Copyright: Copyright © 2000-2002 Kyocera Corporation Copyright © 2000-2002 Kyocera Mita Corporation     KX Help 1.1
Citation: Copyright © 2000-2002 Kyocera Corporation Copyright © 2000-2002 Kyocera Mita Corporation     All Rights Reserved


 Register Medien

Mit dem Register Medien können Sie Seitengröße, Druckgröße, Medienart und Ausrichtung der gedruckten Seite angeben und auf weitere Materialeinstellungen zugreifen.

Das Register Medien enthält folgende Optionen:

Seitengröße	Quelle
Benutzerdefinierte Papiergröße	Medienart
Druckformat	Erweiterte Materialeinstellungen
Ausrichtung	3D-Bild


 Seitengröße

Damit können Sie ein Papier- oder Umschlagformat für Ihren Druckauftrag aus der angezeigten Liste auswählen. Seitengrößen hängen von der ausgewählten Papierquelle ab. Es werden z. B. keine Umschlagformate angezeigt, wenn die Papierquelle auf Kassette 2 eingestellt ist, weil Kassetten Umschläge nicht unterstützen. Umschläge können dem Drucker nur über die Mehrzweckzufuhr oder die Umschlagzufuhr zugeführt werden.

Um eine Spezialgröße einzustellen, klicken Sie auf die Schaltfläche Spezial…, um das Dialogfeld Benutzerdefinierte Papiergröße zu öffnen. Die Mehrzweckzufuhr unterstützt ein Mindestformat von 80 x 148 mm (3,1 x 5,8 Zoll) und ein maximales Papierformat von 216 x 356 mm (8,5 x 14 Zoll).

Die Kassette verfügt über eine einstellbare, drehbare Papierauswahlvorrichtung vorne innen an der Kassette, die so eingestellt werden muss, dass sie mit der Papiergröße in der Kassette übereinstimmt. Diese Einstellung wird von Druckersensoren gelesen. Die Mehrzweckzufuhr (Mehrzweckfach) hat keinen Sensor und muss lediglich im Treiber unter Seitengröße eingestellt werden.

Unterstützte Seitengrößen für die Kassette

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Papierzufuhr, Kassetten 2-4

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Mehrzweckzufuhr

Letter, Legal, Ledger, Executive, Statement, A4, A5, A6, Folio, B5 (JIS), B5 (ISO), B6 (JIS), Envelope #10, Envelope #9, Envelope Monarch, Envelope #6, Envelope C5, Envelope DL, Spezial

Unterstützte Seitengrößen für die Umschlagzufuhr

Envelope #6, Envelope #9, Envelope #10, Envelope Monarch, Envelope C5, Envelope DL

Unterstützte Seitengrößen für die Duplex-Einheit

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für den Sortierstapler

Letter, Legal, A4, A5, B5 (JIS)

Mehrzweckfach-Papiergrößen einstellen

Siehe auch

Register Medien

Benutzerdefinierte Papiergröße

Druckformat

Ausrichtung

Quelle

Medienart

Erweiterte Materialeinstellungen


 Benutzerdefinierte Papiergrößen

Damit können Sie benutzerdefinierte Seitenabmessungen erstellen, diese umbenennen und für die spätere Verwendung speichern. Nach der Erstellung kann eine benutzerdefinierte Mediengröße unter den Einstellungen Seitengröße im Register Medien ausgewählt werden. Benutzerdefinierte Mediengrößen werden für die Papierquelleneinstellung Kassette 2-4 (Papierzufuhr) nicht unterstützt.

Obgleich im Treiber nicht beschränkt, unterstützt der Drucker benutzerdefinierte Mediengrößen für eine Kassette 1-Papierquelle von mindestens 148 x 210 mm (5,8 x 8,27 Zoll) bis zu max. 216 x 256 mm (8,5 x 10,08 Zoll), wenn die Kassetten als Papierquelle verwendet werden. Eine breitere Palette von Papiergrößen kann manuell über die Mehrzweckzufuhr zugeführt werden. Die Mehrzweckzufuhr unterstützt ein Mindestformat von 80 x 148 mm (3,1 x 5,8 Zoll) bei Längseinzug. Das Maximalformat für die Mehrzweckzufuhr beträgt 216 x 356 mm (8,5 x 14 Zoll). Benutzerdefinierte Spezialumschlaggrößen werden von der Umschlagzufuhr nicht unterstützt. Die Duplex-Einheit unterstützt ein Mindestformat von 148 x 216 mm (5,8 x 8,5 Zoll) und ein maximales Papierformat von 216 x 297 mm (8,5 x 11,7 Zoll).

Die Einheit (Zoll oder Millimeter) wird im Dialogfeld Benutzereinstellungen ausgewählt.

Benutzerdefinierte Papiergröße festlegen, umbenennen und löschen

Siehe auch

Register Medien	Medienart
Seitengröße	Erweiterte Materialeinstellungen
Druckformat	Register Geräteeinstellungen
Ausrichtung	Benutzereinstellungen
Quelle	Papierzufuhr


Benutzerdefinierte Papiergröße festlegen, umbenennen und löschen

So stellen Sie eine benutzerdefinierte Papiergröße ein:

1.	Klicken Sie auf die Schaltfläche Spezial…, um das Dialogfeld Benutzerdefinierte Papiergröße zu öffnen.

2.	Klicken Sie auf die Schaltfläche Hinzufügen…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.

3.	Geben Sie unter Namen einen Namen für die benutzerdefinierte Größe ein. Er darf bis zu 31 Zeichen lang sein.

4.	Wählen Sie unter Größe die gewünschte Höhe und Breite.

5.	Klicken Sie auf OK.

6.	Klicken Sie im Dialogfeld Benutzerdefinierte Papiergrößen auf OK.

Die benutzerdefinierte Größe wird als Option Seitengröße verfügbar, wenn als Quelle Autom. Quellenauswahl oder Mehrzweckzufuhr ausgewählt wird.

So benennen Sie eine benutzerdefinierte Papiergröße um:

1.	Klicken Sie auf die Schaltfläche Spezial…, um das Dialogfeld Benutzerdefinierte Papiergröße zu öffnen.

2.	Wählen Sie den Namen, den Sie umbenennen möchten.

3.	Klicken Sie auf die Schaltfläche Bearbeiten…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.

4.	Geben Sie unter Name einen neuen Namen anstelle des alten ein.

5.	Klicken Sie auf OK.

6.	Klicken Sie im Dialogfeld Benutzerdefinierte Papiergrößen auf OK.

Die umbenannte benutzerdefinierte Größe wird als Option Seitengröße verfügbar, wenn als Quelle Autom. Quellenauswahl oder Mehrzweckzufuhr ausgewählt wird.

So löschen Sie eine benutzerdefinierte Papiergröße:

1.	Klicken Sie auf die Schaltfläche Spezial…, um das Dialogfeld Benutzerdefinierte Papiergröße zu öffnen.

2.	Wählen Sie unter Name die Größe, die Sie löschen möchten.

3.	Klicken Sie auf Entfernen und dann auf Ja.

4.	Klicken Sie auf OK.


 Druckformat

Damit können Sie die Größe der Druckausgabe im Verhältnis zur ausgewählten Seitengröße steigern oder verringern. Druckformat und Seitengröße verwenden die gleichen Größenauswahlmöglichkeiten.

•	Um der ausgewählten Seitengröße zu entsprechen, wählen Sie Genau wie die Seitengröße.

Beispiel: Falls unter Seitengröße A4 angezeigt wird, wird A4 nicht unter Druckformat angezeigt. Um der Größe zu entsprechen, wählen Sie Genau wie die Seitengröße.

•	Um eine andere Größe als die Seitengröße zu drucken, wählen Sie die gewünschte Größe im Dropdown-Menü aus. Für jede Option zeigt das Menü den skalierenden Prozentsatz im Verhältnis zur ausgewählten Seitengröße an.

Beispiel: Falls in Seitengröße Letter angezeigt wird und Sie Executive (84 %) in Druckformat auswählen, misst der Ausdruck 7,25 x 10,5 Zoll, nicht 8,5 x 11 Zoll.

Unterstützte Druckformate:

Letter, Legal, Ledger, Executive, Statement, A4, A5, A6, Folio, B5 (JIS), B5 (ISO), B6 (JIS), Envelope #10, Envelope #9, Envelope Monarch, Envelope #6, Envelope C5, Envelope DL

Siehe auch

Register Medien	Medienart
Seitengröße	Erweiterte Materialeinstellungen
Benutzerdefinierte Papiergröße	Register Layout
Ausrichtung	Skalierung
Quelle


 Ausrichtung

Gibt an, wie Daten auf der gedruckten Seite positioniert sind.

Die Einstellung Hochformat druckt die Daten auf einer Seite, bei der die Papierhöhe größer als die –breite ist, die Einstellung Querformat druckt die Daten auf einer Seite, deren Papierbreite größer als die Papierhöhe ist.

Mit 180°-Drehung können Sie die Daten auf der gedruckten Seite um 180 Grad drehen.

Siehe auch

Register Medien

Seitengröße

Benutzerdefinierte Papiergröße

Druckformat

Quelle

Medienart

Erweiterte Materialeinstellungen


 Quelle

Damit können Sie auswählen, woher das Papier für Ihren Druckauftrag kommt (Kassette 1-4, große Papierzuführung, Mehrzweckzufuhr). Die Einstellung Autom. Quellenauswahl wählt die erste verfügbare Quelle, die der Seitengröße und Medienart des Auftrags entspricht.

Jedes Fach in der Papierzufuhr nimmt 500 Blätter auf. Die Mehrzweckzufuhr (Mehrzweckfach) fasst 200 Blätter.

Erster Modus (automatische manuelle Zufuhr)

Der Drucker führt automatisch ein beliebiges Papier in der Mehrzweckzufuhr (Mehrzweckfach) zu, selbst wenn eine andere Papierquelle ausgewählt wurde. Nachdem das gesamte Papier in der Mehrzweckzufuhr bedruckt wurde, wird Papier von der ursprünglich eingestellten Papierquelle (Standardeinstellung) zugeführt.

Mehrzweckfach als erste Papierquelle einstellen

Kassetten-Modus

Der Kassetten-Modus stellt das Mehrzweckfach so ein, dass es wie eine Kassette behandelt wird. Ein Auftrag kann über das Mehrzweckfach gedruckt werden, wenn sich Papier im Fach befindet und die Bedienfeld-Einstellung auf die Seitengröße und Medienart eingestellt wurde, die im Mehrzweckfach vorliegt.

Mehrzweckfach als Kassette einstellen

Die Positionen von Medienart und benutzerdefinierter Medienart müssen zuerst am Bedienfeld des Druckers manuell eingestellt werden. Wenn über die Mehrzweckzufuhr im Duplex-Verfahren gedruckt wird, stellen Sie den Mehrzweckfach-Modus am Bedienfeld des Druckers auf "Erst" ein. Das Mehrzweckfach muss auf die gleiche Seitengröße, Medienart und Zufuhrrichtung wie die aktuelle Kassette eingestellt sein. Falls sich Seitengröße, Medienart oder Zufuhrrichtung unterscheiden, kann es zu einem Papierstau kommen. Es wird empfohlen, den Duplex-Druck über die Papierkassetten durchzuführen.

Medienarten für Kassetten und Mehrzweckfach einstellen

Unterstützte Seitengrößen für die Kassette

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Papierzufuhr, Kassetten 2-4

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Seitengrößen für die Mehrzweckzufuhr

Letter, Legal, Ledger, Executive, Statement, A4, A5, A6, Folio, B5 (JIS), B5 (ISO), B6 (JIS), Envelope #10, Envelope #9, Envelope Monarch, Envelope #6, Envelope C5, Envelope DL, Spezial

Unterstützte Seitengrößen für die Umschlagzufuhr

Envelope, #6, Envelope #9, Envelope #10, Envelope Monarch, Envelope C5, Envelope DL

Siehe auch

Register Medien	Medienart
Seitengröße	Erweiterte Materialeinstellungen
Benutzerdefinierte Papiergrößen	Register Geräteeinstellungen
Druckformat	Geräteoptionen
Ausrichtung	Papierzufuhr


 Medienart

Damit können Sie anhand der Medienart oder einer benutzerdefinierten Medienart auswählen, woher das Papier für Ihren Druckauftrag kommt. Die Einstellung Automatische Medienauswahl wählt die erste verfügbare Quelle, die der Medien- und Seitengröße des Auftrags entspricht. Wenn die ausgewählte Seitengröße oder Medienart nicht verfügbar ist, wird am Bedienfeld des Druckers eine Meldung angezeigt, in der Sie angewiesen werden, das gewünschte Papier in die Mehrzweckzufuhr einzulegen.

Um eine bestimmte Medienart oder eine benutzerdefinierte Medienart zu verwenden, müssen Sie die Quellpositionen zuerst am Bedienfeld des Druckers manuell einstellen. Wenn über die Mehrzweckzufuhr im Duplex-Verfahren gedruckt wird, stellen Sie den Mehrzweckfach-Modus am Bedienfeld des Druckers auf "Erst" ein, damit das Papier aus der Mehrzweckzufuhr entnommen wird.

Medienarten für Kassetten und Mehrzweckfach einstellen

Mehrzweckfach als erste Papierquelle einstellen

Unterstützte Medienarten für Kassetten

Normalpapier, Overhead-Folien, Etiketten, Feinpapier, Pergamentpapier

Unterstützte Medienarten für die Mehrzweckzufuhr

Normalpapier, Overheadfolien, Vordrucke, Etiketten, Feinpapier, Recycling, Transparent, Grob, Letter Head, Farbig, Gelocht, Umschlag, Karton, Spezial 1-8

Siehe auch

Register Medien

Seitengröße

Benutzerdefinierte Papiergröße

Druckformat

Ausrichtung

Quelle

Erweiterte Materialeinstellungen


 Erweiterte Materialeinstellungen

Damit können Sie den Auftrag mit einem leeren oder bedruckten Deckblatt versehen (Deckblatt-Modus), ein Trennblatt zwischen Seiten einfügen (Seiteneinfügung) oder ein Folien-Zwischenblatt einfügen (Folien-Zwischenblatt). Die erweiterten Materialeinstellungen stehen nicht zur Verfügung, wenn PCL 5e als Seitenbeschreibungssprache ausgewählt wird.

Deckblatt-Modus

Deckblatt-Modus erstellt ein vorderseitiges oder vorder- und rückseitiges Deckblatt mit dem Druckauftrag. Das Material für das Deckblatt stammt aus einer anderen Quelle als das des Druckauftrags. Das Deckblatt kann also eine andere Medienart haben, z. B. schwerer sein oder eine andere Farbe haben. Folien-Zwischenblatt steht nicht zur Verfügung, wenn der Deckblatt-Modus ausgewählt wurde.

Deckblatt-Modus verwenden

Deckblatt-Modus mit Broschürenmodus verwenden

Seiteneinfügung

Seiteneinfügung fügt zwischen einer ausgewählten Anzahl gedruckter Seiten ein Trennblatt. Ein Blatt mit einer anderen Farbe kann z. B. die Hauptteile eines Dokuments voneinander trennen. Folien-Zwischenblatt steht nicht zur Verfügung, wenn der Seiteneinfügung ausgewählt wurde.

Seiteneinfügung verwenden

Folien-Zwischenblatt

Folien-Zwischenblatt fügt ein Unterblatt zwischen gedruckten Folien ein. Ein Unterblatt wird auch als Zwischenblatt bezeichnet und hilft, Folien sauber zu halten. Außerdem verhindert es, dass Folien aneinander haften. Auf das Unterblatt können die gleichen Daten gedruckt werden wie auf die Folie. Diese Funktion steht nur zur Verfügung, wenn Folie als Medienart ausgewählt wurde. Deckblatt-Modus und Seiteneinfügung stehen nicht zur Verfügung, wenn Folien-Zwischenblatt ausgewählt wurde.

Folien-Zwischenblatt verwenden

Zurücksetzen

Klicken Sie auf Zurücksetzen, um alle Funktionen der erweiterten Materialeinstellungen zu deaktivieren.

Siehe auch

Register Medien

Seitengröße

Benutzerdefinierte Papiergrößen

Druckformat

Ausrichtung

Medienart

Quelle


Deckblatt-Modus verwenden

Erweiterte Materialoptionen hängen von den folgenden Einstellungen ab:

•	Folie darf nicht als Medienart ausgewählt sein.

•	Broschürenmodus muss im Register Layout deaktiviert sein.

So versehen Sie einen Druckauftrag mit einem vorder- und rückseitigen Deckblatt:

1.	Klicken Sie im Register Medien auf Einstellungen….

2.	Wählen Sie im Dialogfeld Erweiterte Materialeinstellungen die Option Deckblatt-Modus.

3.	Wählen Sie Vorderseite, um nur ein vorderseitiges Deckblatt zu verwenden, oder Vorder- und Rückseite, um sowohl am Anfang wie am Ende des Druckauftrags ein Deckblatt zu verwenden.

4.	Wählen Sie unter Drucken auf eine der verfügbaren Druckoptionen:

•	Wird Beidseitiger Druck (Duplex) im Register Layout deaktiviert und Vorderseite für den Deckblatt-Modus gewählt, steht nur Vorderseite außen zur Verfügung.

•	Wird Beidseitiger Druck (Duplex) im Register Layout deaktiviert und Vorder- und Rückseite für den Deckblatt-Modus gewählt, steht nur Vorderseite außen und Rückseite innen zur Verfügung.

•	Wird Beidseitiger Druck (Duplex) im Register Layout gewählt und Vorderseite für den Deckblatt-Modus gewählt, steht Vorderseite außen und Vorderseite innen zur Verfügung.

•	Wird Beidseitiger Druck (Duplex) im Register Layout gewählt und Vorder- und Rückseite für den Deckblatt-Modus gewählt, stehen alle Optionen für Drucken auf Verfügung.

5.	Wählen Sie eine Option von der Liste Medien für Deckblatt aus und legen Sie Deckblattmaterial in die gewählte Quelle ein.

6.	Klicken Sie im Dialogfeld Erweiterte Medieneinstellungen auf OK.


Deckblatt-Modus mit Broschürenmodus verwenden

Erweiterte Materialoptionen hängen von den folgenden Einstellungen ab:

•	Folie darf nicht als Medienart ausgewählt sein.

•	Broschürenmodus muss im Register Layout aktiviert sein.

So versehen Sie eine Broschüre mit einem vorder- und rückseitigen Deckblatt:

1.	Klicken Sie im Register Medien auf Einstellungen….

2.	Wählen Sie im Dialogfeld Erweiterte Materialeinstellungen die Option Deckblatt-Modus.

3.	Wählen Sie unter Drucken auf Optionen in einer beliebigen Kombination aus, um die ersten und letzten Seiten auf der Innen- oder Außenseite des Deckblatts zu drucken.

4.	Wählen Sie eine Option von der Liste Medien für Deckblatt aus und legen Sie Deckblattmaterial in die gewählte Quelle ein.

5.	Klicken Sie im Dialogfeld Erweiterte Medieneinstellungen auf OK.


Seiteneinfügung verwenden

Erweiterte Materialoptionen hängen von den folgenden Einstellungen ab:

•	Folie darf nicht als Medienart ausgewählt sein.

•	Broschürenmodus muss im Register Layout deaktiviert sein.

So fügen Sie ein Trennblatt in das Dokument ein:

1.	Klicken Sie im Register Medien auf Einstellungen….

2.	Wählen Sie im Dialogfeld Erweiterte Materialeinstellungen die Option Seiteneinfügung.

3.	Geben Sie unter Einfügen vor Seiten die Seitenzahlen der Positionen für die Seiteneinfügungen ein.

Für einen Seitenbereich verwenden Sie einen Bindestrich zwischen den Anfangs- und Endseitenzahlen im Bereich. Um z. B. Einfügungen vor den Seiten 5, 11, 12, 13 und 18 einzufügen, geben Sie 5, 11-13, 18 ein.

4.	Wählen Sie die Quelle für die Einfügung aus der Liste Medien für Seite aus.

5.	Wählen Sie Auf Vorderseite drucken, Auf Rückseite drucken oder beides, um die Einfügungen zu bedrucken. Um Auf Rückseite drucken zu verwenden, wählen Sie im Register Layout die Option Beidseitiger Druck (Duplex).

Wird diese Option markiert, wird jedes eingefügte Blatt mit Daten bedruckt, die seine Position im gesamten Druckauftrag wiedergeben. Eine Einfügung zwischen den Seiten 9 und 10 bei ausgewählter Option Auf Vorderseite drucken wird als Seite 10 gedruckt. Wird Auf Rückseite drucken ebenfalls ausgewählt, wird die Einfügung als Seite 10 und 11 gedruckt.

6.	Klicken Sie im Dialogfeld Erweiterte Medieneinstellungen auf OK.


Folien-Zwischenblatt verwenden

Folien-Zwischenblatt erfordert, dass der Deckblatt-Modus und Seiteneinfügung deaktiviert sind.

So fügen Sie Blätter zwischen Folien ein:

1.	Wählen Sie im Register Medien die Option Autom. Quellenauswahl oder Mehrzweckzufuhr unter Quelle.

2.	Wählen Sie unter Medienart die Option Folie.

3.	Klicken Sie auf Einstellungen....

4.	Wählen Sie im Dialogfeld Erweiterte Materialeinstellungen die Option Folien-Zwischenblatt.

5.	Wählen Sie die Quelle für das Unterblatt aus der Liste Medien für Unterblatt aus.

Ein Unterblatt ist die Papiereinfügung, die verhindert, dass zwei Folien aneinander haften.

6.	Wählen Sie Auf Unterblatt drucken, den Druck der gleichen Daten wie auf der Folie.

Der Druck auf das Unterblatt kann dazu verwendet werden, Sie durch eine Präsentation zu führen oder gelesen werden, während die Folie projiziert wird.

7.	Klicken Sie im Dialogfeld Erweiterte Medieneinstellungen auf OK.


 Register Layout

Mit dem Register Layout können Sie eine Auswahl zum Druck mehrerer Seiten auf einem Blatt oder zur Einstellung der Skalierung sowie zum Bedrucken beider Seiten des Blattes treffen.

Das Register Layout enthält folgende Optionen:

Seiten pro Blatt

Skalierung

Bundstegeinstellungen

Duplex-Modus

Broschürenmodus

3D-Bild


 Seiten pro Blatt

Damit können Sie mehrere Seiten auf einem Blatt in Gruppen von 1, 2, 4, 6, 9, 12, 16 oder 25 Seiten drucken.

Mit Umrandung drucken können Sie jede Seite auf einem Blatt mit einer Umrandung versehen.

Mit Layout können Sie die Reihenfolge, in der die Seiten auf einem Blatt angeordnet werden, einstellen.

Für Anwendungen wie PageMaker, Acrobat und CorelDraw, sollten die KPDL-Einstellungen für Erlaube Datendurchlass gelöscht werden, wenn mehrere Seiten pro Blatt verwendet werden. Die Ausgabeergebnisse werden durch die reduzierte Kapazität zum Drucken von Bitmaps und Bildern möglicherweise beeinträchtigt.

Siehe auch

Register Layout

Skalierung

Bundstegeinstellungen

Duplex-Modus

Broschürenmodus

Register Geräteeinstellungen

Benutzereinstellungen


 Skalierung

Skalierung ändert Höhe und Breite der Seite um den ausgewählten Prozentsatz. Der Skalierungsbereich liegt zwischen 20 und 500 %.

Siehe auch

Register Layout

Seiten pro Blatt

Bundstegeinstellungen

Duplex-Modus

Broschürenmodus

Register Medien

Druckformat


 Bundstegeinstellungen

Damit können Sie den Bundsteg (freier Platz) links auf dem gedruckten Blatt einstellen, indem Sie Text und Grafiken proportional reduzieren. Mit dem größeren Bundsteg, der durch Verschieben des Druckbereichs nach rechts um bis zu 25,4 mm erzielt wird, ist eine Broschüre oder gelochte Seite einfacher zu lesen. Bei Verwendung im Duplexdruck wird der vergrößerte Bundsteg gleichmäßig auf beiden Seiten des Blattes ausgerichtet.

Die Einheit (Zoll oder Millimeter) wird im Dialogfeld Benutzereinstellungen ausgewählt.

Klicken Sie auf Bundstegeinstellungen..., um das Dialogfeld Bundstegeinstellungen zu öffnen. Wählen Sie einen Wert zwischen 0,20 und 1,00 Zoll (5,0 und 25,4 mm) aus oder geben Sie ihn ein und klicken Sie dann auf OK.

Siehe auch

Register Layout

Seiten pro Blatt

Skalierung

Duplex-Modus

Broschürenmodus

Register Geräteeinstellungen

Benutzereinstellungen


 Duplex-Modus

Damit können Sie beide Seiten eines Blatts bedrucken. Die Duplex-Einheit gehört bei diesem Druckermodell zur Standardausstattung. Wenn Sie den Broschürenmodus (Heft-Modus) verwenden, steht der Duplex-Modus nicht zur Verfügung.

Wählen Sie im Register Layout die Option Beidseitiger Druck (Duplex), um beide Seiten des Blatts zu bedrucken.

Die Einstellungen An Längsseite wenden und An Schmalseite wenden beziehen sich darauf, an welcher Seitenkante die Seite gedreht werden soll, um die Daten auf der anderen Seite richtig anzuzeigen. Bei der Einstellung An Längsseite werden wird die lange Kante der Seite gedreht, um die Daten korrekt anzuzeigen, während bei An Schmalseite wenden die kurze Kante gedreht wird.

Wenn über die Mehrzweckzufuhr im Duplex-Verfahren gedruckt wird, stellen Sie das Mehrzweckfach am Bedienfeld des Druckers auf "Erst" und die Seitengröße sowie die Medienart so ein, dass sie der aktuellen Auswahl entsprechen. Falls sich die Seitengrößen unterscheiden, kann es zu Papierstaus kommen. Das Mehrzweckfach muss auf die gleiche Seitengröße, Medienart und Zufuhrrichtung wie die aktuelle Kassette eingestellt sein. Ansonsten kann es zu einem Papierstau kommen.

Wenn über die Mehrzweckzufuhr im Duplex-Verfahren gedruckt wird, stellen Sie das Mehrzweckfach am Bedienfeld des Druckers auf "Erst" und die Papiergröße sowie die Papierart so ein, dass sie der aktuellen Auswahl entsprechen. Falls sich die Papiergrößen unterscheiden, kann es zu Papierstaus kommen. Wird der Mehrzweckfachmodus auf "Kassette" eingestellt, können Sie die Mehrzweckzufuhr nicht zum Druck von Duplex-Dokumenten verwenden.

Duplex-Druck erfordert mindestens 16 MB und bis zu 32 MB Druckerspeicher, um einen echten 1200 dpi-Druck zu unterstützen. Niedrigere Auflösungen erfordern weniger Speicher.

Einige Medienarten werden von der Duplex-Einheit nicht unterstützt. Werden diese verwendet, kann es zu Papierstaus und möglichen Beschädigungen der Duplex-Einheit kommen.

Unterstützte Seitengrößen für die Duplex-Einheit

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Medienarten für die Duplex-Einheit

Normalpapier, Vordrucke, Feinpapier, Recycling, Grob, Letter Head, Farbig, Gelocht, Spezial

Mehrzweckfach als erste Papierquelle einstellen

Mehrzweckfach als Kassette einstellen

Medienarten für Kassetten und Mehrzweckfach einstellen

Mehrzweckfach-Papiergrößen einstellen

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Layout	Register Medien
Seiten pro Blatt	Seitengröße
Skalierung	Druckqualität
Bundstegeinstellungen	Register Geräteeinstellungen
Broschürenmodus	Speicher
	Duplex-Einheit


 Broschürenmodus (Heft-Modus)

Damit können Sie ein mehrseitiges Dokument so drucken, dass die fertigen Kopien gestapelt und als Broschüre gefaltet werden. Durch den Broschürenmodus sind andere Optionen wie Duplex-Modus und Seiten pro Blatt nicht verfügbar.

Wählen Sie Heft-Modus und wählen Sie dann eine dieser Bindungsoptionen aus:

• Bindung links	Wird so gestapelt und gefaltet, dass die fertige Broschüre von links nach rechts gelesen werden kann.
• Bindung rechts	Wird so gestapelt und gefaltet, dass die fertige Broschüre von rechts nach links gelesen werden kann.

Die Broschüre wird im Broschürenformat gedruckt und ist bereit, gefaltet zu werden. Die gefaltete Broschüre ist halb so groß wie das gewählte Papier. Wenn Sie z. B. A3 unter Seitengröße wählen, kann der Ausdruck in eine Broschüre im A4-Format gefaltet werden.

Deckblatt-Modus mit Broschürenmodus verwenden

Unterstützte Broschürenformate

Letter, Ledger, A3, A4, B4

Siehe auch

Register Layout

Seiten pro Blatt

Skalierung

Bundstegeinstellungen

Duplex-Modus


 Register Bildbearbeitung

Mit dem Register Bildbearbeitung können Sie das Aussehen von Text und Bildern in einem Druckauftrag durch Einstellen der Druckqualität, Graustufeneinstellungen und Herunterladen von Schriften ändern.

Das Register Bildbearbeitung enthält folgende Optionen:

Druckqualität

Graustufeneinstellung

TrueType-Optionen

3D-Bild


 Druckqualität

Legt die Auflösung des Druckauftrags in Punkten pro Zoll (Dots per Inch oder dpi) fest. Höhere Einstellungen führen zu einer höheren Auflösung und detaillierteren Druckbildern.

•	Die Einstellung Hohe Qualität erstellt einen hoch auflösenden, detaillierten Ausdruck für Text und Grafiken.

•	Die Einstellung Andruck mindert die Bildqualität, erhöht jedoch die Druckgeschwindigkeit.

•	Die Einstellung Entwurf reduziert die Tonermenge, die auf der gedruckten Seite aufgetragen wird und verlängert die Lebensdauer der Tonerkartusche, was sowohl ökonomisch als auch ökologisch von Vorteil ist. Weil die Tonersättigung reduziert wird, erscheinen das ganze Bild, Text Grafiken heller auf dem gedruckten Auftrag.

•	Wählen Sie Spezial…, um weitere Einstellungen der Druckqualität anzuzeigen. Klicken Sie auf die Schaltfläche, um das Dialogfeld Druckqualität-Einstellungen zu öffnen. Wählen Sie dann aus weiteren Einstellungen unter Auflösung, KIR und Entwurf aus.

Auflösung

•	Die Einstellung 1200 dpi Schnell simuliert die Ausgabe bei 1200 dpi, was die Auflösung von Bildern im Vergleich zu einer Einstellung von 600 dpi erhöht, und bietet eine schnellere Geschwindigkeit als 1200 dpi. Zwischen Schnell 1200 dpi und 600 dpi besteht für Text und Vektorgrafiken kein Unterschied.

•	Die Einstellung 600 dpi erstellt einen hoch auflösenden, detaillierten Ausdruck für Text und Grafiken.

•	Die Einstellung 300 dpi mindert die Bildqualität, erhöht jedoch die Druckgeschwindigkeit.

Kyocera Image Refinement

Kyocera Image Refinement wird auch als Anti-Alias bezeichnet und ist eine Hardware-basierte Funktion, die die Kanten von Text- und Vektorgrafiken glättet. Die Standardeinstellung ist Ein.

EcoPrint

EcoPrint reduziert die Tonermenge, die auf der gedruckten Seite aufgetragen wird und verlängert die Lebensdauer der Tonerkartusche, was sowohl ökonomisch als auch ökologisch von Vorteil ist. Weil die Tonersättigung reduziert wird, erscheinen das ganze Bild, Text Grafiken heller auf dem gedruckten Auftrag. EcoPrint erhöht die Druckgeschwindigkeit nicht.

Siehe auch

Register Bildbearbeitung

Graustufeneinstellung

TrueType-Optionen


 Graustufeneinstellung

Damit können Sie das Aussehen des Grafikbildes Ihres Druckauftrags durch Steuern des Graustufenspektrums anpassen. Die Graustufeneinstellungen sind nützlich, wenn Ihre Grafikbilder zu hell, zu grau oder zu dunkel gedruckt werden. Text wird von den Graustufeneinstellungen nicht betroffen.

Mit der Einstellung Helligkeit können Sie die Grafikbilder Ihres Druckauftrags heller oder dunkler machen. Eine hohe Helligkeitseinstellung macht das Graustufenspektrum heller, eine niedrige macht es dunkler. Die Einstellung der Helligkeit ist nützlich, wenn Grafikbilder zu dunkel oder zu hell gedruckt werden. Text wird von der Helligkeitseinstellung nicht betroffen.

Mit der Einstellung Kontrast können Sie die Graustufen zwischen schwarz und weiß für die Grafikbilder Ihres Druckauftrags einstellen. Eine hohe Kontrasteinstellung verringert die Graustufen, wodurch helle Grautöne heller und dunkle Grautöne dunkler gemacht werden. Eine niedrige Kontrasteinstellung erhöht die Graustufen, wodurch helle Grautöne dunkler und dunkle Grautöne heller gemacht werden. Die Einstellung des Kontrasts ist nützlich, wenn Grafikbilder zu grau oder zu schwarzweiß gedruckt werden. Text wird von der Kontrasteinstellung nicht betroffen.

Siehe auch

Register Bildbearbeitung

Druckqualität

TrueType-Optionen


 TrueType-Optionen

Damit können Sie angeben, wie TrueType-Schriftarten an den Drucker gesendet werden. Die Methode wirkt sich auf die Druckgeschwindigkeit aus und kann einige Schriftart-Druckprobleme lösen.

Wählen Sie TrueType als Umriss-Schrift laden, um die Dateigröße zum Drucken eines großen Dokuments zu verringern, v. a. wenn es mehrere Fonts oder Fontgrößen enthält. Dies ist die Vorgabeeinstellung.

Wählen Sie für einen Druckauftrag mit weniger Fonts und ähnlichen Fontgrößen TrueType als Bitmap-Schrift laden. Die Dateigröße wird dann allerdings gesteigert. Diese Auswahl ist für ältere Betriebssysteme nützlich (Windows 3.x, 9x), die weniger TrueType-Schriftarten bieten.

Wählen Sie in den folgenden Fällen Durch Geräteschriftarten ersetzen:

•	Falls der Druckauftrag eine Schriftart enthält, die der Drucker nicht unterstützt.

•	Um eine Schriftart zu ändern, die in einem großen Dokument oft vorkommt: Diese Auswahl ersetzt die alte Schriftart durch die gewünschte.

Klicken Sie auf die Schaltfläche Schriftart ersetzen…, um das Dialogfeld Schriftart ersetzen zu öffnen. Wählen Sie im Feld Systemfonts die Schriftart in Ihrem Dokument. Wählen Sie im Feld Verfügbare Gerätefonts die zu ersetzende Schriftart. Klicken Sie auf OK.

Siehe auch

Register Bildbearbeitung

Druckqualität

Graustufeneinstellung


 Register Ausgabe

Mit dem Register Ausgabe können Sie die Ausgabeposition, Auflage, Endbearbeitungsoptionen und Speicheroptionen für den gedruckten Auftrag angeben.

Das Register Ausgabe enthält folgende Optionen:

Ausgabe an

Auflage

Endbearbeitungsoptionen

Auftragseinstellungen

3D-Bild


 Ausgabe an

Gibt an, wohin der Druckauftrag ausgegeben wird. Die verfügbaren Ausgabemöglichkeiten hängen von den im Register Geräteeinstellungen ausgewählten Geräteoptionen und den optionalen, am Drucker angeschlossenen Geräten ab.

Bei einem Drucker ohne angeschlossene Optionen sind die V-o- (Vorderseite oben) oder V-u- (Vorderseite unten) Positionen die einzigen verfügbaren Ausgabefächer.

•	Rückwärtiges Fach (Druckbild nach oben) schickt Druckaufträge zur V-o-Ausgabe an der Rückseite des Druckers. Das optionale V-o-Fach sollte an der Rückseite des Druckers montiert sein, damit gesendete Aufträge richtig gestapelt werden. Das optionale V-o-Fach nimmt maximal 250 Blätter auf.

•	Oberes Fach (Druckbild nach unten) schickt Druckaufträge zur V-u-Ausgabe an der Oberseite des Druckers. Das V-u-Aufgabefach oben am Drucker nimmt maximal 250 Blätter auf.

Bei befestigtem und als Geräteoption im Register Geräteeinstellungen installiertem optionalen Sortierstapler sind folgende Ausgabeoptionen möglich:

•	Bulk-Fach (V-u) stapelt den Auftrag im unteren Fach des optionalen Sortierstaplers.

•	Mailbox (V-u) sendet den Druckauftrag an eine von fünf Mailboxen, wenn der optionale Sortierstapler installiert ist. Wählen Sie Mailbox (V-u) aus und wählen Sie die Ziel-Mailbox aus der Liste aus.

•	Druckergrundeinstellung schickt den Druckauftrag zum V-u-Fach an der Oberseite des Druckers.

•	Oberes Fach (Druckbild nach unten) schickt den Druckauftrag zum V-u-Fach an der Oberseite des Druckers.

Bei befestigter und als Geräteoption im Register Geräteeinstellungen installierter Duplex-Einheit sollte das V-o-Fach an der Rückseite der Duplex-Einheit installiert werden, wen keine optionalen Ausgabegeräte vorhanden sind, um gesendete Aufträge richtig zu stapeln. Das optionale V-o-Fach nimmt maximal 250 Blätter auf.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe	Register Geräteeinstellungen
Auflage	Geräteoptionen
Endbearbeitungsoptionen	Sortierstapler
Auftragseinstellungen	Duplex-Einheit


 Auflage

Gibt die Anzahl der zu druckenden Exemplare an. Die maximale Auflage für Druckaufträge ist 999.

Siehe auch

Register Ausgabe

Ausgabe an

Endbearbeitungsoptionen

Auftragseinstellungen


 Endbearbeitungsoptionen

Damit können Sie Seiten sortieren und je nach optionalen an den Drucker angeschlossenen Geräten weitere Optionen wählen.

Sortieren funktioniert mit einer RAM-Festplatte oder Festplatte und gibt die Reihenfolge an, in der Seiten eines aus mehreren Blättern bestehenden Auftrags gedruckt werden. Werden Sortieren und eine RAM-Festplatte oder Festplatte gewählt, druckt der Treiber den Auftrag Satz um Satz aus. Wird Sortieren deaktiviert, werden Kopien jeder Seite nach dem Satz gedruckt. Beispiel: Bei ausgewählter Sortierfunktion werden drei Exemplare eines fünfseitigen Dokuments als Seiten eins bis fünf dreimal in Folge ausgegeben. Das Treiber-Grafikbild zeigt die Gruppierung Sortieren und nicht Sortieren an.

Bei ausgewählter Sortierfunktion werden die Auftragsdaten als Render-Bildseiten im Speicher des Druckers (RAM-Festplatte oder Festplatte) nach dem erstmaligen Laden gespeichert. Die restlichen Auftragsexemplare werden aus diesen gespeicherten Daten gedruckt, was den Vorgang des Sendens von Auftragsdaten vom Computer zum Drucker mit jedem Exemplar umgeht. Eine RAM-Festplatte oder Festplatte muss im Drucker installiert und im Treiber im Register Geräteeinstellungen ausgewählt werden. Wird Sortieren mit einer RAM-Festplatte oder Festplatte verwendet, werden Seitendaten kurzzeitig gespeichert und nach dem Drucken gelöscht. Wird die Funktion mit einer Festplatte verwendet, können Seitendaten durch Auswahl von Permanent im Dialogfeld Auftragseinstellungen permanent gespeichert werden.

Der Drucker muss mindestens 12 MB Speicher aufweisen, um die RAM-Festplatte verwenden zu können. Die RAM-Festplatte wird erst verfügbar, wenn mind. 12 MB im Speicherfenster im Register Geräteeinstellungen zugewiesen wurden.

Hinweis: Die Sortierfunktion funktioniert mit Adobe-Anwendungen nur, wenn eine RAM-Festplatte oder Festplatte installiert ist.

Mailbox sendet den Druckauftrag an eine von fünf Mailboxen, wenn der optionale Sortierstapler installiert ist. Wählen Sie Mailbox aus und wählen Sie die Ziel-Mailbox aus der Liste aus.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe	Register Geräteeinstellungen
Ausgabe an	Geräteoptionen
Auflage	RAM-Festplatte
Auftragseinstellungen	Sortierstapler
Speicher


 Auftragseinstellungen

Damit können Sie Druckaufträge auf der optionalen Festplatte des Druckers mit Hilfe einer Vielzahl von Tools verwalten und einen Auftragsnamen zuweisen. Klicken Sie auf die Schaltfläche Auftragseinstellungen…, um das Dialogfeld Auftragseinstellungen zu öffnen.

Auftragsspeicher (e-MPS)

Damit können Sie Druckaufträge im Speicher des Druckers speichern, um den Auftrag später über das Bedienfeld des Druckers erneut auszudrucken. Um diese Auftragsspeicherfunktionen zu verwenden, muss eine optionale Festplatte im Drucker installiert und im Register Geräteeinstellungen unter Geräteoptionen ausgewählt sein. Sieben Auftragsspeicherfunktionen stehen zur Verfügung. Unter dem vollständigen Thema finden Sie Einzelheiten dazu:

•	Temporär speichert einen Auftrag auf der optionalen Festplatte, bis diese voll wird.

•	Permanent speichert einen Auftrag permanent auf der optionalen Festplatte.

•	Virtuelle Mailbox (VMB) sendet einen Druckauftrag an die virtuellen Ausgabefächer Ihrer Wahl.

•	Schnellkopie sendet einen Auftrag an den Drucker, druckt ihn sofort und speichert ihn temporär, damit Sie später wieder darauf zugreifen können.

•	Prüfen und aufbewahren  druckt eine Kopie eines Auftrags zur Überprüfung aus, bevor der gesamte Auftrag gedruckt wird.

•	Privater Druck ermöglicht die Beschränkung des Zugriffs auf bestimmte Aufträge.

•	Auftragsspeicher speichert einen Auftrag permanent auf der optionalen Festplatte, die durch einen Zugangscode geschützt wird.

Auftragsname

Damit können Sie einen eigenen Namen für Ihren Druckauftrag erstellen. Während der Auftrag gedruckt wird, wird dieser Auftragsname am Bedienfeld des Druckers angezeigt.

•	Wählen Sie Anwendungsdefiniert, um den Namen der Anwendung anzuzeigen.

•	Wählen Sie Spezial und geben Sie einen Namen ein, dadurch wird Ihr eigener Auftragsname zugewiesen.

Zurücksetzen

Klicken Sie auf Zurücksetzen, um alle Funktionen im Dialogfeld Auftragseinstellungen zu deaktivieren.

Namen am Bedienfeld anzeigen

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe	Register Geräteeinstellungen
Ausgabe an	Geräteoptionen
Auflage	Festplatte
Endbearbeitungsoptionen	Festplatten-Einstellungen
Verwaltereinstellungen


 Temporärer Speicher

Damit können Sie Druckaufträge auf der optionalen Festplatte speichern. Diese Aufträge werden aus dem Speicher entfernt, wenn die Festplatte voll wird. Der temporäre Speicher erfordert eine optionale Festplatte.

Dem Auftrag kann ein Auftrags- und Benutzername zugewiesen werden, damit er später auf der Liste der Aufträge leichter identifiziert werden kann. Der Auftragsname wird im Dialogfeld Auftragseinstellungen ausgewählt. Der Benutzername muss im Dialogfeld Benutzereinstellungen eingegeben werden.

Durch Auswählen von Temporär wird die Druckgeschwindigkeit bei einem aus mehreren Exemplaren bestehenden Auftrag gesteigert. Das erste Exemplar des Auftrags muss z. B. nur einmal durch Rendering wiedergegeben werden. Alle nachfolgenden Exemplare des Auftrags werden dann mit der Nenngeschwindigkeit des Druckers gedruckt.

Klicken Sie auf die Schaltfläche Auftragseinstellungen… im Register Ausgabe, um das Dialogfeld Auftragseinstellungen zu öffnen. Wählen Sie Auftragsspeicher (e-MPS) und dann Temporär.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe

Auftragseinstellungen

Register Geräteeinstellungen

Festplatte


 Permanenter Speicher

Damit können Sie einen Auftrag auf der optionalen Festplatte des Druckers speichern und vor dem Löschen schützen, wenn die Festplatte voll werden sollte. Der permanente Speicher erfordert eine optionale Festplatte.

Dem Auftrag kann ein Auftrags- und Benutzername zugewiesen werden, damit er später auf der Liste gedruckter Aufträge leichter identifiziert werden kann. Der Auftragsname wird im Dialogfeld Auftragseinstellungen ausgewählt. Der Benutzername muss im Dialogfeld Benutzereinstellungen eingegeben werden.

Durch Auswählen von Permanent wird die Druckgeschwindigkeit bei einem aus mehreren Exemplaren bestehenden Auftrag gesteigert. Das erste Exemplar des Auftrags muss z. B. nur einmal durch Rendering wiedergegeben werden. Alle nachfolgenden Exemplare des Auftrags werden dann mit der Nenngeschwindigkeit des Druckers gedruckt.

Klicken Sie auf die Schaltfläche Auftragseinstellungen… im Register Ausgabe, um das Dialogfeld Auftragseinstellungen zu öffnen. Wählen Sie Auftragsspeicher (e-MPS) und dann Permanent.

Permanente Code-Auftragsliste drucken

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe

Auftragseinstellungen

Register Geräteeinstellungen

Benutzereinstellungen

Festplatte


 Virtuelle Mailbox (VMB)

Damit können Sie Druckaufträge Ihrer Wahl an virtuelle Ausgabefächer senden. Eine virtuelle Mailbox erfordert eine optionale Festplatte. Vom Drucker gesendete Daten werden in einem nummerierten virtuellen Ausgabefach gesammelt. Um die Daten zu drucken, geben Sie die Nummer des virtuellen Ausgabefaches über das Bedienfeld des Druckers ein. Ein virtueller Mailbox-Druckauftrag wird gelöscht, wenn er ausgedruckt wird. Virtuelle Mailbox steht nicht zur Verfügung, wenn KPDL als Seitenbeschreibungssprache ausgewählt wird.

Sie können Benutzern im Dialogfeld Festplatten-Einstellungen im Register Geräteeinstellungen virtuelle Ausgabefächer zuweisen. Insgesamt können 255 Mailboxen zugewiesen werden.

Aufträge an virtuelle Mailbox senden

Gesammelte virtuelle Mailbox-Daten drucken

Virtuelle Mailbox-Liste drucken

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe

Auftragseinstellungen

Register Geräteeinstellungen

Festplatten-Einstellungen

Benutzereinstellungen

Festplatte


Aufträge an virtuelle Mailbox senden

So senden Sie Druckaufträge an eine oder mehr virtuelle Mailboxen:

1.	Klicken Sie im Anwendungsprogramm auf Datei, dann Drucken, um das Dialogfeld Drucken zu öffnen.

2.	Greifen Sie auf das Dialogfeld Eigenschaften des Druckers zu. Je nach verwendeter Anwendung klicken Sie auf Eigenschaften oder Einrichtung.

3.	Klicken Sie auf das Register Ausgabe und dann auf Auftragseinstellungen….

4.	Wählen Sie Festplatte und dann Virtuelle Mailbox.

5.	Klicken Sie auf die Schaltfläche Auswahl..., um das Dialogfeld Virtuelle Mailbox-Auswahl zu öffnen.

6.	Wählen Sie einen oder mehrere Namen aus der Liste aus.

7.	Klicken Sie in allen Dialogfeldern auf OK.


Gesammelte virtuelle Mailbox-Daten drucken

So drucken Sie Daten, die in einer virtuellen Mailbox gesammelt wurden:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	Drücken Sie die Taste ^, um e-MPS anzuzeigen. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^, bis VMB-Datenfach drucken angezeigt wird.

4.	Drücken Sie die Eingabetaste, um ein aufleuchtendes ? anzuzeigen.

5.	Drücken Sie die Taste ^, um eine Fachnummer auszuwählen.

6.	Drücken Sie die Eingabetaste, um die gesammelten Daten im ausgewählten Fach zu drucken.


Virtuelle Mailbox-Liste drucken

Durch Drucken einer virtuellen Mailbox-Liste kann der Verwalter in virtuellen Mailboxen gespeicherte Druckaufträge prüfen.

So drucken Sie eine virtuelle Mailbox-Liste:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	Drücken Sie die Taste ^, um e-MPS anzuzeigen. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^, bis Liste der VMB angezeigt wird.

4.	Drücken Sie die Eingabetaste, um ein aufleuchtendes ? anzuzeigen.

5.	Drücken Sie noch einmal die Eingabetaste, um die virtuelle Mailbox-Liste zu drucken.


Permanente Code-Auftragsliste drucken

Durch Drucken einer permanenten Code-Auftragsliste kann der Verwalter auf der Festplatte gespeicherte Druckaufträge prüfen.

So drucken Sie eine permanente Code-Auftragsliste:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	Drücken Sie die Taste ^, um e-MPS anzuzeigen. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^, bis Codeliste AUFTRAG angezeigt wird.

4.	Drücken Sie die Eingabetaste, um ein aufleuchtendes ? anzuzeigen.

5.	Drücken Sie noch einmal die Eingabetaste, um die permanente Code-Auftragsliste zu drucken.


 Prüfen und aufbewahren

Druckt ein Exemplar eines mehrseitigen Auftrags aus und speichert dann die restlichen Exemplare auf der optionalen Festplatte des Druckers. Das erste Exemplar des Auftrags ist der "Andruck". Wenn das erste Exemplar überprüft wurde, können die restlichen gedruckt oder gelöscht werden. Prüfen und aufbewahren erfordert eine optionale Festplatte.

Die Anzahl der Prüfen und aufbewahren-Aufträge, die auf der optionalen Festplatte gespeichert werden können, hängt vom verfügbaren Speicherplatz ab. Wenn die Festplatte ihre maximale Kapazität erreicht und ein neuer Auftrag zum Speicher geschickt wird, wird der älteste temporär gespeicherte Auftrag durch den neuen Auftrag ersetzt.

Prüfen und aufbewahren-Aufträge werden temporär gespeichert und gelöscht, wenn der Drucker zurückgesetzt oder abgeschaltet wird. Auf die gespeicherten Prüfen und aufbewahren-Aufträge kann über das Bedienfeld des Druckers zugegriffen werden.

Verbleibende Prüfen und aufbewahren-Exemplare drucken

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe

Auftragseinstellungen

Register Geräteeinstellungen

Festplatten-Einstellungen


 Schnellkopie

Druckt alle Exemplare eines Auftrags aus und speichert dann den Auftrag temporär auf der optionalen Festplatte des Druckers, damit später wieder darauf zugegriffen werden kann. Auf die gespeicherten Schnellkopie-Aufträge kann über das Bedienfeld des Druckers zugegriffen werden. Schnellkopie erfordert, dass im Drucker eine optionale Festplatte installiert und im Register Geräteeinstellungen ausgewählt wird.

Die Anzahl der Schnellkopie-Aufträge, die auf der optionalen Festplatte gespeichert werden können, hängt vom verfügbaren Speicherplatz ab. Wenn die Festplatte ihre maximale Kapazität erreicht und ein neuer Auftrag zum Speicher geschickt wird, wird der älteste temporär gespeicherte Auftrag durch den neuen Auftrag ersetzt.

Schnellkopie-Aufträge werden temporär gespeichert und gelöscht, wenn der Drucker zurückgesetzt oder abgeschaltet wird.

Weitere Schnellkopie-Aufträge drucken

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe

Auftragseinstellungen

Register Geräteeinstellungen

Festplatten-Einstellungen


 Privater Druck

Sendet sichere Druckaufträge an den Drucker und speichert sie auf der optionalen Festplatte, ohne sie zuvor auszudrucken. Privater Druck erfordert, dass im Drucker eine optionale Festplatte installiert und im Register Geräteeinstellungen ausgewählt wird. Privater Druck erfordert darüber hinaus einen vierstelligen Zugangscode, der zusammen mit dem Druckauftrag gesendet werden muss. Auf die gespeicherten Privater Druck-Aufträge kann über das Bedienfeld des Druckers mit Hilfe des Zugangscodes zugegriffen werden. Sie werden auf die gleiche Art auch ausgedruckt.

Die Anzahl der Privater Druck-Aufträge, die auf der optionalen Festplatte gespeichert werden können, hängt vom verfügbaren Speicherplatz ab. Wenn die Festplatte ihre maximale Kapazität erreicht und ein neuer Auftrag zum Speicher geschickt wird, wird der älteste temporär gespeicherte Auftrag durch den neuen Auftrag ersetzt.

Privater Druck-Aufträge werden gelöscht, wenn der Drucker zurückgesetzt oder abgeschaltet wird. Wenn der Auftrag nicht gelöscht werden soll, wählen Sie die Funktion Auftragsspeicher.

Private Druck-Aufträge drucken

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe

Auftragseinstellungen

Register Geräteeinstellungen

Festplatte


 Auftragsspeicher

Speichert Druckaufträge auf der optionalen Festplatte des Druckers, um sie später auszudrucken. Aufträge werden permanent gespeichert und nicht gelöscht, wenn der Drucker abgeschaltet wird. Der Auftragsspeicher erfordert, dass im Drucker eine optionale Festplatte installiert und im Register Geräteeinstellungen ausgewählt wird. Der Auftragsspeicher ermöglicht darüber hinaus, dass ein vierstelliger Zugangscode zusammen mit dem Druckauftrag gesendet wird. Wird ein Zugangscode verwendet, kann nur über das Bedienfeld des Druckers mit Hilfe des Zugangscodes auf gespeicherte Aufträge zugegriffen werden. Sie werden auf die gleiche Art auch ausgedruckt. Um einen Zugangscode einzuschließen, markieren Sie das Kästchen Zugangscode und geben eine vierstellige Nummer ein.

Die Anzahl der Auftragsspeicher-Aufträge, die auf der optionalen Festplatte gespeichert werden können, hängt vom verfügbaren Speicherplatz ab. Wenn die Festplatte ihre maximale Kapazität erreicht und ein neuer Auftrag zum Speicher geschickt wird, wird der älteste temporär gespeicherte Auftrag durch den neuen Auftrag ersetzt.

Um Aufträge auf der optionalen Festplatte zu verwalten (Aufträge löschen, umbenennen und organisieren), verwenden Sie die Utility-Software, die Sie mit der Festplatte erhalten haben.

Auftragspeicher-Aufträge drucken

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Ausgabe

Auftragseinstellungen

Register Geräteeinstellungen

Festplatte


Weitere Schnellkopie-Aufträge drucken

So drucken Sie weitere Schnellkopie-Aufträge über das Bedienfeld des Druckers:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	Drücken Sie die Taste ^ mehrmals, bis e-MPS angezeigt wird. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^ mehrmals, bis Schnellkopie angezeigt wird. Drücken Sie dann die Eingabetaste.

4.	Bewegen Sie sich per Bildlauf durch die Auftragsbenutzernamen, indem Sie mehrmals die Taste ^ drücken, bis der gewünschte Name angezeigt wird. Drücken Sie dann die Eingabetaste.

5.	Bewegen Sie sich per Bildlauf durch die Auftrags-ID-Namen, indem Sie mehrmals die Taste ^ drücken, bis der gewünschte Name angezeigt wird. Drücken Sie dann die Eingabetaste.

6.	Wählen Sie die Anzahl der zu druckenden Exemplare durch Drücken der Taste ^ oder V, um die Anzahl der Exemplare zu erhöhen oder zu senken. Sie können 1 bis 999 Exemplare auswählen. Eine Einstellung auf Null löscht den Schnellkopie-Auftrag.

7.	Drücken Sie die Eingabetaste, um den Schnellkopie-Auftrag zu drucken.


Verbleibende Prüfen und aufbewahren-Aufträge drucken
Verbleibende Prüfen und aufbewahren-Exemplare drucken

So drucken Sie die restlichen Prüfen und aufbewahren-Aufträge über das Bedienfeld des Druckers:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	 Drücken Sie die Taste ^ mehrmals, bis e-MPS angezeigt wird. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^ mehrmals, bis Schnellkopie angezeigt wird. Drücken Sie dann die Eingabetaste.

4.	Bewegen Sie sich per Bildlauf durch die Auftragsbenutzernamen, indem Sie mehrmals die Taste ^ drücken, bis der gewünschte Name angezeigt wird. Drücken Sie dann die Eingabetaste.

5.	Bewegen Sie sich per Bildlauf durch die Auftrags-ID-Namen, indem Sie mehrmals die Taste ^ drücken, bis der gewünschte Name angezeigt wird. Drücken Sie dann die Eingabetaste.

6.	Wählen Sie die Anzahl der zu druckenden Exemplare durch Drücken der Taste ^ oder V, um die Anzahl der Exemplare zu erhöhen oder zu senken.  Sie können 1 bis 999 Exemplare auswählen. Eine Einstellung auf Null löscht den Prüfen und aufbewahren-Auftrag.

7.	Drücken Sie die Eingabetaste, um die verbleibenden Prüfen und aufbewahren-Exemplare zu drucken.


Private Druck-Aufträge drucken

So drucken Sie weitere private Druck-Aufträge über das Bedienfeld des Druckers:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	Drücken Sie die Taste ^ mehrmals, bis e-MPS angezeigt wird. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^ mehrmals, bis Privat/Gespeichert angezeigt wird. Drücken Sie dann die Eingabetaste.

4.	Drücken Sie die Taste ^ mehrmals, bis der gewünschte Benutzername angezeigt wird. Drücken Sie dann die Eingabetaste.

5.	Drücken Sie die Taste ^ mehrmals, bis der gewünschte Auftragsname angezeigt wird. Drücken Sie dann die Eingabetaste.

6.	Geben Sie durch Drücken der Tasten <, >, ^ und V den korrekten Zugangscode ein. Drücken Sie die Eingabetaste, um den Zugangscode einzureichen.

7.	Wählen Sie die Anzahl der zu druckenden Exemplare durch Drücken der Taste ^ oder V, um die Anzahl der Exemplare zu erhöhen oder zu senken. Sie können 1 bis 999 Exemplare auswählen. Eine Einstellung auf Null löscht den privaten Druck-Auftrag.

8.	Drücken Sie die Eingabetaste, um den privaten Druck-Auftrag zu drucken.

Der private Druck-Auftrag wird gelöscht, wenn er gedruckt wurde, außer er wird mit der Auftragsspeicher-Funktion gespeichert.


Auftragsspeicher-Aufträge drucken

So drucken Sie weitere Auftragsspeicher-Aufträge über das Bedienfeld des Druckers:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	Drücken Sie die Taste ^ mehrmals, bis e-MPS angezeigt wird. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^ mehrmals, bis Privat/Gespeichert angezeigt wird. Drücken Sie dann die Eingabetaste.

4.	Drücken Sie die Taste ^ mehrmals, bis der gewünschte Benutzername angezeigt wird. Drücken Sie dann die Eingabetaste.

5.	Drücken Sie die Taste ^ mehrmals, bis der gewünschte Auftragsname angezeigt wird. Drücken Sie dann die Eingabetaste.

6.	Geben Sie durch Drücken der Tasten <, >, ^ und V den korrekten Zugangscode ein, falls ein solcher mit dem Druckauftrag gesendet wurde. Drücken Sie die Eingabetaste, um den Zugangscode einzureichen.

7.	Wählen Sie die Anzahl der zu druckenden Exemplare durch Drücken der Taste ^ oder V, um die Anzahl der Exemplare zu erhöhen oder zu senken. Sie können 1 bis 999 Exemplare auswählen. Eine Einstellung auf Null löscht den Druckauftrag.

8.	Drücken Sie die Eingabetaste, um den Auftragsspeicher-Auftrag zu drucken.

Der Auftragsspeicher-Auftrag wird permanent gespeichert und nicht gelöscht, wenn der Drucker abgeschaltet wird.


 Register Prolog/Epilog

Damit können Sie PRESCRIBE-Befehle als Textdatei in ein Dokument einbetten. Die Textdateien werden im Treiber ausgewählt und werden zu Prolog/Epilog-Datendateien. Die Befehle sind in allen Emulationsmodi verfügbar.

PRESCRIBE-Befehle können die Druckerfunktionen steuern oder Makros enthalten, die sich auf die Druckausgabe auswirken. Eingebettete Befehle können z. B. einen Briefkopf oder ein Briefformular einfügen oder Druckeremulation oder die Papierquelle für ausgewählte Seiten ändern. PRESCRIBE ist eine residente, benutzerorientierte Befehlssprache, die den Funktionsumfang des digitalen Kopierers/Netzwerkdruckers erweitert.

Um diese Plug-In-Funktion im Kyocera Mita Extended Driver zu verwenden, wählen Sie die Option Prolog/Epilog-Modul, wählen Sie den Treiber von der Kyocera Mita Digital Library-CD auswählen. Um das Prolog/Epilog-Modul zu einem bereits ausgewählten Treiber hinzuzufügen, installieren Sie den Kyocera Mita Extended Driver und wählen Sie Prolog/Epilog-Modul. Daraufhin wird das Register Prolog/Epilog auf der Benutzeroberfläche angezeigt. Das Modul wird im Dialogfeld Plug-In-Informationen angezeigt, auf das Sie über das Register Info zugreifen.

Hinweis: Die Optionen für Seitenanfang und Seitenende stehen nur zur Verfügung, wenn PCL 5e als Seitenbeschreibungssprache im Dialogfeld Benutzereinstellungen ausgewählt wurde.

Das Register Prolog/Epilog enthält folgende Optionen:

• Prolog-/Epilog-Datendateien	Über die Liste wählen Sie die gewünschte Prolog/Epilog-Datendatei. Befehle werden in Textdateien (.txt) gespeichert.
• Hinzufügen	Klicken Sie auf Hinzufügen… um nach PRESCRIBE-Befehlsdateien zu suchen, die sie zur Liste Prolog-/Epilog-Datendateien hinzufügen.
• Entfernen	Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Entfernen, um sie von der Liste zu löschen.
• Bearbeiten	Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Bearbeiten.... Die Datei wird im Editor geöffnet, in dem Sie den Text bearbeiten können.
• Funktion deaktivieren	Deaktivieren Sie das Kästchen, um die Funktionen im Register Prolog/Epilog zu aktivieren. Alle unter Prolog-/Epilog-Datendateien aufgeführten Dateien werden auf Ihren Druckauftrag angewendet, wenn sie nicht auf Keine [Nicht zugewiesen] eingestellt werden. Wählen Sie das Kästchen aus, um die Funktionen und Dateien zu deaktivieren.
Einfügepunkt:	Damit können Sie den Einfügepunkt für eingebettete Prolog-/Epilog-Datendateien wählen. Wählen Sie für jede Datendatei einen Einfügepunkt.
• Keine [Nicht zugewiesen]	Falls mehrere Datendateien auf der Liste Prolog-/Epilog-Datendateien aufgeführt werden, können Sie einzelne Dateien auf Keine [Nicht zugewiesen] einstellen, um sie zu deaktivieren. Alle Dateien ohne die Einstellung Keine [Nicht zugewiesen] werden auf Druckaufträge angewendet.
• Anfang des Druckauftrags	Bettet eine Prolog-/Epilog-Datendatei auf der ersten Seite eines Druckauftrags ein.
• Ende des Druckauftrags	Bettet eine Prolog-/Epilog-Datendatei auf der letzten Seite eines Druckauftrags ein.
• Seitenanfang	Bettet eine Prolog-/Epilog-Datendatei am Beginn jeder Seite eines Druckauftrags ein. Wählen Sie eine Seitenoption: • Nur auf ungeraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit ungeraden Seitennummern an. • Nur auf geraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit geraden Seitennummern an. • Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf Seitennummern bzw. Seitenbereiche an. Werden keine Seitenzahlen eingegeben, wird die eingebettete Prolog-/Epilog-Datendatei auf alle Seiten angewendet.
• Seitenende	Bettet eine Prolog-/Epilog-Datendatei am Ende jeder Seite eines Druckauftrags ein. Wählen Sie eine Seitenoption: • Nur auf ungeraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit ungeraden Seitennummern an. • Nur auf geraden Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit geraden Seitennummern an. • Seiten wendet eine eingebettete Prolog-/Epilog-Datendatei auf Seitennummern bzw. Seitenbereiche an. Werden keine Seitenzahlen eingegeben, wird die eingebettete Prolog-/Epilog-Datendatei auf alle Seiten angewendet.

Siehe auch

Register Geräteeinstellungen

Benutzereinstellungen

Register Info


 Register Info

Das Register Info zeigt Treibernamen, Version und Build-Nummer sowie damit zusammenhängende Systeminformationen an. Der technische Support fragt möglicherweise nach diesen Informationen.

• Version	Zeigt Informationen über installierte Treiberkomponenten an.
• Plug-In	Zeigt Informationen über optionale Plug-In-Module an.

Weitere Eigenschaften-Register

Register Medien

Register Layout

Register Bildbearbeitung

Register Ausgabe

Register Geräteeinstellungen

Siehe auch

Auf die Registerkarte Geräteeinstellungen zugreifen


 Register Geräteeinstellungen

Mit dem Register Geräteeinstellungen können Sie Druckeroptionen wählen, damit ihnen zugewiesene Funktionen mit dem Druckertreiber verwendet werden können. Sie können außerdem die Speichereinstellung im Treiber an den in Ihrem Drucker installierten Speicher anpassen, damit der Treiber das Laden von Schriftarten besser verwalten kann.

Das Register Geräteeinstellungen enthält folgende Optionen:	Siehe auch
Geräteoptionen	Papierzufuhr
Festplatten-Einstellungen	Umschlagzufuhr
Benutzereinstellungen	Duplex-Einheit
Verwaltereinstellungen	Festplatte
Speicher	Sortierstapler
RAM-Festplatte	Bulk-Zufuhren und Stapler
3D-Bild


 Geräteoptionen

Damit können Sie angeschlossene Geräte auswählen. Falls Sie eine oder mehrere Druckeroptionen angeschlossen haben, wählen Sie das Kontrollkästchen neben dem jeweiligen Gerät. Klicken Sie auf OK, um die Geräte im Druckertreiber zu aktivieren.

Der Drucker unterstützt folgende optionale Geräte:

• Papierzufuhr	Eine Papierquelle für 500 Blätter.
• Umschlagzufuhr	Führt mehrere Umschläge von einem maximal 40 mm (1,5 Zoll) hohen Stapel zu.
• Bulk-Zufuhr (Massenzufuhr)	Eine Papierquelle für 2000 Blätter.
• Duplex-Einheit	Damit können Sie beide Seiten eines Blatts bedrucken.
• Festplatte	Eine Festplatte, die 340 MB Speicherplatz bietet.
• Sortierstapler	Damit können Aufträge sortiert, gestapelt und an fünf Mailboxen geliefert werden.
• Bulk-Stapler	Ein Stapler für 2000 Blätter.
• RAM-Festplatte	Damit können Sie einen bestimmten Anteil des Druckerspeichers als RAM-Festplatte für das Zwischenspeichern von Aufträgen (Job Caching) zuweisen.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Festplatten-Einstellungen

Benutzereinstellungen

Verwaltereinstellungen

Speicher


 Bulk-Zufuhren und Stapler

Für hohe Druckvolumen stehen für bestimmte Modelle Bulk-Papierzufuhren und –Stapler zur Verfügung. Der Drucker unterstützt folgende Bulk-Zufuhren und –Stapler:

• Bulk-Zufuhr (Massenzufuhr)	Papierzufuhr für 2000 Blätter
• Bulk-Stapler (Massenstapler)	Stapler für 2000 Blätter

Die Bulk-Zufuhr kann nicht gewählt werden, wenn die Papier- oder Umschlagzufuhr installiert und ausgewählt wurde. Um die Bulk-Zufuhr zu verwenden, müssen sich sowohl Bulk-Zufuhr als auch Drucker auf der Druckerbasis befinden.

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Festplatten-Einstellungen

Benutzereinstellungen

Verwaltereinstellungen

Speicher

RAM-Festplatte


 Festplatten-Einstellungen

Damit können Sie einen Mailboxnamen und eine Nummer für das virtuelle Ausgabefach zuweisen. Diese Funktion steht nur zur Verfügung, wenn eine optionale Festplatte im Drucker installiert wurde und im Dialogfeld Geräteoptionen im Register Geräteeinstellungen ausgewählt wurde.

Aufträge in einer virtuellen Mailbox können über das Bedienfeld des Druckers gedruckt werden.

Mailboxnamen und virtuelles Ausgabefach zuweisen

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen	Verwaltereinstellungen
Geräteoptionen	Speicher
Festplatte	RAM-Festplatte
Benutzereinstellungen


Mailboxnamen und virtuelles Ausgabefach zuweisen

So weisen Sie einen Mailboxnamen und ein virtuelles Ausgabefach zu:

1.	Wählen Sie das Kontrollkästchen Festplatte und doppelklicken Sie dann auf den blauen, markierten Test Festplatte.

Das Dialogfeld Festplatten-Einstellungen wird angezeigt.

2.	Geben Sie einen bis zu 31 Zeichen langen Namen in das Feld Mailboxname ein.

3.	Geben Sie eine oder mehrere Zahlen in Virtuelles Ausgabefach ein.  Nummern und Bereiche werden durch Kommas getrennt eingegeben. Beispiel: 1, 3, 5-12. Die Nummern müssen zwischen 1 und 255 liegen. 255 ist die maximale Anzahl von Mailboxen, die eingerichtet werden können.

4.	Klicken Sie auf Speichern.

Der Mailboxname wird zur Liste im Felder Definierte Namen hinzugefügt.

•	Um ein virtuelles Ausgabefach zu ändern, wählen Sie den Namen in Definierte Namen aus, wählen Sie die Nummer oder Nummern in Virtuelles Ausgabefach, geben Sie neue Nummern oder Bereiche ein und klicken Sie auf Speichern.

Der Mailboxname wird weiterhin im Fenster Definierte Namen aufgeführt. Er ist jetzt der oder den neuen virtuellen Ausgabefach-Nummern zugewiesen.

•	Um einen definierten Namen aus der Liste zu löschen, wählen Sie ihn im Fenster Definierte Namen und klicken Sie auf Löschen.

•	Weil es keine Umbenennen-Funktion gibt, löschen Sie den definierten Namen und fangen mit einem neuen Mailbox-Namen von vorn an.


 Benutzereinstellungen

Damit können Sie Benutzer- und Abteilungsnamen angeben, um eine Seitenbeschreibungssprache auszuwählen und weitere KPDL-Einstellungen vorzunehmen. Klicken Sie auf die Schaltfläche Benutzer…, um das Dialogfeld Benutzereinstellungen zu öffnen.

Identifikation

Legen Sie einen Benutzernamen und eine Abteilung fest, die während des Druckens am Bedienfeld des Druckers angezeigt werden. Diese Namen dürfen maximal 31 Zeichen lang sein. Geben Sie den Namen in das Feld ein und klicken Sie auf OK. Der Verwalter kann eine Richtlinie festlegen, mit der diese Informationen am Bedienfeld des Druckers angezeigt und anstelle des Auftragsnamens beim Speichern eines Auftrags auf der Festplatte des Druckers verwendet werden können. Sie können einen Auftragsnamen (Anwendungsdefiniert oder Spezial) im Dialogfeld Auftragseinstellungen festlegen. Auf dieses Dialogfeld greifen Sie über das Register Ausgabe zu.

Namen am Bedienfeld anzeigen

Seitenbeschreibungssprache

Wählen Sie aus der Liste Seitenbeschreibungssprache eine der folgenden Optionen aus:

PCL XL	In den folgenden Bereichen gegenüber PCL 5e erweitert: • Reduzierte Dateigröße • Höhere Druckgeschwindigkeit • Schnellere Rückkehr zur Anwendung • Keine Rückwärtskompatibilität mit früheren PCL-Versionen
PCL 5E	• Reduzierte Dateigröße • Bessere Druckgeschwindigkeit, v. a. bei einfachem Text und Grafiken • Erfordert weniger Druckerspeicher als KPDL • Ermöglicht mehr Optionen zur Verwendung von PRESCRIBE-Befehlen innerhalb von Anwendungen • Komplexe Grafiken werden nicht so gut gedruckt
KPDL	• Emulation des PostScript®-Drucks  • Hervorragende Grafikwiedergabe  • Druckgeschwindigkeiten können niedriger als bei PCL 5e sein • Erfordert mehr Druckerspeicher als PCL 5e

PCL XL und 5e Einstellungen

Wählen Sie PCL XL oder PCL 5e als Seitenbeschreibungssprache und klicken Sie auf Einstellungen…, um das Dialogfeld PCL XL Einstellung oder PCL 5e Einstellung anzuzeigen.

• Text als Schwarzdruck	Druckt den Farbtext mit schwarzem Toner statt in Graustufen. Weißer Text und Bildfarben sind davon nicht betroffen.

Optionen für KPDL

Es stehen vier Druckverbesserungen zur Verfügung, wenn KPDL als Seitenbeschreibungssprache ausgewählt wird. Klicken Sie auf die Schaltfläche Einstellungen…, um das Dialogfeld KPDL-Einstellungen zu öffnen. Sie können aus folgenden Optionen wählen:

• Spiegeldruck	Druckt die Daten rückwärts, also spiegelbildlich.
• Bild umkehren	Druckt die Seite als Negativ, wobei weiße und schwarze Bilder umgekehrt gedruckt werden.
• Erlaube Datendurchlass	Für sehr komplexe Dokumente verfügbar. Kann auch Kompatibilitätsprobleme mit PostScript®-Anwendungen beheben.
• Text als Schwarzdruck	Druckt den Farbtext mit schwarzem Toner statt in Graustufen. Weißer Text und Bildfarben sind davon nicht betroffen.

GDI kompatibler Modus

Für PCL-basierte Seitenbeschreibungssprachen unterstützt der Extended Driver das Drucken im GDI-kompatiblen Modus. Dieser Modus weist das PDL-Modul an, genau die Bildschirmansicht zu erstellen. Er erstellt Daten in einem Rasterdruckformat, wodurch eine größere druckbare Datei entsteht, die jedoch mehr der Bildschirmanzeige entspricht. Die Microsoft Graphical Device Interface (GDI)-Komponente in Windows gibt das Dokument so wieder, wie es auf dem Bildschirm erscheint.

Einheiten

Gibt Zoll oder Millimeter als Einheit der benutzerdefinierten Papiergrößen und Bundstegeinstellungen an.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch
Register Geräteeinstellungen	Register Medien
Geräteoptionen	Benutzerdefinierte Papiergrößen
Festplatten-Einstellungen	Register Layout
Verwaltereinstellungen	Seiten pro Blatt
Speicher	Bundstegeinstellungen
RAM-Festplatte


 Verwaltereinstellungen

Damit können Sie Auftragsinformationen auf dem Bedienfeld des Druckers anzeigen, um neue Medienquellennummern zuzuweisen und ein Passwort für Sicherheitszwecke einzurichten. Klicken Sie auf die Schaltfläche Verwalter…, um das Dialogfeld Verwaltereinstellungen zu öffnen.

Bedienfeld-Meldung

Sie können einen Namen wählen, der während der Auftrag gedruckt wird am Bedienfeld des Druckers angezeigt wird. Wählen Sie zwischen Auftragsname, Benutzername und Abteilung.

•	Legen Sie den Auftragsnamen im Dialogfeld Auftragseinstellungen fest. Auf dieses Dialogfeld greifen Sie über das Register Ausgabe zu.

•	Legen Sie den Benutzernamen und die Abteilung im Dialogfeld Benutzereinstellungen fest.

Namen am Bedienfeld anzeigen

Kompatibilitäts-Einstellungen

Damit kann ein Verwalter Werte für Medienquellen festlegen, damit der Extended Driver mit vorherigen Treibern kompatibel ist. Diese Ausrichtung alter und neuer Medienquellen ermöglicht, dass alle unter vorherigen Treibern erstellten Dokumente unter dem neuen Extended Driver kompatibel sind.

Werte für Medienquellen neu zuweisen

Passwort einrichten

Damit kann der Verwalter ein Passwort für alle Verwaltereinstellungs-Funktionen einrichten. Ein Passwort ist nicht erforderlich, um die Verwaltereinstellungs-Funktionen zu verwenden. Wenn jedoch ein Passwort eingerichtet wurde, werden alle Verwaltereinstellungs-Funktionen deaktiviert, bis das Passwort in das Dialogfeld Passwort eingeben eingegeben wurde.

Klicken Sie auf Passwort einrichten.... Geben Sie Ihr Passwort ein und bestätigen Sie es durch erneute Eingabe. Klicken Sie dann auf OK. Daraufhin zeigt das Dialogfeld Verwaltereinstellungen die Option Passwort bearbeiten… an. Klicken Sie auf Passwort bearbeiten…, um das Dialogfeld Passwort eingeben zu öffnen, und geben Sie das Passwort ein. Klicken Sie dann auf OK.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch
Register Geräteeinstellungen	Speicher
Geräteoptionen	RAM-Festplatte
Festplatten-Einstellungen	Register Ausgabe
Benutzereinstellungen	Auftragseinstellungen


Namen am Bedienfeld anzeigen

So wählen Sie einen Namen aus:

1.	Im Dialogfeld Verwaltereinstellungen:

•	Falls ein Passwort eingerichtet wurde, klicken Sie auf Passwort bearbeiten..., geben Sie das Passwort ein und klicken Sie auf OK. Wählen Sie dann Bedienfeld-Meldung.

•	Falls kein Passwort eingerichtet wurde, wählen Sie Bedienfeld-Meldung.

2.	Wählen Sie aus folgenden drei Optionen aus:

•	Auftragsname anzeigen

•	Benutzername anzeigen

•	Abteilung anzeigen

Hinweis: Sie können den Benutzernamen und die Abteilung im Dialogfeld Benutzereinstellungen, auf das Sie über das Register Geräteeinstellungen zugreifen, einrichten. Sie können den Auftragsnamen im Dialogfeld Auftragseinstellungen, auf das Sie über das Register Ausgabe zugreifen, festlegen.


Medienquellenwerte neu zuweisen

So weisen Sie Medienquellenwerte neu zu:

1.	Klicken Sie im Dialogfeld Verwaltereinstellungen auf Kompatibilitäts-Einstellungen....

Das Dialogfeld Kompatibilitäts-Einstellungen wird angezeigt.

2.	Wählen Sie aus der Liste die neu zuzuweisende Quelle aus.

3.	Ersetzen Sie den Wert in Aufzählungswert mit dem korrekten Wert.

4.	Klicken Sie auf Anwenden.

Der neue Wert wird der ausgewählten Quelle zugewiesen.

5.	Klicken Sie auf Zurücksetzen, um alle Quellenwerte auf ihre Voreinstellungen zurückzusetzen.

6.	Wenn Sie fertig sind, klicken Sie auf OK.


 Speicher

Damit können Sie die Speichereinstellung im Druckertreiber an den in Ihrem Drucker installierten Speicher anpassen. Die Standard-Speichereinstellung im Druckertreiber beträgt 8 MB. Verfügbare Speicherkonfigurationen: 16, 24, 32, 48 und 144 MB.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Benutzereinstellungen

Verwaltereinstellungen

RAM-Festplatte

Duplex-Modus


 RAM-Festplatte

Damit können Sie einen bestimmten Anteil des Druckerspeichers als RAM-Festplatte für das Zwischenspeichern von Aufträgen zuweisen.

Wenn die RAM-Festplatte installiert und die Funktion Sortieren unter Endbearbeitungsoptionen im Register Ausgabe ausgewählt ist, ist die Druckgeschwindigkeit bei einem aus mehreren Exemplaren bestehenden sortierten Auftrag die Nenngeschwindigkeit des Druckers.

Die RAM-Festplatte kann nicht ausgewählt werden, wenn die optionale Festplatte installiert und ausgewählt wurde. Falls eine Festplatte installiert wurde, müssen Sie sie entfernen, um die RAM-Festplatte zu verwenden.

Der RAM-Festplattenspeicher ist temporär. Alle auf die RAM-Festplatte gesendeten Daten gehen verloren, wenn der Drucker zurückgesetzt oder ausgeschaltet wird.

RAM-Festplatte am Bedienfeld des Druckers aktivieren

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch
Register Geräteeinstellungen	Verwaltereinstellungen
Geräteoptionen	Speicher
Festplatten-Einstellungen	Register Ausgabe
Benutzereinstellungen	Endbearbeitungsoptionen


RAM-Festplatte am Bedienfeld des Druckers aktivieren

Im Drucker müssen mind. 12 MB RAM installiert sein, um die RAM-Festplatte zu verwenden. Folgen Sie den Anweisungen, um die RAM-Festplatte am Bedienfeld des Druckers zu aktivieren und ihr Speicher zuzuweisen. Außerdem muss die RAM-Festplatte im Druckertreiber im Register Geräteeinstellungen aktiviert werden.

So aktivieren Sie die RAM-Festplatte am Bedienfeld des Druckers:

1.	Drücken Sie am Bedienfeld des Druckers MENÜ.

2.	Drücken Sie die Taste ^ mehrmals, bis RAM-Festplattenmodus angezeigt wird. Drücken Sie dann die Eingabetaste.

3.	Wenn ein ? unter RAM-Festplatte aufleuchtet, drücken Sie die Taste ^, bis Ein angezeigt wird.

4.	Drücken Sie die Eingabetaste.

Am Bedienfeld des Druckers muss auch Speicher zugewiesen werden, nachdem die RAM-Festplatte auf Ein geschaltet wurde.

5.	Wenn am Bedienfeld RAM-Festplattenmodus angezeigt wird, drücken Sie die Taste >.

6.	Wenn am Bedienfeld RAM-Festplattengröße angezeigt wird, drücken Sie die Eingabetaste.

7.	Wenn ein _ unter der ganz rechts angezeigten Ziffer aufleuchtet, drücken Sie die Taste ^ oder v, bis die jeweilige Speichermenge angezeigt wird.

Der maximal für die Zuweisung verfügbare Speicher hängt vom installierten Speicher und vom für die Verwendung verfügbaren Speicher ab. Der Drucker verwendet ca. 4 MB für den Systemspeicher. Dieser Speicher kann nicht zugewiesen werden.

8.	Drücken Sie die Eingabetaste. Drücken Sie die Taste Menü.

9.	Setzen Sie den Drucker zurück bzw. schalten Sie ihn aus und dann wieder an, um die Einstellung abzuschließen.


 Papierzufuhr

Bei der Papierzufuhr handelt es sich um eine optionale Papierquelle für 500 Blatt Papier. Um diese Papierquelle zu verwenden, muss sie zuerst unter der internen Kassette des Druckers befestigt und im Register Geräteeinstellungen unter Geräteoptionen installiert werden. Maximal drei Papierzufuhren können am Drucker angeschlossen werden. Dadurch werden die Kassettenpapierquellen auf vier und die Gesamtkapazität auf 2000 Blätter erhöht.

Die Papierzufuhr kann mit allen optionalen Druckgeräten verwendet werden. Falls Sie die Papierzufuhr zusammen mit einer Duplex-Einheit verwenden, befestigen Sie die Duplex-Einheit direkt unter der/den Papierzufuhr(en).

Unterstützte Seitengrößen für die Papierzufuhr

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Medienarten für die Papierzufuhr

Normalpapier, Overhead-Folien, Etiketten, Feinpapier, Pergamentpapier

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Register Medien

Quelle


 Umschlagzufuhr

Die Umschlagzufuhr ist eine optionale Papierquelle, mit der viele Umschläge zugeführt werden können. Die maximale Umschlagkapazität der Umschlagzufuhr hängt von der Stärke der eingelegten Umschläge ab. Die Höhe des Umschlagstapels sollte 40 mm (1,5 Zoll) nicht übersteigen.

Die Umschlagzufuhr muss am Drucker angeschlossen und im Register Geräteeinstellungen unter Geräteoptionen installiert sein. Umschläge können nicht mit der Duplex-Einheit oder dem Sortierstapler verwendet werden.

Die Umschlagzufuhr unterstützt keine benutzerdefinierten Umschlaggrößen. Nicht unterstützte Größen können zu Staus oder Gerätebeschädigungen führen.

Unterstützte Umschlaggrößen für die Umschlagzufuhr

Envelope #6, Envelope #9, Envelope #10, Envelope Monarch, Envelope DL, Envelope C5

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Register Medien

Quelle


 Duplex-Einheit

Mit der Duplex-Einheit können Sie beide Seiten eines Blatts bedrucken. Installieren Sie die Duplex-Einheit direkt unter dem Hauptteil des Druckers und über allen Papierzufuhren, die Sie angeschlossen haben. Das V-o-Fach muss ebenfalls angebracht sein.

Um die Duplex-Einheit zu verwenden, wählen und installieren Sie sie als Geräteoption im Register Geräteeinstellungen. Der Duplex-Druck kann verwendet werden, indem Sie im Register Layout die Option Beidseitiger Druck (Duplex) wählen. Sie können dann wählen, wie die Kopien gedruckt werden, indem Sie zwischen An Längsseite wenden und An Schmalseite wenden wählen.

Einige Medienarten werden von der Duplex-Einheit nicht unterstützt. Wenn nicht unterstützte Medienarten verwendet werden, kann es zu Papierstaus und Beschädigungen der Duplex-Einheit kommen.

Unterstützte Seitengrößen für die Duplex-Einheit

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Medienarten für den Duplex-Druck

Normalpapier, Vordrucke, Feinpapier, Recycling, Grob, Letter Head, Farbig, Gelocht, Spezial

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Register Layout

Duplex-Modus


 Festplatte

Die Festplatte ist ein optionales Festplattenlaufwerk, das 340 MB Speicherplatz bietet. Um die Festplatte zu verwenden, muss sie zuerst im IC-Kartensteckplatz des Druckers installiert und im Register Geräteeinstellungen unter Geräteoptionen installiert werden.

Die Festplatte bietet permanenten Speicherplatz für Druckaufträge, wenn die Funktion Auftragsspeicher verwendet wird. Ist die Festplatte installiert, kann die RAM-Festplatte nicht verwendet werden.

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen	Speicher
Geräteoptionen	RAM-Festplatte
Festplatten-Einstellungen	Register Ausgabe
Benutzereinstellungen	Auftragseinstellungen
Verwaltereinstellungen


 Sortierstapler

Der Sortierstapler ist ein Ausgabeziel hoher Kapazität, mit dem Druckaufträge sortiert und in fünf Mailboxen ausgeliefert werden können. Um die Funktionen des Sortierstaplers zu aktivieren, muss der Sortierstapler mit einem Drucker verbunden und im Register Geräteeinstellungen unter Geräteoptionen installiert werden. Wählen Sie dann Mailbox (V-u) als Ausgabeziel.

Jedes Mailboxfach hat eine Kapazität von 200 Blatt (100 Blatt für Legal-Format). Alle fünf Fächer erhalten Aufträge in der V-u-Position (Druckbild nach unten).

Unterstützte Seitengrößen für den Sortierstapler

Letter, Legal, A4, A5, B5 (JIS), Spezial

Unterstützte Medienarten für den Sortierstapler

Normalpapier, Overhead-Folien, Etiketten, Feinpapier, Pergamentpapier

Auf die Registerkarte Geräteeinstellungen zugreifen

Siehe auch

Register Geräteeinstellungen

Geräteoptionen

Festplatten-Einstellungen

Benutzereinstellungen

Verwaltereinstellungen

Speicher

RAM-Festplatte


 3D-Bild

Die Register Medien, Layout, Bildbearbeitung, Ausgabe und Geräteeinstellungen enthalten ein 3D-Bild, das bestimmte Funktionen im Register illustrieren kann.

Register Medien

Illustriert die Auswahl Quelle mit grüner Markierung.

Register Layout

Illustriert die Auswahlmöglichkeiten Seiten pro Blatt, Umrandung drucken, Layout, Skalierung und Duplex.

Register Bildbearbeitung

Illustriert die Graustufeneinstellung.

Register Ausgabe

Illustriert die Ausgabeposition. Wenn optionale Ausgabegeräte angeschlossen sind, werden die Ausgabepositionen für Bulk-Fach, Mailbox und oberes Fach hervorgehoben.

Register Geräteeinstellungen

Illustriert die Auswahl Geräteoptionen. Wenn Sie ein optionales Gerät anschließen und auf der Liste Geräteoptionen auswählen, erscheint dieses Gerät mit dem Drucker auf dem Bild. Die Festplatte erscheint nicht im Bild.


Mehrzweckfach als Kassette einstellen

Durch Einstellen des Mehrzweckfachs als Kassette wird schneller gedruckt, als wenn das Mehrzweckfach als erste Option eingestellt wird. Bei der Kassetteneinstellung können Sie das Mehrzweckfach jedoch nicht für den Duplex-Druck verwenden.

So stellen Sie das Mehrzweckfach als Kassette ein:

1.	Drücken Sie am Bedienfeld des Druckers menü.

2.	Drücken Sie die Taste ^ mehrmals, bis Papierhandhabung angezeigt wird. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^ mehrmals, bis Mehrzweckfachmodus angezeigt wird. Drücken Sie dann die Eingabetaste.

4.	Wenn ein ? unter Mehrzweckfachmodus aufleuchtet, drücken Sie die Taste ^, bis Kassette angezeigt wird.

5.	Drücken Sie die Eingabetaste und dann die Taste Menü.

Die Einstellung Erst hat vor der Auswahl der Papierquelle des Treibers Vorrang und weist den Drucker an, zuerst aus die Mehrzweckzufuhr zu verwenden, sofern diese angebracht ist. Ist die Mehrzweckzufuhr nicht angebracht, bestimmt die Treiber-Auswahl Papierquelle die Papierquelle.


Mehrzweckfach als erste Option einstellen

Wird das Mehrzweckfach als Erst eingestellt, führt der Drucker automatisch in das Mehrzweckfach eingelegtes Papier zu, selbst wenn im Drucker eine andere Papierquelle gewählt wurde. Nachdem das gesamte Papier im Mehrzweckfach aufgebraucht wurde, wird Papier von der ursprünglich eingestellten Quelle zugeführt.

So stellen Sie das Mehrzweckfach als erste Option ein:

1.	Drücken Sie am Bedienfeld des Druckers menü.

2.	Drücken Sie die Taste ^ mehrmals, bis Papierhandhabung angezeigt wird. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^ mehrmals, bis Mehrzweckfachmodus angezeigt wird. Drücken Sie dann die Eingabetaste.

4.	Wenn ein ? unter Mehrzweckfachmodus aufleuchtet, drücken Sie die Taste ^, bis Erst angezeigt wird.

5.	Drücken Sie die Eingabetaste und dann die Taste Menü.


Mehrzweckfach-Papiergrößen einstellen

Das Mehrzweckfach muss auf die richtige Größe eingestellt werden, um es als Papierquelle zu verwenden.

So stellen Sie die Mehrzweckfach-Papiergrößen ein:

1.	Drücken Sie am Bedienfeld des Druckers menü.

2.	Drücken Sie die Taste ^ mehrmals, bis Papierhandhabung angezeigt wird. Drücken Sie dann die Taste >.

3.	Drücken Sie die Taste ^ mehrmals, bis Mehrzweckfach angezeigt wird. Drücken Sie dann die Eingabetaste.

4.	Wenn ein ? unter Mehrzweckfachgröße aufleuchtet, drücken Sie die Taste ^, bis die gewünschte Papiergröße angezeigt wird.

5.	Drücken Sie die Eingabetaste und dann die Taste Menü.


Medienarten für Kassetten und Mehrzweckfach einstellen

Kassetten und Mehrzweckfach müssen auf die richtige Medienart eingestellt werden, um sie als Papierquelle zu verwenden.

So stellen Sie die Medienart für Kassetten und Mehrzweckfach ein:

1.	Drücken Sie am Bedienfeld des Druckers menü.

2.	Drücken Sie die Taste ^ mehrmals, bis Papierhandhabung angezeigt wird. Drücken Sie dann die Taste >.

3.	Suchen Sie die gewünschte Papierquelle (Kassette oder Mehrzweckfach), indem Sie die Taste ^ drücken. Drücken Sie dann die Eingabetaste.

4.	Wenn ein leuchtendes ? neben einer Medienart unter der Quelle angezeigt wird, bewegen Sie sich mittels der Taste ^ durch die verfügbaren Medienarten, bis die gewünschte angezeigt wird. Drücken Sie dann die Eingabetaste.

5.	Drücken Sie die Taste menü.


Auf das Register Geräteeinstellungen zugreifen

Mit dem Register Geräteeinstellungen können Sie installierte Druckeroptionen wählen, damit ihnen zugewiesene Funktionen mit dem Druckertreiber verwendet werden können.

So greifen Sie auf das Register Geräteeinstellungen zu:

1.	Öffnen Sie das Menü Start, das sich unten links auf dem Windows-Bildschirm befindet.

2.	Wählen Sie Einstellungen.

3.	Wählen Sie Drucker.

4.	Klicken Sie mit der rechten Maustaste auf den gewünschten Drucker.

5.	Wählen Sie Eigenschaften.

6.	Wählen Sie das Register Geräteeinstellungen.


Legt ein Papier- oder Umschlagformat für den Druckauftrag aus der angezeigten Liste fest.


Öffnet das Dialogfeld Benutzerdefinierte Papiergröße, mit dem Sie benutzerdefinierte Papierformate wählen können.


Legt die Größe der Druckausgabe im Verhältnis zur ausgewählten Seitengröße fest.


Legt anhand von physischer Position, Medienart oder Spezialart fest, woher das Papier für den Auftrag kommt.


Stellt den Drucker so ein, dass im Druckauftrag verwendete Medienart und Papierquelle aufeinander abgestimmt werden.


Gibt an, in welcher Richtung die Daten auf der Seite angeordnet werden.


Druckt die Daten auf einer Seite, auf der die Papierhöhe größer als die Papierbreite ist.


Druckt die Daten auf einer Seite, auf der die Papierbreite größer als die Papierhöhe ist.


Dreht die Daten auf der gedruckten Seite um 180 Grad.


Die Grafik ändert sich, um die ausgewählte Ausrichtung darzustellen.


Damit können Sie benutzerdefinierte Seitenabmessungen erstellen, diese umbenennen und für die spätere Verwendung speichern. Nach der Erstellung kann eine benutzerdefinierte Seitengröße unter den Einstellungen Seitengröße im Register Medien ausgewählt werden.


Zeigt die Liste der benutzerdefinierten Papiergrößen an.


Um eine neue benutzerdefinierte Papiergröße zu erstellen, klicken Sie auf die Schaltfläche Hinzufügen…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.


Um eine benutzerdefinierte Papiergröße aus der Liste zu löschen, wählen Sie das Objekt und klicken Sie auf Entfernen.


Um eine benutzerdefinierte Papiergröße zu bearbeiten oder umzubenennen, klicken Sie auf die Schaltfläche Bearbeiten…, um das Dialogfeld Papiergröße bearbeiten zu öffnen.


Um eine benutzerdefinierte Papiergröße einstellen oder umzubenennen, geben Sie den Namen in das Feld ein. Er darf bis zu 31 Zeichen lang sein.


Gibt Höhe und Breite der benutzerdefinierten Papiergröße an.


Öffnet das Dialogfeld Erweiterte Materialeinstellungen, in dem der Deckblatt-Modus, die Seiteneinfügung und die Folien-Zwischenblattfunktion aktiviert werden können.


Weist den Drucker an, einen Druckauftrag mit einem vorder- oder vorder- und rückseitigen Deckblatt zu versehen.


Weist den Drucker an, einen Druckauftrag nur mit einem vorderseitigen Deckblatt zu versehen.


Weist den Drucker an, einen Druckauftrag mit einem vorder- und rückseitigen Deckblatt zu versehen.


Wählen Sie aus den verfügbaren Optionen aus, um Daten auf der Vorder- und Rückseite zu drucken.


Wählen Sie die Quelle für das Deckblatt aus dem Menü Medien für Deckblatt aus.


Illustriert die Auswahl Deckblatt-Modus.


Weist den Drucker an, zwischen einer ausgewählten Anzahl gedruckter Seiten ein Trennblatt einzufügen.


Schließt das Drucken auf die Vorderseite der Einfügungen ein. Wird diese Option markiert, wird jedes eingefügte Blatt mit Daten bedruckt, die seine Position im gesamten Druckauftrag wiedergeben. Eine Einfügung zwischen den Seiten 9 und 10 bei ausgewählter Option Auf Vorderseite drucken wird als Seite 10 gedruckt. Wird Auf Rückseite drucken ebenfalls ausgewählt, wird die Einfügung als Seite 10 und 11 gedruckt.


Schließt das Drucken auf die Rückseite der Einfügungen ein. Wird diese Option markiert, wird jedes eingefügte Blatt mit Daten bedruckt, die seine Position im gesamten Druckauftrag wiedergeben. Eine Einfügung zwischen den Seiten 9 und 10 bei ausgewählter Option Auf Vorderseite drucken und Auf Rückseite drucken wird als Seite 10 und 11 gedruckt.


Geben Sie die Seitenzahlen der Seiten ein, vor denen die Einfügungen stattfinden sollen. Geben Sie einen Seitenbereich mit einem Bindestrich zwischen den Anfangs- und Endseitenzahlen im Bereich ein. Um z. B. Einfügungen vor den Seiten 5, 11, 12, 13 und 18 einzufügen, geben Sie 5, 11-13, 18 ein.


Wählen Sie die Quelle für die Einfügung aus der Liste Medien für Seite aus.


Illustriert die Auswahl Seiteneinfügung.


Weist den Drucker an, Unterblätter zwischen gedruckten Folien einzufügen.


Wählt den Druck der gleichen Daten wie auf der Folie.


Wählen Sie die Quelle für das Unterblatt aus dem Menü Medien für Unterblatt aus.


Illustriert die Auswahl Folien-Zwischenblatt.


Deaktiviert alle Funktionen im aktuellen Dialogfeld.


Druckt mehr als eine Seite auf einem Blatt.


Fügt auf jeder Seite, die auf einem Blatt gedruckt wird, eine Umrandung hinzu.


Damit können Sie die Reihenfolge, in der die Seiten auf einem Blatt erscheinen, einstellen.


Damit können bei Verwendung einer Duplex-Einheit beide Seiten des Blatts bedruckt werden.


Ermöglicht den Druck eines mehrseitigen Dokuments, so dass fertige Exemplare gestapelt und in ein Broschürenformat gefaltet werden können.


Ändert die Größe der gedruckten Daten, ohne ihre Form zu ändern.


Damit können Sie den Bundsteg (freier Platz) links auf dem gedruckten Blatt einstellen, indem Sie Text und Grafiken proportional reduzieren. Mit dem größeren Bundsteg, der durch Verschieben des Druckbereichs nach rechts um bis zu 25,4 mm erzielt wird, ist eine Broschüre oder gelochte Seite einfacher zu lesen. Bei Verwendung im Duplexdruck wird der vergrößerte Bundsteg gleichmäßig auf beiden Seiten des Blattes ausgerichtet.


Vergrößert den Bundsteg (freien Platz) links auf dem gedruckten Blatt, indem Text und Grafiken proportional reduziert werden. Wählen Sie einen Wert zwischen 0,20 und 1,00 Zoll (5,0 und 25,4 mm) aus oder geben Sie ihn ein und klicken Sie dann auf OK.


Legt die Auflösung des Druckauftrags fest.


Wählt Sie aus weiteren Optionen für Auflösung, KIR und Entwurf aus.


Legt die Auflösung des Druckauftrags fest. Wählen Sie eine Option aus der Liste aus.


Bietet weitere Auflösungsoptionen für den Druckauftrag. Wählen Sie eine Option aus der Liste aus.


Simuliert 1200 dpi Ausgabe, was die Auflösung von Bildern im Vergleich zu einer Einstellung von 600 dpi erhöht und schneller als mit 1200 dpi druckt. Zwischen Schnell 1200 dpi und 600 dpi besteht für Text und Vektorgrafiken kein Unterschied.


Sorgt für eine Auflösung von 600 dpi für hohe Auflösung, detaillierte Ausgabe von Text und Grafiken.


Sorgt für eine Auflösung von 300 dpi, mindert die Bildqualität, erhöht jedoch die Druckgeschwindigkeit.


Glättet die Kanten von Text und Vektorgrafiken. Die Standardeinstellung ist Ein.


Reduziert die Tonermenge, die auf der gedruckten Seite aufgetragen wird und verlängert die Lebensdauer der Tonerkartusche, was sowohl ökonomisch als auch ökologisch von Vorteil ist. Weil die Tonersättigung reduziert wird, erscheinen das ganze Bild, Text Grafiken heller auf dem gedruckten Auftrag. EcoPrint erhöht die Druckgeschwindigkeit nicht.


Passt das Aussehen von Grafikbildern durch Steuerung des Graustufenspektrums an.


Macht Grafikbilder im Druckauftrag heller oder dunkler.


Steuert die Graustufen zwischen schwarz und weiß für die Grafikbilder Ihres Druckauftrags.


Gibt an, wie TrueType-Schriftarten an den Drucker gesendet werden.


Ersetzt eine Dokumentschriftart mit einer Druckerschriftart, weil die Dokumentschriftart vom Drucker nicht unterstützt wird oder um eine Schriftart zu ändern, die in einem großen Dokument oft vorkommt.


Wählt die Anwendungsschriftart aus, die nicht vom Drucker unterstützt wird.


Wählt die Druckerschriftart aus, die die Anwendungsschriftart ersetzen soll.


Gibt an, wohin der Druckauftrag ausgegeben wird.


Gibt die Anzahl der zu druckenden Exemplare an.


Wählt Ausgabeoptionen.


Gibt die Reihenfolge an, in der Seiten eines aus mehreren Blättern bestehenden Auftrags gedruckt werden. Erhöht die Druckgeschwindigkeit eines aus mehreren Blättern bestehenden Auftrags, wenn zusammen mit der RAM-Festplatte verwendet.

Hinweis: Die Sortierfunktion funktioniert mit Adobe-Anwendungen nur, wenn eine RAM-Festplatte oder Festplatte installiert ist.


Sendet den Druckauftrag an eine von fünf Mailboxen, wenn der optionale Sortierstapler installiert ist.


Legt Speicheroptionen fest und ermöglicht dem Benutzer, einen Auftragsnamen zuzuweisen.


Speichert Druckaufträge temporär im Speicher einer optionalen Festplatte.


Speichert einen Druckauftrag im Speicher der optionalen Festplatte des Druckers, damit er nicht gelöscht wird, wenn der Drucker abgeschaltet oder zurückgesetzt wird.


Sendet Druckaufträge Ihrer Wahl an virtuelle Ausgabefächer. Klicken Sie auf Auswahl…, um eine definierte Mailbox auszuwählen.


Sendet Druckaufträge Ihrer Wahl an virtuelle Ausgabefächer auf der optionalen Festplatte. Klicken Sie auf Auswahl…, um eine definierte Mailbox auszuwählen.


Gibt das Ziel Virtuelle Mailbox(en) für Druckaufträge an.


Damit können Sie einen Druckauftrag auf der optionalen Festplatte des Druckers speichern, um später darauf zuzugreifen und den Auftrag auszudrucken.


Druckt alle Exemplare eines Auftrags aus und speichert dann den Auftrag temporär auf der optionalen Festplatte des Druckers, damit später wieder darauf zugegriffen werden kann. Auf die gespeicherten Schnellkopie-Aufträge kann über das Bedienfeld des Druckers zugegriffen werden.


Druckt ein Exemplar eines mehrseitigen Auftrags aus und speichert dann die restlichen Exemplare auf der optionalen Festplatte des Druckers. Dieses erste Exemplar des Auftrags kann als "Andruck" verwendet werden. Die restlichen Exemplare können später ausgedruckt werden.


Sendet sichere Druckaufträge an den Drucker und speichert sie auf der optionalen Festplatte, ohne sie zuvor auszudrucken. Auf die gespeicherten Privater Druck-Aufträge kann nur über das Bedienfeld des Druckers mit Hilfe des Zugangscodes zugegriffen werden. Sie werden auf die gleiche Art auch ausgedruckt.


Speichert Druckaufträge auf der optionalen Festplatte des Druckers, um sie später auszudrucken. Die Aufträge werden permanent gespeichert. Wird ein Zugangscode verwendet, kann nur über das Bedienfeld des Druckers mit Hilfe des Zugangscodes auf gespeicherte Aufträge zugegriffen werden. Sie werden auf die gleiche Art auch ausgedruckt.


Gibt einen Zugangscode für die Verwendung mit Privaten Druck- und Auftragsspeicher-Druckaufträgen an.


Gibt einen Namen an, den der Druckauftrag erhält und der am Bedienfeld des Druckers angezeigt werden kann.

•	Wählen Sie Anwendungsdefiniert, damit die Anwendung den Auftragsnamen definieren kann.

•	Wählen Sie Spezial um Ihren eigenen Auftragsnamen einzugeben.


Schließt ausgewählte Druckeroptionen an, damit ihnen zugewiesene Funktionen mit dem Druckertreiber verwendet werden können.


Gibt Benutzerinformationen und eine Seitenbeschreibungssprache an.


Zeigt Auftragsinformationen auf dem Bedienfeld des Druckers an, weist Medienquellen-Werte zu und richtet ein Passwort für Sicherheitszwecke ein.


Passt die Speichereinstellung im Treiber an den in Ihrem Drucker installierten Speicher an, damit der Treiber das Laden von Schriftarten besser verwalten kann.


Gibt an, dass Druckerspeicher als RAM-Festplatte zugewiesen wurde und ermöglicht die Verwendung der Auftrags-Zwischenspeicherfunktion (Job-Caching), um die Druckgeschwindigkeit zu erhöhen.


Weist einen Mailboxnamen und ein virtuelles Ausgabefach für die Verwendung mit der virtuellen Mailbox-Funktion zu.

•	Geben Sie einen bis zu 31 Zeichen langen Namen in das Feld Mailboxname ein.

•	Geben Sie eine oder mehrere Zahlen (1-255) in Virtuelles Ausgabefach ein.

•	Klicken Sie auf Speichern, um die Eingabe in Definierte Namen zu speichern.

•	Um die Eingabe zu löschen, wählen Sie sie in Definierte Namen und klicken Sie auf Löschen.


Führt die virtuellen Mailboxen auf, die für die Auswahl im Dialogfeld Virtuelle Mailbox-Auswahl zur Verfügung stehen.


Speichert den zugewiesenen Mailboxnamen und zeigt ihn auf der Liste in Definierte Namen an.


Entfernt den ausgewählten Namen aus der Liste in Definierte Namen.


Gibt einen Benutzer- und Abteilungsnamen an, der bis zu 31 Zeichen lang und am Bedienfeld angezeigt werden kann.


Legt eine Seitenbeschreibungssprache aus verfügbaren Optionen fest.


Für PCL-basierte Seitenbeschreibungssprachen unterstützt der Extended Driver das Drucken im GDI-kompatiblen Modus. Dieser Modus weist das PDL-Modul an, genau die Bildschirmansicht zu erstellen. Er erstellt Daten in einem Rasterdruckformat, wodurch eine größere druckbare Datei entsteht, die jedoch mehr der Bildschirmanzeige entspricht. Die Microsoft Graphical Device Interface (GDI)-Komponente in Windows gibt das Dokument so wieder, wie es auf dem Bildschirm erscheint.


Gibt Zoll oder Millimeter als Einheit der benutzerdefinierten Papiergrößen und Bundstegeinstellungen an.


Gibt PCL-Einstellungen für Text als Schwarzdruck und KPDL-Einstellungen für Spiegeldruck, Spiegeldruck, Bild umkehren, Erlaube Datendurchlass and Text als Schwarzdruck an.


Druckt die Daten rückwärts, also spiegelbildlich.


Druckt die Seite als Negativ, wobei weiße und schwarze Bilder umgekehrt gedruckt werden.


Für sehr komplexe Dokumente am besten geeignet. Kann Kompatibilitätsprobleme mit PostScript®-Anwendungen beheben.


Druckt den Farbtext mit schwarzem Toner statt in Graustufen. Weißer Text und Bildfarben sind davon nicht betroffen.


Gibt Auftragsinformationen an, die während des Druckens am Bedienfeld des Druckers angezeigt werden. Wählen Sie Bedienfeld-Meldung und den anzuzeigenden Namen.


Damit kann der Verwalter ein Passwort für Sicherheitszwecke einrichten und bearbeiten.


Legt das gewünschte Passwort fest. Geben Sie ein vierstelliges Passwort in das Feld Neues Passwort ein. Geben Sie es in Neues Passwort bestätigen zur Bestätigung noch einmal ein.


Legt das gewünschte Passwort fest. Geben Sie das vorher festgelegte Passwort in das Feld Passwort ein.


Zeigt Informationen über installierte Treiberkomponenten an.


Zeigt Informationen über optionale Plug-In-Module an.


Zeigt Informationen an, die für die technische Unterstützung möglicherweise notwendig sind.


Zeigt das Kyocera Mita-Logo an.


Illustriert die Auswahl Quelle. Die gewählte Quelle wird im Bild markiert.


Illustriert die Funktion Seiten pro Blatt mit Bildern für zwei oder mehr Blätter auf einer Seite, Umrandung drucken um die Seiten, Layout, Skalierung und Duplex.


Illustriert die Funktion Graustufeneinstellung.


Illustriert die Ausgabeposition. Wenn optionale Ausgabegeräte angeschlossen sind, werden die Ausgabepositionen für Bulk-Fach, Mailbox und oberes Fach hervorgehoben.


Illustriert die Auswahl Geräteoptionen. Wenn Sie ein optionales Gerät anschließen und auf der Liste Geräteoptionen auswählen, erscheint dieses Gerät mit dem Drucker auf dem Bild. Die Festplatte erscheint nicht im Bild.


Stellt alle Vorgabeeinstellungen für das aktuelle Register wieder her.


Damit kann ein Verwalter Werte für Medienquellen festlegen, damit der Extended Driver mit vorherigen Treibern kompatibel ist. Diese Ausrichtung alter und neuer Medienquellen ermöglicht, dass alle unter vorherigen Treibern erstellten Dokumente unter dem Extended Driver kompatibel sind.


Zeigt eine Liste der Medienquellen und zugewiesenen Werten an.


Weist der gewählten Medienquelle einen neuen Wert zu. Klicken Sie nach der Zuweisung auf Anwenden.


Klicken Sie auf Anwenden, um der gewählten Medienquelle einen neuen Wert zuzuweisen.


Stellt die Vorgabeeinstellungen aller Medienquellenwerte wieder her.


Enthält die Liste verfügbarer Prolog-/Epilog-Datendateien, die als Textdateien (.txt) gespeichert werden. Wählt die gewünschte Datendatei aus der Liste aus.


Klicken Sie auf Hinzufügen… um nach PRESCRIBE-Befehlsdateien zu suchen, die sie zur Liste Prolog-/Epilog-Datendateien hinzufügen.


Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Entfernen, um sie von der Liste zu löschen.


Wählen Sie eine der Prolog-/Epilog-Datendateien aus und klicken Sie auf Bearbeiten.... Die Datei wird im Editor geöffnet, in dem Sie den Text bearbeiten können.


Deaktivieren Sie das Kästchen, um die Funktionen im Register Prolog/Epilog zu aktivieren.


Damit können Sie den Einfügepunkt für eingebettete Prolog-/Epilog-Datendateien wählen. Wählen Sie für jede Datendatei einen Einfügepunkt.

Wählen Sie Seitenanfang oder Seitenende aus. Wählen Sie dann eine Seitenoption:

• Nur auf ungeraden Seiten	Wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit ungeraden Seitennummern an.
• Nur auf geraden Seiten	Wendet eine eingebettete Prolog-/Epilog-Datendatei auf alle Seiten mit geraden Seitennummern an.
• Seiten	Wendet eine eingebettete Prolog-/Epilog-Datendatei auf Seitennummern bzw. Seitenbereiche an. Werden keine Seitenzahlen eingegeben, wird die eingebettete Prolog-/Epilog-Datendatei auf alle Seiten angewendet.