerá en el panel frontal de la impresora.

•	Seleccione Definido por aplicación, para ver el nombre de la aplicación.

•	Seleccione Personalizado y escriba un nombre. Éste se utilizará como Nombre del trabajo.

Restaurar

Haga clic en Restaurar para desactivar todas las funciones del cuadro de diálogo Configuración del trabajo.

Visualización de un nombre en el panel frontal

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida	Ficha Configuración de dispositivos
Enviar a	Opciones de dispositivos
Copias	Disco duro
Opciones de acabado	Configuración de disco duro
	Configuraciones del administrador


 Almacenamiento temporal

Permite almacenar trabajos de impresión en el disco duro optativo. Estos trabajos se borran de la memoria cuando se llena el disco duro. El almacenamiento temporal necesita un disco duro optativo.

Se puede asignar al trabajo un nombre y un nombre de usuario para facilitar su identificación en la lista de trabajos. El nombre del trabajo se selecciona en el cuadro de diálogo Configuración del trabajo. Se debe ingresar un nombre de usuario en el cuadro de diálogo Configuraciones del usuario.

Si se selecciona Temporal, se acelera la impresión de los trabajos de varias copias. Por ejemplo, la primera copia del trabajo se representa sólo una vez y las copias siguientes se imprimen a la velocidad nominal de la impresora.

En la ficha Salida, haga clic en Configuración del trabajo... para abrir el cuadro de diálogo del mismo nombre. Seleccione Almacenar trabajos (e-MPS) y, a continuación, Temporal.

Si hace clic en el botón Opciones... y selecciona Código de barras, podrá agregar al trabajo información de código de barras. Se debe utilizar el lector de códigos de barras BC-1 optativo para leer e imprimir el trabajo de impresión a partir del código de barras.

Colocación de un código de barras en un trabajo de impresión

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Ficha Configuración de dispositivos

Disco duro

Lector de código de barras


 Almacenamiento permanente

Permite almacenar un trabajo en el disco duro optativo de la impresora de modo que no se borre cuando se llene el disco. El almacenamiento permanente exige un disco duro optativo.

Se puede asignar al trabajo un nombre y un nombre de usuario para facilitar su identificación en la lista de trabajos impresos. El nombre del trabajo se selecciona en el cuadro de diálogo Configuración del trabajo. Se debe ingresar un nombre de usuario en el cuadro de diálogo Configuraciones del usuario.

Si se selecciona Permanente, se acelera la impresión de los trabajos de varias copias. Por ejemplo, la primera copia del trabajo se representa sólo una vez y las copias siguientes se imprimen a la velocidad nominal de la impresora.

En la ficha Salida, haga clic en Configuración del trabajo... para abrir el cuadro de diálogo del mismo nombre. Seleccione Almacenar trabajos (e-MPS) y, a continuación, Permanente.

Si hace clic en el botón Opciones... y selecciona Código de barras, podrá agregar al trabajo información de código de barras. Se debe utilizar el lector de códigos de barras BC-1 optativo para leer e imprimir el trabajo de impresión a partir del código de barras.

Impresión de una lista de trabajos con código permanente

Colocación de un código de barras en un trabajo de impresión

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Ficha Configuración de dispositivos

Configuraciones del usuario

Disco duro

Lector de código de barras


Colocación de un código de barras en un trabajo de impresión

Para colocar un código de barras impreso en un trabajo de impresión, proceda de la siguiente forma:

1.	En la ficha Salida, haga clic en Configuración del trabajo....

2.	En el cuadro de diálogo Configuración del trabajo, seleccione Almacenar trabajos (e-MPS).

3.	Seleccione Temporal o Permanente.

4.	Haga clic en Opciones....

5.	En el cuadro de diálogo Almacenamiento de trabajos, seleccione Código de barras.

6.	Seleccione Imprimir sólo en la primera página para que el código de barras se imprima únicamente en la primera página. Seleccione Imprimir en todas las páginas para que el código de barras se imprima en todas las páginas.

7.	En el menú Posición, seleccione en qué lugar de la página se imprimirá el código de barras.

8.	En el menú Orientación, seleccione si el código de barras se imprimirá con orientación horizontal o vertical. El valor predeterminado para la orientación es horizontal.

9.	Seleccione Imprimir ID de código de barras para que la impresora genere una identificación de trabajo numérica que se imprimirá debajo del código de barras en el trabajo de impresión.

10.	Haga clic en Aceptar.


 Lector de código de barras

Permite explorar un código de barras en un trabajo de impresión o en una lista de trabajos para imprimirlo. El lector de código de barras BC-1 se conecta al puerto serial de la impresora.

•	Para imprimir un trabajo a partir del código de barras de un documento, explore el código de la primera página para imprimir la totalidad del documento o bien, explore solamente el código de barras de las páginas que desea imprimir.

•	Para imprimir un trabajo de la lista de trabajos con código permanente del disco duro optativo, explore el código de barras Salida de trabajos situado a la izquierda, junto al nombre del trabajo. Para eliminar un trabajo de impresión de la lista de trabajos con código permanente, explore el código de barras Inicio de eliminación de trabajos y explore el código seleccionado situado a la derecha, debajo de Eliminación de trabajos.

•	Para imprimir un trabajo de una lista de buzones virtuales, explore el código de barras Salida (1) y, a continuación, el código de barras seleccionado en la lista. Los trabajos de impresión del buzón virtual se eliminan una vez impresos. Para eliminar un trabajo de una lista de buzones virtuales, explore el código de barras Eliminar (1) y, a continuación, el código de barras seleccionado en la lista.

Colocación de un código de barras en un trabajo de impresión

Impresión de una lista de trabajos con código permanente

Impresión de una lista de buzones virtuales

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Almacenamiento permanente

Buzón virtual (VMB)

Ficha Configuración de dispositivos

Memoria


 Buzón virtual (VMB)

Permite enviar trabajos de impresión a las bandejas de buzón virtual de su elección. El buzón virtual exige un disco duro optativo. Los datos enviados desde la impresora se acumulan en bandejas de salida virtuales numeradas. Para imprimir los datos, debe especificar el número de la bandeja de salida virtual en el panel frontal utilizando el panel frontal de la impresora o un lector de códigos de barras BC-1 optativo. Los trabajos de impresión del buzón virtual se eliminan una vez impresos. La opción de buzón virtual no está disponible cuando se selecciona KPDL como Lenguaje de descripción de páginas.

Se pueden asignar bandejas de salida virtual a los usuarios en la ficha Configuración de dispositivos del cuadro de diálogo Configuración de disco duro. Se pueden asignar hasta 255 buzones.

Envío de trabajos al buzón virtual

Impresión de datos acumulados en los buzones virtuales

Impresión de una lista de buzones virtuales

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Ficha Configuración de dispositivos

Configuración del disco duro

Configuraciones del usuario

Disco duro

Lector de código de barras


Envío de trabajos al buzón virtual

Para enviar trabajos a uno o varios buzones virtuales, proceda según se indica a continuación:

1.	En el programa de aplicación, haga clic en Archivo, luego en Imprimir para abrir el cuadro de diálogo del mismo nombre.

2.	Abra el cuadro de diálogo Propiedades: según la aplicación que utilice deberá hacer clic en el botón Propiedades o Configuración.

3.	Haga clic en la ficha Salida y a continuación en el botón Configuración del trabajo....

4.	Seleccione Disco duro y luego Buzón virtual.

5.	Haga clic en el botón Selección... para abrir el cuadro de diálogo Selección de buzón virtual.

6.	Selecione uno o más Nombres definidos de la lista.

7.	Haga clic en Aceptar en todos los cuadros de diálogo.


Impresión de datos acumulados en los buzones virtuales
Impresión de datos acumulados en el buzón virtual

Para imprimir datos acumulados en un buzón virtual, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione el botón MENU.

2.	Presione la tecla ^ para visualizar e-MPS luego, presione la tecla >.

3.	Presione la tecla ^ hasta que aparezca Imprimir bandeja de datos VMB.

4.	Presione INTRO para que aparezca un signo ? intermitente.

5.	Presione la tecla ^ para seleccionar un número de bandeja.

6.	Presione INTRO para imprimir los datos acumulados de la bandeja seleccionada.


Impresión de una lista de trabajos de un buzón virtual

Los trabajos que se encuentran en un buzón virtual se pueden imprimir desde el panel frontal de la impresora o bien, utilizando el lector de códigos de barras BC-1 para explorar el código de barras en la lista de buzones virtuales. En Lector de código de barras encontrará más detalles.

Para imprimir una lista de buzones virtuales, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione el botón MENU.

2.	Presione la tecla ^ para visualizar e-MPS luego, presione la tecla >.

3.	Presione la tecla ^ hasta que aparezca Lista de VMB.

4.	Presione INTRO para que aparezca un signo ? intermitente.

5.	Presione INTRO nuevamente para imprimir la Lista de buzones virtuales.


Impresión de una lista de trabajos con código permanente

Una vez almacenados los trabajos de impresión de forma permanente en el disco duro, se puede imprimir una lista de los trabajos desde el panel frontal. Los trabajos que integran la lista de trabajos con código permanente se pueden imprimir utilizando el lector de códigos de barras BC-1 optativo. En Lector de código de barras encontrará más detalles.

Para imprimir una lista de trabajos con código permanente, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione el botón MENU.

2.	Presione la tecla ^ para visualizar e-MPS luego, presione la tecla >.

3.	Presione la tecla ^ hasta que aparezca Lista de trabajos con código.

4.	Presione INTRO para que aparezca un signo ? intermitente.

5.	Presione INTRO nuevamente para imprimir la Lista de trabajos con código permanente.


 Revisar y retener

Imprime una copia de un trabajo de varias copias y luego guarda las copias restantes en el disco duro optativo de la impresora. La primera copia es de "revisión". Revisada la primera copia, se puede imprimir o eliminar el resto de las copias. La función Revisar y retener exige un disco duro optativo.

La cantidad de trabajos para revisar y retener que se pueden almacenar en el disco duro optativo depende del espacio en disco disponible. Cuando se alcanza la capacidad máxima del disco duro y se envía un nuevo trabajo para almacenar, el trabajo almacenado más antiguo será reemplazado por el nuevo.

Los trabajos para revisar y retener se almacenan temporalmente y se borran al restaurar o apagar la impresora. Es posible acceder a los trabajos para revisar y retener que estén almacenados en la impresora desde el panel frontal.

Impresión del resto de las copias para revisar y retener

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Ficha Configuración de dispositivos

Configuración de disco duro


 Copia rápida

Imprime todas las copias de un trabajo, luego almacena el trabajo temporalmente en el disco duro optativo de la impresora para utilizarlo más adelante. Se puede tener acceso desde el panel frontal de la impresora a los trabajos de copia rápida almacenados. Para utilizar la función Copia rápida es necesario instalar un disco duro optativo en la impresora que debe estar seleccionado en la ficha Configuración de dispositivos.

La cantidad de trabajos de copia rápida que se puede almacenar en el disco duro optativo depende del espacio en disco disponible. Cuando se alcanza la capacidad máxima del disco duro y se envía un nuevo trabajo para almacenar, el trabajo almacenado más antiguo será reemplazado por el nuevo.

Los trabajos de copia rápida se almacenan temporalmente y se borran al restaurar o apagar la impresora.

Impresión de trabajos de copia rápida adicionales

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Ficha Configuración de dispositivos

Configuración de disco duro


 Impresión privada

Envía trabajos de impresión protegidos a la impresora y los almacena en el disco duro optativo sin ninguna impresión inicial. Para utilizar la función Impresión privada es necesario instalar un disco duro optativo en la impresora que debe estar seleccionado en la ficha Configuración de dispositivos. Esta función exige además el envío de un código de acceso de cuatro dígito junto con el trabajo de impresión. Para tener acceso e imprimir los trabajo de impresión privada almacenados desde el panel frontal de la impresora se debe utilizar el código de acceso.

La cantidad de trabajos de impresión privada que se puede almacenar en el disco duro optativo depende del espacio en disco disponible. Cuando se alcanza la capacidad máxima del disco duro y se envía un nuevo trabajo para almacenar, el trabajo almacenado más antiguo será reemplazado por el nuevo.

Los trabajos de impresión privada se borran al restaurar o apagar la impresora. Para impedir que un trabajo sea borrado, seleccione la función Almacenar trabajos.

Impresión de trabajos de impresión privada

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Ficha Configuración de dispositivos

Disco duro


 Almacenamiento de trabajos

Esta función almacena los trabajos de impresión en el disco duro optativo de la impresora para imprimirlos en otra oportunidad. Los trabajos se almacenan de forma permanente y no se borran al apagar la impresora. Para utilizar la función para almacenar trabajos es necesario instalar un disco duro optativo en la impresora que debe estar seleccionado en la ficha Configuración de dispositivos. Esta función permite además que usted incluya un código de acceso de cuatro dígito con el trabajo de impresión. Si se utiliza un código de acceso, se puede acceder a los trabajo de impresión almacenados desde el panel frontal de la impresora utilizando dicho código de acceso. Para incluir un código de acceso, marque la casilla Código de acceso y escriba un número de cuatro dígitos.

La cantidad de trabajos que se pueden almacenar en el disco duro optativo depende del espacio en disco disponible. Cuando se alcanza la capacidad máxima del disco duro y se envía un nuevo trabajo para almacenar, el trabajo almacenado más antiguo será reemplazado por el nuevo.

Para administrar los trabajos en el disco duro optativo (borrar, cambiar el nombre y organizar trabajos), utilice el software que se suministra con el disco duro. Otra forma de borrar un trabajo de impresión del disco duro consiste en utilizar el lector de código de barras BC-1 optativo. Imprima una lista de trabajos con código permanente. Explore el código de barras Inicio de eliminación de trabajos, luego explore el código de barras situado a la derecha debajo de Eliminación de trabajos.

Impresión de trabajos almacenados

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Salida

Configuración del trabajo

Ficha Configuración de dispositivos

Disco duro

Lector de código de barras


Impresión de trabajos de copia rápida adicionales

Para imprimir trabajos de copia rápida adicionales desde el panel frontal de la impresora, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione el botón MENU.

2.	Presione la tecla ^ repetidas veces hasta que aparezca e-MPS en el visor y luego presione la tecla >.

3.	Presione la tecla ^ varias veces hasta que aparezca Copia rápida en el visor y luego presione la tecla INTRO.

4.	Recorra los nombres de usuario de los trabajos de impresión presionando la tecla ^ según sea necesario hasta que aparezca el nombre buscado y presione la tecla INTRO.

5.	Recorra los nombres de lD de los trabajos presionando la tecla ^ según sea necesario hasta que aparezca el nombre buscado y presione la tecla INTRO.

6.	Seleccione la cantidad de copias que desea imprimir utilizando la tecla ^ o V para aumentar o reducir la cantidad. Puede seleccionar de 1 a 999 copias. Si selecciona cero se borrará el trabajo de copia rápida.

7.	Presione la tecla INTRO para imprimir el trabajo de copia rápida.


Impresión del resto de los trabajos para revisar y retener
Impresión del resto de las copias para revisar y retener

Para imprimir las copias restantes para revisar y retener desde el panel frontal de la impresora, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione el botón MENU.

2.	 Presione la tecla ^ repetidas veces hasta que aparezca e-MPS en el visor y luego presione la tecla >.

3.	Presione la tecla ^ varias veces hasta que aparezca Copia rápida en el visor y luego presione la tecla INTRO.

4.	Recorra los nombres de usuario de los trabajos de impresión presionando la tecla ^ según sea necesario hasta que aparezca el nombre buscado y presione la tecla INTRO.

5.	Recorra los nombres de lD de los trabajos presionando la tecla ^ según sea necesario hasta que aparezca el nombre buscado y presione la tecla INTRO.

6.	Seleccione la cantidad de copias que desea imprimir utilizando la tecla ^ o V para aumentar o reducir la cantidad.  Puede seleccionar de 1 a 999 copias. Si selecciona cero se borrará el trabajo para revisar y retener.

7.	Presione la tecla INTRO para imprimir el resto de las copias para revisar y retener.


Impresión de trabajos de impresión privada

Para imprimir trabajos de impresión privada adicionales desde el panel frontal de la impresora, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione el botón MENU.

2.	Presione la tecla ^ repetidas veces hasta que aparezca e-MPS en el visor y luego presione la tecla >.

3.	Presione la tecla ^ varias veces hasta que aparezca Privado/Almacenado en el visor y luego presione la tecla INTRO.

4.	Presione la tecla ^ varias veces hasta que aparezca el nombre de usuario deseado en el visor y luego presione la tecla INTRO.

5.	Presione la tecla ^ varias veces hasta que aparezca el nombre de trabajo deseado en el visor y luego presione la tecla INTRO.

6.	Introduzca el código de acceso correcto utilizando las teclas <, >, ^ y V. Presione INTRO para enviar el código de acceso al sistema.

7.	Seleccione la cantidad de copias que desea imprimir utilizando la tecla ^ o V para aumentar o reducir la cantidad. Puede seleccionar de 1 a 999 copias. Si selecciona cero se borrará el trabajo de impresión privada.

8.	Presione la tecla INTRO para imprimir un trabajo de impresión privada.

El trabajo de impresión privada se borra una vez impreso a menos que se lo haya almacenado con la función Almacenar trabajos.


Impresión de trabajos almacenados

Para imprimir trabajos almacenados desde el panel frontal de la impresora, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione el botón MENU.

2.	Presione la tecla ^ repetidas veces hasta que aparezca e-MPS en el visor y luego presione la tecla >.

3.	Presione la tecla ^ varias veces hasta que aparezca Privado/Almacenado en el visor y luego presione la tecla INTRO.

4.	Presione la tecla ^ varias veces hasta que aparezca el nombre de usuario deseado en el visor y luego presione la tecla INTRO.

5.	Presione la tecla ^ varias veces hasta que aparezca el nombre de trabajo deseado en el visor y luego presione la tecla INTRO.

6.	Si se envió un código de acceso junto con el trabajo, ingrese el Código de acceso correcto pulsando las teclas <, >, ^ y V. Presione INTRO para enviar el código de acceso al sistema.

7.	Seleccione la cantidad de copias que desea imprimir utilizando la tecla ^ o V para aumentar o reducir la cantidad. Puede seleccionar de 1 a 999 copias. Si selecciona cero se cancelará el trabajo de impresión.

8.	Presione la tecla INTRO para imprimir el trabajo almacenado.

Los trabajos se almacenan de forma permanente y no se borran al apagar la impresora.


 Ficha Prólogo/Epílogo

Permite incluir comandos PRESCRIBE en un documento como un archivo de texto. Los archivos de texto se seleccionan dentro del controlador y se convierten en archivos de datos de Prólogo/Epílogo. Está disponible en todos los modos de emulación.

Los comandos PRESCRIBE pueden controlar las funciones de la impresora, o bien, incluir macros que afectan a la salida impresa. Por ejemplo, estos comandos pueden insertar un membrete, un formulario, un cambio de emulación de impresora o bien, del origen del papel en ciertas páginas. PRESCRIBE es un lenguaje de comandos residente orientado al usuario que amplía las posibilidades de la copiadora digital/impresora de red.

Para usar esta función Plug in con el Kyocera Mita Extended Driver, seleccione la opción de módulo Prólogo/Epílogo cuando seleccione el controlador en el CD Kyocera Mita Digital Library. Para agregar dicho módulo a un controlador ya seleccionado, vuelva a instalar el Kyocera Mita Extended Driver y seleccione el Módulo Prólogo/Epílogo. Una vez seleccionado, aparecerá la ficha Prólogo/Epílogo en la interfaz de usuario. El módulo aparecerá en el cuadro de diálogo Información de Plug in al que se accede desde la ficha Acerca de.

Nota: las opciones para Comienzo de la página y Fin de la página sólo están disponible si se selecciona PCL 5e como Lenguaje de descripción de páginas en el cuadro de diálogo Configuraciones del usuario.

La ficha Prólogo/Epílogo incluye:

• Archivos de datos Prólogo/Epílogo	Seleccione el archivo de datos Prólogo/Epílogo deseado de la lista. Los comandos se guardan en formato de archivo de texto (.txt).
• Agregar	Haga clic en Agregar... para buscar los archivos de comandos PRESCRIBE que se dispone a agregar a la lista de archivos de datos Prólogo/Epílogo.
• Eliminar	Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Eliminar para eliminarlo de la lista.
• Editar	Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Editar.... El archivo se abrirá en Bloc de notas donde podrá modificar el texto.
• Desactivar función	Borre la marca de la casilla para activar las funciones de la ficha Prólogo/Epílogo. Todos los archivos que aparecen en la lista de archivos de datos Prólogo/Epílogo se aplicarán al trabajo de impresión a menos que estén definidos como Ninguno (Sin asignar). Seleccione la casilla para desactivar las funciones y los archivos.
Punto de inserción:	Permite seleccionar el punto de inserción para incluir los archivos de datos Prólogo/Epílogo. Elija un punto de inserción para cada archivo de datos.
• Ninguno [Sin asignar]	Si en la lista de archivos de datos Prólogo/Epílogo aparecen varios archivos de datos, puede desactivar ciertos archivos definiéndolos individualmente como Ninguno [Sin asignar]. Se aplican los archivos que no fueron definidos como Ninguno [Sin asignar] a los trabajos de impresión.
• Comienzo del trabajo de impresión	Inserta un archivo de datos Prólogo/Epílogo en la primera página de un trabajo de impresión.
• Fin del trabajo de impresión	Inserta un archivo de datos Prólogo/Epílogo al final de un trabajo de impresión.
• Comienzo de la página	Inserta un archivo de datos Prólogo/Epílogo al comienzo de cada página de un trabajo de impresión. Seleccione una opción de página: • Sólo en páginas impares inserta un archivo de datos Prólogo/Epílogo a todas las páginas de numeración impar. • Sólo en páginas pares inserta un archivo de datos Prólogo/Epílogo a todas las páginas de numeración par. • Páginas inserta un archivo de datos Prólogo/Epílogo en determinado número de página o rango de páginas. Si no se indica ningún número de página, se insertará un archivo de datos Prólogo/Epílogo en todas las páginas.
• Fin de la página	Inserta un archivo de datos Prólogo/Epílogo al final de cada página de un trabajo de impresión. Seleccione una opción de página: • Sólo en páginas impares inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración impar. • Sólo en páginas pares inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración par. • Páginas inserta un archivo de datos Prólogo/Epílogo en determinado número de página o rango de páginas. Si no se indica ningún número de página, se insertará un archivo de datos Prólogo/Epílogo en todas las páginas.

Véase también

Ficha Configuración de dispositivos

Configuraciones del usuario

Ficha Acerca de


 Ficha Acerca de

La ficha Acerca de muestra el nombre del controlador, la versión, el número de compilación y demás información sobre el sistema. Esta información puede ser solicitada por el representante técnico.

• Versión	Muestra información sobre los componentes del controlador instalados.
• Plug In	Muestra información sobre los módulos plug in optativos.

Otras fichas de propiedades

Ficha Papel

Ficha Distribución

Ficha Imágenes

Ficha Salida

Ficha Configuración de dispositivos

Véase también

Acceso a la ficha Configuración de dispositivos


 Ficha Configuración de dispositivos

La ficha Configuración de dispositivos permite seleccionar qué opciones de la impresora están instaladas para que puedan usarse las funciones asociadas con el controlador de impresora. Puede configurar la memoria del controlador de modo que coincida con la memoria de la impresora, de modo que el controlador pueda manejar mejor la transferencia de fuentes.

La ficha Configuración de dispositivos incluye:	Véase también
Opciones de dispositivos	Alimentador de papel
Configuración de disco duro	Alimentador de sobres
Configuraciones del usuario	Unidad dúplex
Configuraciones del administrador	Disco duro
Memoria	Apilador clasificador
Disco RAM	Alimentadores y apiladores de gran capacidad
Imagen 3-D


 Opciones de dispositivos

Permite seleccionar dispositivos instalados. Si ha instalado uno o varios dispositivos optativos para la impresora, seleccione la casilla de verificación ubicada junto al dispositivo. Haga clic en Aceptar para activar los dispositivos en el controlador de impresora.

La impresora admite los siguientes dispositivos optativos:

• Alimentador de papel	Origen del papel de 500 hojas.
• Alimentador de sobres	Alimenta sobres desde una pila que no supere los 40 mm (1,5 pulgadas) de alto.
• Alimentador de gran capacidad	Origen del papel de 2000 hojas.
• Unidad dúplex	Permite efectuar impresiones a doble faz.
• Disco duro	Unidad de disco que ofrece 340 MB de memoria de almacenamiento.
• Apilador clasificador	Permite ordenar, clasificar e intercalar los trabajos de impresión y enviarlos a los cinco buzones.
• Apilador de gran capacidad	Apilador con capacidad para 2000 hojas.
• Disco RAM	Permite asignar cierta cantidad de memoria de impresora como disco RAM para el almacenamiento temporal en memoria caché de los trabajos.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Configuración de disco duro

Configuraciones del usuario

Configuraciones del administrador

Memoria


 Alimentadores y apiladores de gran capacidad

Para grandes volúmenes de impresión se dispone de alimentadores y apiladores de gran capacidad que pueden utilizarse con ciertos modelos. La impresora admite los siguientes alimentadores y apiladores de gran capacidad:

• Alimentador de gran capacidad	Alimentador de papel con capacidad para 2000 hojas.
• Apilador de gran capacidad	Apilador con capacidad para 2000 hojas.

No es posible seleccionar el alimentador de gran capacidad si están instalados y seleccionados el alimentador de papel o de sobres. Para usar el Alimentador de gran capacidad, tanto éste como la impresora deben colocarse sobre la base.

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Configuración de disco duro

Configuraciones del usuario

Configuraciones del administrador

Memoria

Disco RAM


 Configuración de disco duro

Permite asignar un nombre de buzón y un número de bandeja de salida virtual. Esta función sólo estará disponible si se ha instalado un disco duro optativo en la impresora y se lo ha seleccionado en la ficha Configuración de dispositivos en el cuadro de diálogo Opciones de dispositivos.

Los trabajos que se encuentran en un buzón virtual se pueden imprimir desde el panel frontal de la impresora o bien, mediante un lector de códigos de barras BC-1 para explorar el código de barras en la lista de buzones virtuales.

Asignación de un nombre de buzón y una bandeja de salida virtual

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos	Configuraciones del administrador
Opciones de dispositivos	Memoria
Disco duro	Disco RAM
Configuraciones del usuario	Lector de código de barras


Asignación de un nombre de buzón y de una bandeja de salida virtual

Para asignar un nombre de buzón y una bandeja de salida virtual, proceda según se indica a continuación:

1.	Seleccione la casilla de verificación Disco duro y, a continuación, haga doble clic en el texto Disco duro resaltado y escrito en color azul.

Se abre el cuadro de diálogo Configuración de disco duro.

2.	Escriba un nombre en Nombre de buzón, con un máximo de 31 caracteres.

3.	Escriba uno o varios números en Bandeja de salida virtual. Utilice comas para separar los números y los rangos. Por ejemplo: 1, 3, 5-12. Los números se deben seleccionar de 1 a 255, la cantidad máxima de buzones que se pueden definir.

4.	Haga clic en Guardar.

El nombre del buzón se incorporará a la lista de la ventana Nombres definidos.

•	Para cambiar de bandeja de salida virtual, seleccione el nombre en Nombres definidos, el o los números en Bandeja de salida virtual, escriba otros números o rangos y haga clic en Guardar.

El nombre del buzón permanecerá en la lista de la ventana Nombres definidos asociado con el o los nuevos números de bandeja de salida virtual.

•	Para eliminar un elemento de lista Nombres definidos, selecciónelo en la ventana Nombres definidos y haga clic en Eliminar.

•	Debido a que no se dispone de una función para cambiar de nombre, deberá eliminar el nombre definido e comenzar de cero con un nuevo nombre de buzón.


 Configuraciones del usuario

Permite especificar nombres de usuario y de departamento para seleccionar un Lenguaje de descripción de páginas y para definir ajustes KPDL adicionales. Haga clic en el botón Usuario... para abrir el cuadro de diálogo Configuraciones del usuario.

Identificación

Designa un Nombre de usuario y de Departamento que se puede visualizar en el panel frontal de la impresora durante la impresión. Estos nombres no deben superar los 31 caracteres. Escriba el nombre en el cuadro y haga clic en Aceptar. El administrador puede crear una política que permita visualizar esta información en el panel frontal de la impresora y utilizarlo en reemplazo del nombre del trabajo para almacenar los trabajos en el disco duro de la impresora. Se puede especificar un Nombre del trabajo (sea personalizado o definido por la aplicación) en el cuadro de diálogo Configuración del trabajo al que se accede desde la ficha Salida.

Visualización de un nombre en el panel frontal

Lenguaje de descripción de páginas

En la lista Lenguaje de descripción de páginas, seleccione entre estas opciones:

PCL XL	Mejor que el PCL 5e en estas áreas. • Menor tamaño de archivo. • Mayor velocidad de impresión. • Regreso más veloz a la aplicación. • No posee compatibilidad retroactiva con versiones anteriores de PCL.
PCL 5E	• Menor tamaño de archivo. • Mayor velocidad de impresión, en especial con texto y gráficos simples. • Utiliza menos memoria de impresión que KPDL. • Permite más opciones para utilizar comandos PRESCRIBE desde las aplicaciones. • Es posible que los gráficos complejos no se impriman correctamente.
KPDL	• Emulación de Kyocera de la impresión PostScript®. • Buena reproducción de gráficos. • La velocidad de impresión puede ser menor que con PCL 5e. • Utiliza más memoria de impresora que PCL 5e.

Configuraciones de PCL XL y 5e

Con PCL XL o PCL 5e seleccionado como lenguaje de descripción de páginas, haga clic en Configuración… para abrir el cuadro de diálogo Configuración PCL XL o Configuración PCL 5e.

• Imprimir texto en negro	Imprime el texto en color con tóner negro en lugar de escala de grises. El texto en blanco y los colores de las imágenes no se ven alterados.

Opciones para KPDL

Se dispone de cuatro mejoras de impresión si se selecciona KPDL como Lenguaje de descripción de páginas. Haga clic en Configuración... para abrir el cuadro de diálogo Configuración KPDL y seleccione entre las opciones siguientes:

• Impresión a espejo	Imprime los datos hacia atrás como si aparecieran en una imagen especular.
• Imagen inversa	Imprime la página en negativo, invirtiendo las imágenes en blanco y negro.
• Permitir transferencia de datos	Disponible para documentos extremadamente complejos. También sirve para resolver problemas de compatibilidad con aplicaciones PostScript®.
• Imprimir texto en negro	Imprime el texto en color con tóner negro en lugar de escala de grises. El texto en blanco y los colores de las imágenes no se ven alterados.

Modo compatible con GDI

Para los lenguajes de descripción de páginas basados en PCL, el Kyocera Mita Extended Driver admite la impresión en el Modo Compatible con GDI. Este modo le indica al módulo PDL que muestre todo correctamente en la pantalla. Genera datos en un formato de impresión de tipo raster que, si bien es un archivo de impresión de gran tamaño, es más parecido a lo que se muestra en pantalla. El componente GDI (Microsoft Graphical Device Interface) genera un documento impreso tal como aparece en pantalla.

Unidades

Especifica si la unidad de medida para Tamaños personalizados de papel y Configuración de margen interno será Pulgadas o Milímetros.

Acceso a la ficha Configuración de dispositivos

Véase también
Ficha Configuración de dispositivos	Ficha Papel
Opciones de dispositivos	Tamaños de papel personalizados
Configuración de disco duro	Ficha Distribución
Configuraciones del administrador	Páginas por hoja
Memoria	Configuración del margen interno
Disco RAM


 Configuraciones del administrador

Permite visualizar información sobre el trabajo en el panel frontal de la impresora, volver a asignar los números de origen del papel y establecer una contraseña con fines de seguridad. Haga clic en el botón Administrador... para abrir el cuadro de diálogo Configuraciones del administrador.

Mensaje del panel frontal

Puede elegir un nombre para que se visualice en el panel frontal de la impresora mientras se imprime el trabajo. Puede optar entre el Nombre del trabajo, el Nombre del usuario y el del Departamento.

•	Defina el nombre del trabajo en el cuadro de diálogo Configuración del trabajo, al que se accede desde la ficha Salida.

•	Defina el nombre de usuario y el departamento en el cuadro de diálogo Configuraciones de usuario.

Visualización de un nombre en el panel frontal

Configuraciones de compatibilidad

Permite que un administrador pueda establecer valores para los orígenes de papel de forma tal que el Kyocera Mita Extended Driver sea compatible con los controladores anteriores. Esta alineación de orígenes de papel antiguos y nuevos asegura la compatibilidad de todos los documentos creados con otros controladores con el nuevo Kyocera Mita Extended Driver.

Nueva asignación de valores de origen del papel

Definir contraseña

Permite que el administrador defina una contraseña para todas las funciones de configuración del administrador. No es necesario definir una contraseña para utilizar las funciones de Configuraciones del administrador. Sin embargo, si se ha definido una contraseña, estas funciones no estarán disponibles a menos que se ingrese la contraseña en el cuadro de diálogo Ingresar contraseña.

Haga clic en Definir contraseña.... Escriba la contraseña una vez y repítala para confirmarla, luego haga clic en Aceptar. A continuación, el cuadro de diálogo Configuraciones del administrador mostrará Modificar contraseña.... Haga clic en Modificar contraseña... para abrir el cuadro de diálogo Ingresar contraseña, escriba la contraseña y haga clic en Aceptar.

Acceso a la ficha Configuración de dispositivos

Véase también
Ficha Configuración de dispositivos	Memoria
Opciones de dispositivos	Disco RAM
Configuración de disco duro	Ficha Salida
Configuraciones del usuario	Configuración del trabajo


Visualización de un nombre en el panel frontal

Para seleccionar un nombre, proceda de la siguiente forma:

1.	En el cuadro de diálogo Configuraciones del administrador:

•	Si se ha definido una contraseña, haga clic en Modificar contraseña..., escriba la contraseña y haga clic en Aceptar. Luego seleccione Mensaje del panel frontal.

•	Si no se ha definido ninguna contraseña, seleccione Mensaje del panel frontal.

2.	Seleccione entre las tres opciones siguientes.

•	Mostrar nombre del trabajo

•	Mostrar nombre del usuario

•	Mostrar departamento

Nota: Se pueden definir el nombre del usuario y el departamento en el cuadro de diálogo Configuraciones del usuario al que se accede desde la ficha Configuración de dispositivos. Puede definir el nombre del trabajo en el cuadro de diálogo Configuración del trabajo al que se accede desde la ficha Salida.


Nueva asignación de valores para el origen del papel

Para volver a asignar valores para el origen del papel, proceda de la siguiente forma:

1.	En el cuadro de diálogo Configuraciones del administrador, haga clic en Configuraciones de compatibilidad....

Se abre el cuadro de diálogo Configuraciones de compatibilidad.

2.	En la lista seleccione el origen que se dispone a reasignar.

3.	Escriba el valor correcto en el campo Valor enumerado.

4.	Haga clic en Aplicar.

El nuevo valor se asignará al origen seleccionado.

5.	Para restablecer los valores predeterminados del origen, haga clic en Restaurar.

6.	Cuando haya terminado, haga clic en Aceptar.


 Memoria

Permite equiparar la configuración de memoria del controlador de impresora con la memoria instalada en la impresora. La configuración de memoria predeterminada en el controlador de impresora es 8MB para la FS-1800 y FS-1800+, 16MB para la FS-3800. Las configuraciones de memoria disponibles son:

• FS-1800, FS-1800+	8, 24, 40, 56, 72, 88, 104, 136, 152, 168, 200, y 264 MB
• FS-3800	16, 32, 48, 64, 80, 96, 112, 144, 160, 176, 208, y 272 MB
Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Configuraciones del usuario

Configuraciones del administrador

Disco RAM

Modo doble faz


 Disco RAM

Permite asignar cierta cantidad de memoria de impresora como disco RAM para el almacenamiento temporal en memoria caché de los trabajos. Disco RAM no está disponible hasta que se hayan instalado 12 MB de memoria en la impresora y se haya seleccionado en la ventana Memoria de la ficha Configuraciones de dispositivo.

Con el Disco RAM instalado y la función Intercalar en Opciones de acabado de la ficha Salida seleccionada, los trabajos intercalados de varias copias se imprimirán a la velocidad nominal de la impresora.

No se puede seleccionar la función Disco RAM si se ha instalado y seleccionado el disco duro optativo. Si se ha seleccionado el disco duro, deberá quitarlo para usar el disco RAM.

La memoria del disco RAM es temporal. Todos los datos enviados al disco RAM se pierden cuando se restaura o apaga la impresora.

Activar el disco RAM desde el panel frontal de la impresora

Acceso a la ficha Configuración de dispositivos

Véase también
Ficha Configuración de dispositivos	Configuraciones del administrador
Opciones de dispositivos	Memoria
Configuración de disco duro	Ficha Salida
Configuraciones del usuario	Opciones de acabado


Activar el disco RAM desde el panel frontal de la impresora

Para utilizar el disco RAM, es necesario que la impresora cuente con 12 MB de RAM como mínimo. Siga las instrucciones que se incluyen a continuación para activar el disco RAM y asignar memoria desde el panel frontal de la impresora. Además de este requisito, también es necesario activar el Disco RAM en el controlador de impresora en la ficha Configuraciones de dispositivo.

Para activar el disco RAM desde el panel frontal de la impresora, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione la tecla MENU.

2.	Presione la tecla ^ hasta que aparezca Modo de Disco RAM en el visor y luego presione la tecla INTRO.

3.	Cuando aparece un signo ? intermitente debajo de Disco RAM, presione la tecla ^ hasta que aparezca Encendido.

4.	Presione la tecla INTRO.

La memoria también se debe asignar en el panel frontal de la impresora después de haber activado el disco RAM.

5.	Cuando se visualice Modo Disco RAM en el panel frontal, presione la tecla >.

6.	Cuando se visualice Tamaño de Disco RAM en el panel frontal, presione la tecla INTRO.

7.	Cuando aparezca un _ intermitente debajo del dígito que aparece en el extremo derecho; presione la tecla ^ o V  hasta que se visualice la cantidad de memoria apropiada.

La cantidad de memoria máxima disponible para las asignaciones depende de la cantidad de memoria instalada y disponible para usar. La impresora usa aproximadamente 4MB de memoria del sistema que no puede asignarse.

8.	Presione la tecla INTRO. Presione la tecla MENU.

9.	Es necesario restaurar la impresora o apagarla y volver a encenderla para finalizar la tarea.


 Alimentador de papel

El Alimentador de papel es un origen de papel optativo con capacidad para 500 hojas. Para usar este origen del papel, instálelo debajo del cassette interno de la impresora y selecciónelo como una de las Opciones de dispositivos en la ficha Configuraciones del dispositivo. Se pueden conectar hasta tres alimentadores de papel a la impresora, incrementando entonces la capacidad de papel a un total de 2000 hojas.

El alimentador de papel puede usarse con todos los demás dispositivos de impresión optativos. Si utiliza el alimentador junto con una unidad Dúplex, conecte esta última directamente por debajo del alimentador o alimentadores de papel.

Tamaños de página admitidos por el alimentador de papel

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tipos de papel admitidos por el alimentador de papel

Común, Transparencia, Etiquetas, Papel Bond, Papel pergamino

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Ficha Papel

Origen


 Alimentador de sobres

El Alimentador de sobres es un origen de papel optativo diseñado especialmente para sobres. Su capacidad máxima depende del grosor de los sobres cargados. La altura de la pila de sobres no debe superar los 40 mm (1,5 pulgadas).

El alimentador de sobres debe estar instalado en la impresora y seleccionado en las Opciones de dispositivos de la ficha Configuración de dispositivos. No es posible usar sobres con la unidad dúplex ni con el acabador clasificador.

El alimentador de sobres no admite sobres de tamaños personalizados, únicamente tamaños estándar. Si se usan otros tamaños, se puede averiar el dispositivo.

Tamaños de sobres admitidos por el alimentador de sobres

Sobre #6, Sobre #9, Sobre #10, Sobre Monarch, Sobre DL, Sobre C5

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Ficha Papel

Origen


 Unidad dúplex

La unidad Dúplex permite imprimir en ambas caras de la hoja. Instale la unidad Dúplex directamente por debajo del cuerpo principal de la impresora y por encima de el o los alimentadores de papel que haya conectado. También es preciso colocar la bandeja cara arriba.

Para usar la unidad Dúplex, selecciónela e instálela como una Opción de dispositivo en la ficha Configuración de dispositivos. Para usar la impresión de doble faz seleccione Imprimir en ambas caras (dúplex) en la ficha Distribución. Luego puede elegir cómo se realiza la impresión de doble faz seleccionando entre Voltear por el borde largo y Voltear por el borde corto.

La unidad Dúplex no brinda soporte a ciertos tipos de papel. Su uso dará como resultado atascos e incluso puede dañar la unidad.

Tamaños de página admitidos por la unidad dúplex

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tipos de papel admitidos para la impresión dúplex o de doble faz

Papel normal, Preimpreso, Bond, Reciclado, Áspero, Papel membretado, Color, Perforado, Personalizado

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Ficha Distribución

Modo doble faz


 Disco duro

Se trata de un disco duro optativo que proporciona 340 MB de memoria de almacenamiento. Para usar el Disco duro instálelo en la ranura para tarjeta IC de la impresora y luego selecciónelo como una Opción de dispositivo en la ficha Configuración de dispositivos.

El disco duro brinda la posibilidad de almacenar de forma permanente trabajos de impresión utilizando la función de almacenamiento de trabajos. Si se instala el disco duro, no se puede usar el disco RAM.

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos	Memoria
Opciones de dispositivos	Disco RAM
Configuración de disco duro	Ficha Salida
Configuraciones del usuario	Configuración del trabajo
Configuraciones del administrador


 Apilador clasificador

El apilador clasificador es un destino de salida de gran capacidad que permite clasificar, intercalar y distribuir en cinco buzones los trabajos de impresión. Para activar las funciones del apilador clasificador, conecte el dispositivo a la impresora e instálelo como una Opción de dispositivo en la ficha Configuración de dispositivos. Luego elija Buzón (Cara abajo) como destino de salida.

Cada bandeja de buzón puede alojar un máximo de 200 hojas (100 hojas para el tamaño Legal). Las cinco bandejas reciben los trabajos con la cara abajo (cara impresa hacia abajo).

Tamaños de página admitidos por el apilador clasificador

Letter, Legal, A4, A5, B5 (JIS), Personalizado

Tipos de papel admitidos por el apilador clasificador

Común, Transparencia, Etiquetas, Papel Bond, Papel pergamino

Acceso a la ficha Configuración de dispositivos

Véase también

Ficha Configuración de dispositivos

Opciones de dispositivos

Configuración de disco duro

Configuraciones del usuario

Configuraciones del administrador

Memoria

Disco RAM


 Imagen 3-D

Las fichas Papel, Distribución, Imágenes, Salida y Configuración de dispositivos contienen una imagen 3-D que ilustra ciertas funciones de la ficha.

Ficha Papel

Ilustra la selección de Origen resaltada en verde.

Ficha Distribución

Ilustra las opciones seleccionadas de Páginas por hoja, Imprimir bordes, Distribución, Escala y Modo doble faz.

Ficha Imágenes

Ilustra la configuración del Ajuste de Escala de grises.

Ficha Salida

Ilustra la ubicación de la salida. Si se instalan dispositivos de salida optativos, la ubicación de salida de la bandeja de gran capacidad, del buzón y de la bandeja superior aparece resaltada.

Ficha Configuración de dispositivos

Ilustra la opción seleccionada de Opciones de dispositivos. Cuando se instala un dispositivo optativo en la impresora y se selecciona en la lista Opciones de dispositivos, ese dispositivo aparece adosado a la impresora en la imagen. El Disco duro no aparece en la imagen.


Definición de la bandeja multifunción como cassette

Si se define la bandeja multifunción como cassette se obtiene mayor velocidad de impresión que si se la define como primera. No obstante, con la configuración de cassette, no se puede utilizar la bandeja multifunción para impresiones a doble faz.

Para definir la bandeja multifunción como cassette, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione la tecla MENU.

2.	Presione la tecla ^ hasta que aparezca Manejo del papel en el visor y luego presione la tecla >.

3.	Presione la tecla ^ hasta que aparezca Modo bandeja multif. en el visor y, a continuación, presione la tecla INTRO.

4.	Cuando aparece un signo ? intermitente debajo de Modo bandeja multif., presione la tecla ^ hasta que aparezca Cassette.

5.	Presione la tecla INTRO y, a continuación, MENU.

El ajuste Primero anula la selección de Origen del papel e indica a la impresora que seleccione primero el alimentador multifunción si está cargado. Si el alimentador multifunción no está cargado, la opción elegida para Origen del papel determinará el origen del papel.


Definición de la bandeja multifunción como primera

Al definir la bandeja multifunción en la opción primera, la impresora automáticamente toma el papel colocado en la bandeja multifunción aun cuando se haya definido otro origen para el papel en el controlador. Agotado el papel de la bandeja multifunción, la impresora tomará el papel del origen definido en un principio.

Para definir la bandeja multifunción como primera, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione la tecla MENU.

2.	Presione la tecla ^ hasta que aparezca Manejo del papel en el visor y luego presione la tecla >.

3.	Presione la tecla ^ hasta que aparezca Modo bandeja multif. en el visor y, a continuación, presione la tecla INTRO.

4.	Cuando aparece un signo ? intermitente debajo de Modo Bandeja multif., presione la tecla ^ hasta que aparezca Primero.

5.	Presione la tecla INTRO y, a continuación, MENU.


Definición de tamaños de papel para la bandeja multifunción

La bandeja multifunción debe definirse correctamente para utilizar el tipo de papel correcto como origen.

Para definir los tamaños de papel para la bandeja multifunción, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione la tecla MENU.

2.	Presione la tecla ^ hasta que aparezca Manejo del papel en el visor y luego presione la tecla >.

3.	Presione la tecla ^ hasta que aparezca Tamaño bandeja multif. en el visor y luego presione la tecla INTRO.

4.	Cuando aparece un signo ? intermitente debajo de Tamaño Bandeja multif., presione la tecla ^ hasta que aparezca el tamaño de papel deseado.

5.	Presione la tecla INTRO y, a continuación, MENU.


Definición de tipos de papel para los cassettes y la bandeja multifunción

Los cassettes y la bandeja multifunción deben definirse correctamente para utilizar el tipo de papel correcto como origen.

Para definir el tipo de papel para los cassettes y la bandeja multifunción, proceda según se indica a continuación:

1.	En el panel frontal de la impresora, presione la tecla MENU.

2.	Presione la tecla ^ hasta que aparezca Manejo del papel en el visor y luego presione la tecla >.

3.	Busque el origen del papel que quiera utilizar (cassette o bandeja multifunción) presionando la tecla ^ y luego presione la tecla INTRO.

4.	Cuando en el visor aparece un signo ? intermitente junto a un tipo de papel debajo del origen, use la tecla ^ para recorrer las distintas opciones hasta que aparezca la de su interés; luego presione la tecla INTRO.

5.	Presione la tecla MENU.


Acceso a la ficha Configuración de dispositivos

La ficha Configuración de dispositivos permite seleccionar qué opciones de la impresora están instaladas para que se puedan usar las respectivas funciones con el controlador de impresora.

Para acceder a la ficha Configuración de dispositivos, proceda según se indica a continuación:

1.	Abra el menú Inicio, ubicado en la esquina inferior izquierda de la pantalla de Windows.

2.	Seleccione Configuración.

3.	Seleccione Impresoras.

4.	Haga clic con el botón derecho en la impresora de su interés.

5.	Seleccione Propiedades.

6.	Seleccione la ficha Configuración de dispositivos.


Especifica un tamaño de papel o de sobre para el trabajo de impresión entre las opciones que se enumeran en la lista.


Abre el cuadro de diálogo Tamaños de papel personalizados, que le permite seleccionar un tamaño de papel personalizado.


Especifica el tamaño de la salida impresa de acuerdo con el tamaño de página elegido.


Especifica de dónde provendrá el papel para el trabajo sobre la base de la ubicación física, el tipo de papel o el tipo personalizado.


Define que la impresora haga coincidir el tipo y el origen del papel utilizado en el trabajo de impresión.


Especifica en qué dirección se colocarán los datos en la página.


Imprime los datos en una página cuya altura es mayor que el ancho.


Imprime los datos en una página cuyo ancho es mayor que la altura.


Hace rotar los datos 180 grados en la página impresa.


El gráfico se modificará para ilustrar las opciones seleccionadas para la Orientación.


Permite crear dimensiones de página personalizadas, asignarles un nombre y guardarlas para utilizarlas en otro momento. Una vez definido el tamaño personalizado, se lo puede seleccionar entre los ajustes de Tamaño de página en la ficha Papel.


Muestra la lista de tamaños de papel personalizados.


Para crear un nuevo tamaño personalizado, haga clic en el botón Agregar... para abrir el cuadro de diálogo Editar tamaño de papel.


Para suprimir un tamaño de papel personalizado de la lista, selecciónelo y haga clic en Eliminar.


Para modificar o cambiar el nombre de un tamaño personalizado, haga clic en el botón Editar... para abrir el cuadro de diálogo Editar tamaño de papel.


Para definir o cambiar el nombre de un tamaño personalizado, escriba el nombre en el cuadro (longitud máxima de 31 caracteres).


Especifica la Altura y el Ancho del tamaño de papel personalizado.


Abre el cuadro de diálogo Configuraciones avanzadas para papel, que permite utilizar las opciones Modo Tapa, Insertar página e Intercalación en transparencias.


Indica a la impresora que incluya una tapa (o tapa y contratapa) con el trabajo de impresión.


Indica a la impresora que incluya solamente una tapa frontal con el trabajo de impresión.


Indica a la impresora que incluya una tapa y contratapa con el trabajo de impresión.


Selecciona la opción que desee, entre las opciones disponibles, para imprimir en la tapa y la contratapa.


Selecciona el origen para la tapa del menú Papel de tapa.


Ilustra las selecciones de Modo Tapa.


Indica a la impresora que inserte una hoja de separación entre una cantidad determinada de páginas impresas.


Imprime en el anverso de las páginas insertadas. Cuando se marca esta opción, en las hojas insertadas se imprimen datos que reflejan su posición respecto del trabajo de impresión completo. Por ejemplo, una página insertada entre las páginas 9 y 10 con la opción Imprimir en anverso seleccionada se imprimirá como la página 10. Si se elige también la opción Imprimir en reverso, ésta se imprimirá como las páginas 10 y 11.


Imprime en el reverso de las páginas insertadas. Cuando se marca esta opción, en las hojas insertadas se imprimen datos que reflejan su posición respecto del trabajo de impresión completo. Por ejemplo, una hoja insertada entre las páginas 9 y 10 con la opción Imprimir en anverso e Imprimir en reverso seleccionada se imprimirá como las páginas 10 y 11.


Indique los números de las páginas antes de las cuales se deben insertar las hojas. Indique un rango de páginas con un guión entre los números inicial y final del rango. Por ejemplo, para ubicar páginas insertadas antes de las páginas 5, 11, 12, 13 y 18, escriba 5, 11-13, 18.


Seleccione el origen para la página insertada en la lista Origen de la página.


Ilustra las selecciones de Insertar página.


Indica a la impresora que inserte una hoja de protección entre las transparencias impresas.


Seleccione para imprimir la misma información en la hoja de protección que en la transparencia.


Seleccione el origen para la hoja de protección en la lista Origen de la página de refuerzo.


Ilustra las selecciones de Intercalación en transparencias.


Desactiva todas las funciones del cuadro de diálogo actual.


Imprime más de una página en un hoja.


Agrega un borde a cada página impresa en la misma hoja.


Permite determinar en qué orden aparecerán las distintas páginas impresas en una hoja.


Permite imprimir en ambas caras de una hoja cuando se usa una unidad dúplex.


Permite imprimir documentos de varias páginas de modo tal que las copias terminadas puedan apilarse y plegarse en formato de librillo.


Cambia el tamaño de los datos impresos sin modificar su forma.


Permite incrementar el margen interno (espacio en blanco o medianil) en el lado izquierdo de la hoja impresa reduciendo de forma proporcional el texto y los gráficos. El margen interno más grande que se obtiene al desplazar el área impresa a la derecha un máximo de 25,4 mm (1 pulgada) puede hacer que las páginas de un librillo o con orificios de perforación sean más fáciles de leer. Cuando se usa con la impresión a doble faz, el margen interno de tamaño más grande se alinea uniformemente a ambos lados de la página.


Aumenta el margen interno (espacio en blanco) en el lado izquierdo de la hoja impresa reduciendo de forma proporcional el texto y los gráficos. Seleccione o escriba un valor entre 0,20 y 1 pulgadas (5,0 y 25,4 mm) y haga clic en Aceptar.


Establece la resolución del trabajo de impresión.


Selecciona las opciones adicionales deseadas en Resolución, Kyocera Image Refinement y EcoPrint.


Establece la resolución del trabajo de impresión. Selecciónela de la lista.


Ofrece opciones de resolución adicionales para el trabajo de impresión. Selecciónelas de la lista.


Crea una salida genuina de 1200 ppp, con alta resolución y detalle, pero a una velocidad inferior que Rápida 1200. La resolución mejorada sólo se aplicará a los objetos de imágenes. No existe diferencia entre la opción 1200 ppp y 600 ppp para el texto y los gráficos vectoriales.


Simula una salida de 1200 ppp incrementando la resolución de los objetos de imágenes en comparación con el ajuste de 600 ppp, y a una velocidad mayor que 1200 ppp. No existe diferencia entre la opción Rápida 1200 ppp y la de 600 ppp para el texto y los gráficos vectoriales.


Establece una resolución de 600 puntos por pulgada logrando alta resolución y una salida con alto grado de detalle tanto para el texto como los gráficos.


Establece una resolución de 300 puntos por pulgada reduciendo la calidad de las imágenes y aumentando la velocidad.


Uniformiza los bordes del texto y los gráficos de vectores. El ajuste predeterminado es Sí.


Reduce la cantidad de tóner que se utiliza en la página impresa para prolongar la vida útil del cartucho de tóner de modo que sea un producto tanto económico como ecológico. Debido a que se reduce la saturación del tóner, la totalidad de la imagen, incluidos los gráficos y el texto, se verá un poco más clara en la salida impresa. EcoPrint no aumenta la velocidad de impresión.


Ajusta el aspecto de las imágenes gráficas controlando el espectro de escala de grises.


Aclara u oscurece las imágenes gráficas del trabajo de impresión.


Controla los niveles de gris entre el negro y el blanco para las imágenes gráficas del trabajo de impresión.


Especifica cómo se envían las fuentes TrueType a la impresora.


Sustituye una fuente de impresora por una fuente de documento porque la impresora no brinda soporte a dicha fuente o bien, para cambiar una fuente de un documento extenso.


Selecciona la fuente de la aplicación no admitida por la impresora.


Selecciona la fuente de impresora que sustituye a la fuente de la aplicación.


Especifica la ubicación de salida para el trabajo de impresión.


Indica la cantidad de copias que se imprimirán.


Selecciona las opciones de salida.


Especifica el orden en que se imprimen las páginas de un trabajo de varias copias. Al mismo tiempo, aumenta la velocidad de impresión de este tipo de trabajos cuando se la usa con la opción Disco RAM.

Nota: la función Intercalar no funcionará correctamente con las aplicaciones de Adobe a menos que se haya instalado un disco RAM o un disco duro.


Envía el trabajo de impresión a cualquiera de los cinco buzones cuando el clasificador apilador está instalado.


Define las opciones de almacenamiento y permite que el usuario asigne un nombre al trabajo.


Almacena los trabajos de impresión temporalmente en la memoria de un disco duro optativo. Haga clic en el botón Opciones… para colocar un código de barras en el trabajo de impresión.


Almacena un trabajo en la memoria del disco duro optativo de la impresora para que no se borre cuando la impresora se apague o restaure. Haga clic en el botón Opciones… para colocar un código de barras en el trabajo de impresión.


Envía trabajos de impresión a las bandejas de salida virtuales que usted indique. Haga clic en el botón Selección… para seleccionar un buzón definido.


Especifica las opciones para colocar un código de barras en el trabajo de impresión.


Coloca un código de barras en el trabajo. Este código de barras se puede explorar luego mediante el lector de códigos de barras optativo BC-1.


Especifica un código de barras para la primera página del trabajo de impresión.


Especifica un código de barras para todas las páginas del trabajo de impresión.


Especifica una ID numérica para el trabajo que se imprimirá debajo del código de barras.


Especifica la ubicación del código de barras en la página.


Especifica si se imprime un código de barras horizontal o vertical.


Envía los trabajos de impresión a las bandejas de salida virtuales que usted indique en el disco duro optativo. Haga clic en el botón Selección… para seleccionar un buzón definido.


Especifica el o los buzones virtuales para los trabajos de impresión.


Permite almacenar un trabajo de impresión en el disco duro optativo de la impresora para que se pueda acceder a él e imprimirlo más adelante.


Imprime todas las copias de un trabajo, luego almacena el trabajo en el disco duro optativo de la impresora para utilizarlo más adelante. Se puede tener acceso desde el panel frontal de la impresora a los trabajos de copia rápida almacenados.


Imprime una copia de un trabajo de varias copias y luego guarda las copias restantes en el disco duro optativo de la impresora. La primera copia puede usarse como copia de "revisión". Las copias restantes se pueden imprimir en otro momento.


Envía trabajos de impresión protegidos a la impresora y los almacena en el disco duro optativo sin ninguna impresión inicial. Sólo se puede tener acceso e imprimir los trabajos de impresión privados almacenados desde el panel frontal de la impresora utilizando el código de acceso.


Esta función almacena los trabajos de impresión en el disco duro optativo de la impresora para imprimirlos en otra oportunidad. Los trabajos se guardan de forma permanente. Si se utiliza un código de acceso, sólo se puede acceder a los trabajos de impresión almacenados e imprimirlos desde el panel frontal de la impresora utilizando dicho código de acceso.


Especifica un código de acceso para usar con los trabajos de impresión privada o los de almacenamiento.


Especifica un nombre asignado al trabajo de impresión, que puede mostrarse en el panel frontal de la impresora.

•	Seleccione Definido por aplicación para permitir que la aplicación defina el nombre del trabajo.

•	Seleccione Personalizado para escribir el nombre que usted quiera.


Agrega las opciones de impresora seleccionadas para que las funciones respectivas se puedan usar en el controlador de la impresora.


Especifica la información de usuario y el lenguaje de descripción de páginas.


Muestra información sobre el trabajo en el panel frontal de la impresora, vuelve a asignar los valores de origen del papel y establece una contraseña con fines de seguridad.


Correlaciona la configuración de memoria del controlador con la memoria instalada en la impresora para que el controlador pueda administrar mejor la transferencia de fuentes.


Especifica la memoria de impresora que se ha asignado al disco RAM y permite usar la función de almacenamiento de los trabajos en memoria temporal caché para aumentar de este modo la velocidad de impresión.


Asigna un nombre de buzón y de bandeja de salida virtual para usar con la función de buzón virtual.

•	Escriba un nombre en Nombre de buzón, con un máximo de 31 caracteres.

•	Escriba los números o un rango de números (1-255) en Bandeja de salida virtual.

•	Haga clic en Guardar para guardarlo en Nombres definidos.

•	Para suprimirlo, seleccione el nombre en Nombres definidos y haga clic en Eliminar.


Enumera los buzones virtuales disponibles en el cuadro de diálogo Selección de buzón virtual.


Guarda el nombre de buzón asignado y lo muestra en la lista de Nombres definidos.


Elimina el nombre seleccionado de la lista de Nombres definidos.


Especifica un nombre de usuario y de departamento, con un máximo de 32 caracteres cada uno, que se podrán visualizar en el panel frontal.


Especifica un lenguaje de descripción de páginas entre las opciones disponibles.


Para los lenguajes de descripción de páginas basados en PCL, el controlador Kyocera Mita Extended Driver admite la impresión en el Modo Compatible con GDI. Este modo le indica al módulo PDL que muestre todo correctamente en la pantalla. Genera datos en un formato de impresión de tipo raster que, si bien es un archivo de impresión de gran tamaño, es más parecido a lo que se muestra en pantalla. El componente GDI (Microsoft Graphical Device Interface) genera un documento impreso tal como aparece en pantalla.


Especifica si la unidad de medida para Tamaños personalizados de papel y Configuración de margen interno será pulgadas o milímetros.


Especifica los ajustes de PCL para Imprimir texto en negro y los de KPDL para Impresión a espejo, Imagen inversa, Permitir transferencia de datos e Imprimir texto en negro.


Imprime los datos hacia atrás como si aparecieran en una imagen especular.


Imprime la página en negativo, invirtiendo las imágenes en blanco y negro.


Ideal para documentos extremadamente complejos. Puede resolver problemas de compatibilidad con aplicaciones PostScript® .


Imprime el texto en color con tóner negro en lugar de escala de grises. El texto en blanco y los colores de las imágenes no se ven alterados.


Especifica la información del trabajo que se muestra en el panel frontal mientras se imprime. Seleccione Mensaje del panel frontal y luego el nombre para mostrar.


Permite que el administrador defina y modifique una contraseña con fines de seguridad.


Especifica la contraseña deseada. Escriba una contraseña de 4 caracteres en el cuadro Nueva contraseña. Vuelva a escribirla en el cuadro Confirmar nueva contraseña.


Especifica la contraseña deseada. Escriba la contraseña definida en el cuadro Contraseña.


Muestra información sobre los componentes del controlador instalados.


Muestra información sobre los módulos plug in optativos.


Muestra información que puede resultar necesaria para los representantes de asistencia técnica.


Muestra el logotipo de Kyocera Mita.


Ilustra la opción elegida de Origen. El origen seleccionado aparecerá resaltado en la imagen.


Ilustra la función Páginas por hoja con imágenes para dos o más páginas en una hoja, Imprimir bordes alrededor de las páginas, Distribución, Escala y Modo doble faz.


Ilustra la configuración del Ajuste de escala de grises.


Ilustra la ubicación de la salida. Si se instalan dispositivos de salida optativos, la ubicación de salida de la bandeja de gran capacidad, del buzón y de la bandeja superior aparece resaltada.


Ilustra la opción seleccionada de Opciones de dispositivos. Cuando se instala un dispositivo optativo en la impresora y se selecciona en la lista Opciones de dispositivos, ese dispositivo aparece adosado a la impresora en la imagen. El disco duro no aparece en la imagen.


Restaura todas las definiciones predeterminadas correspondientes a la ficha actual.


Permite que un administrador pueda establecer valores para los orígenes de papel de forma tal que el Kyocera Mita Extended Driver sea compatible con los controladores anteriores. Esta correspondencia entre orígenes de papel nuevos y anteriores permite que todos los documentos creados con controladores antiguos sigan siendo compatibles con el Kyocera Mita Extended Driver.


Muestra una lista de los orígenes de los tipos de papel con sus valores asignados.


Asigna un nuevo valor al origen seleccionado. Una vez asignado, haga clic en Aplicar.


Haga clic en Aplicar para asignar un nuevo valor al origen seleccionado.


Restaura todos los valores de los orígenes del papel a sus ajustes predeterminados.


Contiene la lista de todos los archivos de comandos PRESCRIBE disponibles, guardados en formato de archivos de texto (.txt). Seleccione el archivo de datos deseado de la lista.


Haga clic en Agregar... para buscar los archivos de comandos PRESCRIBE que se dispone a agregar a la lista de archivos de datos Prólogo/Epílogo.


Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Eliminar para eliminarlo de la lista.


Seleccione un archivo de la lista de archivos de datos Prólogo/Epílogo y haga clic en Editar.... El archivo se abrirá en Bloc de notas donde podrá modificar el texto.


Borre la marca de la casilla para activar las funciones de la ficha Prólogo/Epílogo.


Permite seleccionar el punto de inserción para incluir los archivos de datos Prólogo/Epílogo. Elija un punto de inserción para cada archivo de datos.

Para poder definir esta opción es necesario seleccionar primero Comienzo de la página y Fin de la página.

• Sólo en las páginas impares	Inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración impar.
• Sólo en las páginas pares	Inserta un archivo de datos Prólogo/Epílogo en todas las páginas de numeración par.
• Páginas	Inserta un archivo de datos Prólogo/Epílogo en determinado número de página o rango de páginas. Si no se indica ningún número de página, se insertará un archivo de datos Prólogo/Epílogo en todas las páginas.